Contents

Introduction

Prerequisites

Requirements

Components Used

Configuration

Verify

Troubleshoot

Introduction

This document describes the steps required to configure the meeting name to be displayed in the lobby of the conference for Cisco Meeting Server (CMS).

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- CMS general configuration

- CMS Application Programing Interface (API)

Components Used

The information in this document is based on CMS version 3.2.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Configuration

Step 1. Create a new CallLegProfile via API.

1. Access CMS via Webadmin and naavigate to Configuration/api/v1/callLegProfiles.

2. Create new CallLegProfile and modify next parameters as shown in the image:

name: TECHZONE

meetingTitlePosition: middle

Note: The meetingTitlePosition has the next options available to be configured: top, bottom and middle.

Step 2. Assign the CallLegProfile to the space.

1. Open the Webadmin and  navigate to Configuration/api/v1/coSpaces.

2. Select the space required to assign the CallLegProfile created in Step 1.

CallLegProfile: 127874d9-ee5a-4679-8173-97b80bd06754

Verify

Step 1. Verify if the configuration is applied successfully..

1. Start a call to the space where the CallLegProfile is assigned and you must see the meeting title displayed in the lobby as shown in the image:

The parameter meetingTitleDisplayed configured with Top option is shown in the next image:.

Troubleshoot

There is currently no specific troubleshooting information available for this configuration.