Contents

Introduction

Prerequisites

Requirements

Components Used

Troubleshoot Deployments of Images from Azure Marketplace Using CloudCenter

Introduction

This document describes on how to troubleshoot the deployments of Azure Marketplace images from CloudCenter deploying very slowly.

Prerequisites

Requirements

Cisco recomments that you have knowledge of these topics:

- How to deploy Azure marketplace images using CloudCenter

- How to use AzureRM

- How to put osmosix logs in debug mode

Components Used

This information in this document is based on these software and hardware versions:

- CCO and AMQP of any version being deployed on a AzureRM cloud

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Troubleshoot Deployments of Images from Azure Marketplace Using CloudCenter

The main symptom to look out for when you face issues while deploying virtual machines from Azure Marketplace images is the amount of time it takes to fully deploy. With this issue, basic deployments of a base operating system can take 15 to 20 minutes to deploy. These are some points to check in order to identify whether the issue is with Azure Marketplace or CloudCenter.

1. Check the osmosix.log file on the CloudCenter Orchestrator (CCO)

The full error message to look out for is:

DEBUG azure.AzureNetworkService [threadPoolExecutor-1]  - Failed to create network interface, retrying...

java.util.concurrent.ExecutionException: com.microsoft.windowsazure.exception.ServiceException: 404: Operation e7489b92-676e-4a33-8bd8-0654976551a8 not found.

2. Log in to Azure account and check AzureRM notifications for any notifications about virtual machine provisioning of Azure Marketplace images.

3. Test deployments of custom images if experiencing the large delay

If the issue is Azure, then the error message listed in step 1 shows up many times, as Cloud Center keeps waiting on Azure. Custom images are not affected by the slow down either, so if custom images deploy quickly then the issue likely lies with Azure.

Follow these steps to determine if the cause of slowness in deploying Azure Marketplace virtual machines is due to CloudCenter or Azure.