Contents

Introduction

How to get CliQr user credentials for Windows deployment through API?

Introduction

This article describes how to get the credentials for a CliQr user in deployed Windows instance.

How to get CliQr user credentials for Windows deployment through API?

At the time of deployment, the system generates Virtual Machine (VM) password for the user when the job is orchestrated. If the user changes the password at a later stage, that password is not reflected in this API's response.

a. These credentials can be retrieved from CloudCenter GUI from the deployments page as shown here:

b. Get credentials via API:

curl -k -X GET -H "Accept: application/json" -u cloudcenteradmin:40E45DBE57E35ECB "https://<HOST>:<PORT>/v1/jobs/647/credentials"

Response:

[{"nodeId":"i-01dcac3f0f6486691","username":"cliqr","password":"&*}c*$p}T^nGaH98"}]