Introduction

This document describes the reasons behind telemetry connections failing and how to restore them.

- The auto-renewal of thesdn-network-infra-iwancertificate (Cisco Catalyst Center - Cisco IOS® XE device) can fail on a Cisco IOS XE device due to Cisco bug ID CSCwk39268 on that Cisco IOS XE device's operating system, causing telemetry sent from affected devices to Catalyst Center to go down.

- The certificate is valid for one year and is normally renewed automatically by Catalyst Center around 60 days prior to its' expiration.

- Customers affected by this issue, or likely to be affected, can see a pop-up message in Catalyst Center.

Impacted Releases:

- Catalyst Center releases prior to 2.3.7.11 managing Cisco IOS XE network devices running versions 17.12.1-17.12.4

Resolution:

Customers are required to use either of these three options to resolve the issue.

Option 1: Upgrade Catalyst Center to 2.3.7.11 or 2.3.7.9 PSMU60 or 2.3.7.10 PSMU110. The SMU (Software Maintenance Update) will be available for upgrade under System > Software Management in the Cisco Catalyst Center GUI.

Option 2: Upgrade the effected Cisco IOS XE device to 17.12.5 or later of a Cisco recommended release.

Option 3: Force-push telemetry from the Catalyst Center GUI and update the hash algorithm for the trustpoint to sha512 on the device as follows:

1. Navigate to Menu > Provision > Inventory

2. Select the device(s) by hostname

3. Select Actions > Telemetry > Update Telemetry Settings

4. Enable Force Configuration Push

5. Proceed through the wizard and submit the task

Identifying the impacted Cisco IOS XE device:

Step 1: Validate Device Certificate and Trustpoint Status on the impacted Cisco IOS XE device.

device# show crypto pki certificates verbose sdn-network-infra-iwan

Sample Output:

Certificate

Status: Available

Version: 3

Certificate Serial Number (hex): 18831279321B12FA

Certificate Usage: General Purpose

Issuer:

cn=sdn-network-infra-ca

Subject:

Name: device.example.net

cn=C9300-48U_SN12345678_sdn-network-infra-iwan

hostname=device.example.net

Validity Date:

start date: 11:39:55 cdt Jul 10 2025

end   date: 11:39:55 cdt Jul 16 2025

renew date: 06:51:54 cdt Jul 15 2025

...

Note: If the end date and renew date are before the current date on the device then the certificate has expired.

Step 2: Check the error log on the device.

Sample Output:

Device# show logging

%PKI-2-CERT_RENEW_FAIL: Certificate renewal failed for trustpoint sdn-network-infra-iwan

Reason : Failed to get ID certificate from CA server sdn-network-infra-iwan:Certificate renewal failed.

Step 3: Check the device's telemetry status to Catalyst Center

Sample Output:

Device#show tel con all

Telemetry connections

Index Peer Address Port VRF Source Address State State Description

-----------------------------------------------------------------------------------------

36284 x.x.x.x 25103 0 x.x.x.x Connecting Connection request made to transport handler

Note: In this example the telemetry connection is not up, just in the Connecting state.

Additional Information:

(a.) For multiple Cisco IOS XE devices this template can be pushed from Catalyst Center by provisioning CLI templates from Design > CLI Templates tools:

crypto pki trustpoint sdn-network-infra-iwan

no hash sha256

hash sha512

(b.) Force Telemetry Push After Hash Update

1. Navigate to Menu > Provision > Inventory

2. Select the device(s) by hostname

3. Select Actions > Telemetry > Update Telemetry Settings

4. Enable Force Configuration Push

5. Proceed through the wizard and submit the task

FAQ: Does installing the SMU fix an already impacted system, or is it preventive?

The SMU is a preventive fix and must be installed before the issue occurs. If the issue has already occurred, installing the SMU will not automatically clear the issue. To recover existing failed systems, select Option 3.