Contents

Introduction

Prerequisites

Requirements

Components Used

Problem

Solution

Introduction

This document describes an error you can receive when you set up a new CloudCenter Orchestrator (CCO) after the configuration of custom certificates on the CloudCenter Manager (CCM).

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- Linux

- Certificates

Components Used

The information in this document is based on 4.8.0+.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Problem

When you configure the Orchestrator, you receive an error message "Error while communicating with Orchestrator." as shown in the image.

When you review the osmosix log on the CCM this error is present.

VENDOR_ID::1::USER_ID::2::2017-11-06 15:06:29,103 ERROR impl.GatewayServiceImpl [http-apr-10443-exec-17]  - Activate gateway exception message: I/O error on POST request for "https://34.228.91.179:8443/service/v1/gateway/config/activate":sun.security.validator.ValidatorException: PKIX path building failed: sun.security.provider.certpath.SunCertPathBuilderException: unable to find valid certification path to requested target; nested exception is javax.net.ssl.SSLHandshakeException: sun.security.validator.ValidatorException: PKIX path building failed: sun.security.provider.certpath.SunCertPathBuilderException: unable to find valid certification path to requested target

org.springframework.web.client.ResourceAccessException: I/O error on POST request for "https://34.228.91.179:8443/service/v1/gateway/config/activate":sun.security.validator.ValidatorException: PKIX path building failed: sun.security.provider.certpath.SunCertPathBuilderException: unable to find valid certification path to requested target; nested exception is javax.net.ssl.SSLHandshakeException: sun.security.validator.ValidatorException: PKIX path building failed: sun.security.provider.certpath.SunCertPathBuilderException: unable to find valid certification path to requested target

Caused by: javax.net.ssl.SSLHandshakeException: sun.security.validator.ValidatorException: PKIX path building failed: sun.security.provider.certpath.SunCertPathBuilderException: unable to find valid certification path to requested target

Solution

This is caused by a certificate mismatch between the CCO and the CCM.

If the certificates on the CCM were created with the use of the CCM configuration wizard perform these steps:

Step 1. Copy the certs.zip folder that was made in the/tmp directory of the CCM to the CCO and enter the CCO configuration wizard located at /usr/local/cliqr/bin/cco_config_wizard.sh.

Step 2. Select Config_Certs as shown in the image.

Step 3. Type in the path to the certs.zip folder.

This automatically copies the relevant certificates and update the necessary file to point to them.

If you have manually created the CCM certificate then perform these steps:

Step 1. Copy the CCM's certificate, key, and the certificate authority's certificate to the CCO and place them in the /usr/local/tomcat/conf/ssl/ directory.

Step 2. Update /usr/local/tomcat/conf/server.xml.

- Locate the section that starts with <Connector port="8443" maxHttpHeaderSize="8192" .

- Update the SSLCertificateFile, SSLCertificateKeyFile, and SSLCACertificateFile to point to the new files you copied over as shown in the image.

Step 3. In order to restart the server, run the command service tomcat stop, followed by service tomcat start.

Connectivity between the CCM and CCO must now be possible.