Contents

Introduction

Prerequisites

Best Practices Guide

VMware version

OVA Deployment

CPU

Memory

Hard Disks

Additional Hard Disks

Network

Restrictions

VMware Compatibility Matrix

Introduction

This document describes the best practices for the Catalyst Center VA deployment in a guide format.

Prerequisites

Basic knowledge in VMware and vShphere solution.

These acronyms are used in this document:

VM = Virtual Machine.

OVA = Open Virtual Appliance.

VA = Virtual Appliacne.

Catalyst Center VA = Catalyst Center on ESXi.

- Catalyst Center VA running any version.

- VMware vSphere Client 7.0 or 8.0.

Best Practices Guide

This goal of this guide:

- Shows the default configuration that is applied when we upload the OVA.

- Detail what configuration can be modified and what must be keep by default.

Caution: Modifying the CPU, RAM, default Hard Disks and Network Adapter Type in the Virtual Machine is NOT supported. The only supported changes are outlined along this document.

VMware version

Ensure you are running VMware version 7.0, 8.0, or higher:

- Navigate to VMware hamburger menu > Inventory  and Select the node where Catalyst Center VM is installed, then, Select the Summary tab.

- Confirm the VMware version on the Host Details section:

VMware version

OVA Deployment

Tip: If you have not installed the Catalyst Center VA yet, please refer to this guide: Create a Virtual Machine.

Confirm the VM Hardware Configuration by selecting the VM and navigate to Actions > Edit Settings:

OVA Deployment

Warning: These parameters CANNOT be modified. If you see any of those not matching with the ones presented here, your deployment become not supported.

The next table displays the VM resources that you can and cannot modify.

No Editable

CPU

RAM

Default Hard Disks (3 Hard Disk)

Network Adapter Type

Editable

Additional Hard Disk

Network adapter mapped to a virtual Switch

CPU

CPU

32

Reservation

6400 MHz

Limit

Unlimited MHz

Shares

High 64000

CPU

Memory

Memory

256 GB

Reservation

256 GB

Limit

Unlimited MB

Shares

Normal 2621440

Memory

Hard Disks

Note: By default, the OVA (installation) creates a total of 3 Hard Disks.

Hard Disk 1

HD

100 GB

Type

Thick Provision or Thin Provision

Hard Disk 1

Hard Disk 2

HD

550 GB

Type

Thick Provision or Thin Provision

Hard Disk 2

Hard Disk 3

HD

2.295 TB

Type

Thick Provision or Thin Provision

Hard Disk 3

Additional Hard Disks

Note: You can add any extra Hard disks for specific use cases like: Location to Store Backup Files.

Physical Disk Configuration.

Catalyst Center Virtual Appliance provides an option to mount an external disk to the Virtual Machine for Assurance and Automation backups. Note:

Additional Hard Disks

Caution: Physical Disk option is only supported for single node Virtual Machines.

Network

Network adapter 1 - Enterprise.

Network adapter 1 = Must be mapped to a vSwitch.

Adapter Type = VMXNET3.

Network adapter 2 - Management.

Network adapter 2 = Must be mapped to a vSwitch.

Adapter Type = VMXNET3.

Note: In the Catlyst Center VA OVA release 2.3.7.4 only the Enterprise interface is available. If you want to configure the Management interface, you must manually add a new network adapter.

Tip: The VMXNET3 driver is NAPI‐compliant on Linux guests. NAPI is an interrupt mitigation mechanism that improves high‐speed networking performance on Linux by switching back and forth between interrupt mode and polling mode during packet receive.

Network adapter

Restrictions

Refer to the Limitation and Restriction section on the Release Notes for Catalyst Center on ESXi.

- Catalyst Center VA does not support these VMware vSphere features:

- Fault tolerance

- Suspending and resuming VMs

- Cloning VMs

- Snapshot (as backup)

Warning: The usage of snapshots on Catalyst Center VA is NOT supported and causes major issues on your deployment.

To confirm that Snapshots are not used, navigate to the VM and navigate to Actions > Snapshots > Manage Snapshots.

Manage Snapshots

Confirm there are no VM snapshots:

VM snapshots

VMware Compatibility Matrix

When the virtual machine and ESXi host are managed by vCenter we need to confirm they are compatible.

Comonly the compatibility do not match and the virtual machine can have errors or unexpected behavior.

On your deployment, select the VM and navigate to Summary > VM Hardware.

Notice the Compatibility line under VM Hardware information.

VM Hardware

Refer to the VMware Hardware Compatibility to compare your values on the VMware products compatibility table.

VMware Hardware Compatibility

You must fix any compatibility mismatch.