Inhalt

Einleitung

Problem

Analyse

Alle Peers sind tot.

SMF-Prüfungen

GrafanaChecks

Nexus-Prüfungen

Lösung

Einleitung

In diesem Dokument wird die Fehlerbehebung bei SMF-Protokollwarnungen (Session Management Function) im Zusammenhang mit All Peers are Dead, Setting status code to 0.

Problem

Die Auswirkung der Sitzung wurde auf die SMF gemeldet.

Analyse

Alle Peers sind tot.

Das Protokoll gibt an, dass alle Peers in SelectedProfileName:CHF-OFF ausgefallen sind.

Das Protokoll deckt alle auf SMF konfigurierten Endpunkte ab, und jedes Mal, wenn im Profil alle Peers inaktiv sind, führt dies zu Sitzungsbeeinträchtigungen.

master-1 b26897bce81a[2516]:

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: ***********************************************

master-1 c77834f772f7[2516]: ***********************************************

Basierend auf der Konfiguration versucht die SMF, den primären Server mit höherer Priorität zu erreichen, falls ein HTTP-Code-504-System (Timeout) vorhanden ist, und dann versucht die SMF, den sekundären Server zu erreichen. Wenn dies fehlschlägt, setzt das System auch die Sitzung in den Fortsetzungsmodus.

Im Beispiel ist die sekundäre Charging-Funktion (CHF) für Offline 10.10.10.2. Die SMF hat den Fehler 504 empfangen, und die Aktion lautet FailureContinueAction.

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [RestClient.go:175] [infra.rest_client.core] Error in rest call err Post "http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2/chargingdata": context deadline exceeded

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [Config.go:1721] [nrfClient.Discovery.nrf] Send to NF rpcName[CHF], method:[DataRequest] EndPoint[http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2] failed

master-2 42013075464a[2621]: ************* TRANSACTION: 2252879781 *************

master-2 42013075464a[2621]: TRANSACTION SUCCESS:

master-2 42013075464a[2621]: GR Instance ID : 1

master-2 42013075464a[2621]: Txn Type : N40ChargingDataReq(3521)

master-2 42013075464a[2621]: Priority : 1

master-2 42013075464a[2621]: Session Namespace : smf(1)

master-2 42013075464a[2621]: CDL Slice Name : smf

master-2 42013075464a[2621]: LOG MESSAGES:

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [rest_ep.app.ChargingIntf] {imsi-1234567891011121:21} Received Charging Data Response error with timediff 10001557123 - Request message {{"invocationSequenceNumber":1,"invocationTimeStamp":"2025-11-10T14:29:29Z","nfConsumerIdentification":{"nFIPv4Address":"10.10.10.12","nFName":"dce0c1d7-aa37-4f2c-870b-6f7c1be10af1","nFPLMNID":{"mcc":"123","mnc":"456"},"nodeFunctionality":"SMF"},"notifyUri":"http://10.10.10.12:8195/callbacks/v2/notifyUri/1909959397/chargingNotification","pDUSessionChargingInformation":{"chargingId":1909959397,"pduSessionInformation":{"authorizedQoSInformation":{"5qi":1,"arp":{"preemptCap":"NOT_PREEMPT","preemptVuln":"PREEMPTABLE","priorityLevel":1}},"authorizedSessionAMBR":{"downlink":"2048000 bps","uplink":"2048000 bps"},"chargingCharacteristicsSelectionMode":"VISITING_DEFAULT","dnnId":"data","hPlmnId":{"mcc":"123","mnc":"456"},"networkSlicingInfo":{"sNSSAI":{"sst":1}},"pduAddress":{"iPv6dynamicPrefixFlag":true,"pduIPv6AddresswithPrefix":"x:x:x:x::"},"pduSessionID":21,"pduType":"IPV6","ratType":"WLAN","servingCNPlmnId":{"mcc":"123","mnc":"456"},"sscMode":"SSC_MODE_1","startTime":"2025-11-10T14:29:29Z"},"userInformation":{"roamerInOut":"IN_BOUND","servedGPSI":"msisdn-12345678901"},"userLocationinfo":{"n3gaLocation":{"portNumber":4505,"ueIpv4Addr":"x.x.x.x"}}},"subscriberIdentifier":{"subscriberIdentityType":"SUPI","supi":"imsi-1234567891011121"}}}

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.SendMesg.NRF] FHI status 504 timediff 1000332537, Uri: http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2, retryCount = 0 loopMaxRetry = 0, maxRetry = 0

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF Http2_Status:504 FailAction:FailureContinueAction MsgType:3587 ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-2 42013075464a[2621]: ***********************************************

SMF-Prüfungen

Überprüfen Sie auf SMF die Peers und deren Verbindungszeit in Bezug auf den Endpunkt, der das Problem gemeldet hat.

smf# show peers

GR                                                                                POD              CONNECTED              ADDITIONAL

INSTANCE  ENDPOINT        LOCAL ADDRESS         PEER ADDRESS           DIRECTION  INSTANCE   TYPE  TIME           RPC     DETAILS     INTERFACE NAME     VRF

--------------------------------------------------------------------------------------------------------------------------------------------------------------

1         <none>          192.168.1.1        10.10.10.2:1090      Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.2:1090      Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.1:1090     Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.2:1090      Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.1:1090     Outbound   rest-ep-3  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.1:1090     Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.2:1090      Outbound   rest-ep-3  Rest  2 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.1        10.10.10.1:1090     Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

// CHF related profiles

profile network-element chf CHF-OFFLINE

nf-client-profile        CHF-OFF

failure-handling-profile Fail-H-CHF-OFF

discovery local

exit

// Here is configuration for CHF profile where all peers are dead

profile nf-client nf-type chf

chf-profile CHF-OFF

locality LOC1

priority 1

service name type nchf-convergedcharging

responsetimeout 1000

endpoint-profile epprof

capacity   10

api-root   OFFLINE

uri-scheme http

version

uri-version v2

exit

exit

endpoint-name ep1

priority 1

capacity 10

primary ip-address ipv4 10.10.10.1

primary ip-address port 1090

exit

endpoint-name ep2

priority 2

capacity 10

primary ip-address ipv4 10.10.10.2

primary ip-address port 1090

exit

exit

exit

exit

exit

// Failure handling that in case of timeout (HTTP code 504) then try secondary server one time and then proceed with continuing the session

profile nf-client-failure nf-type chf

profile failure-handling Fail-H-CHF-OFF

service name type nchf-convergedcharging

responsetimeout 1000

message type ChfConvergedchargingCreate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingUpdate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingDelete

status-code httpv2 504

retry  1

action continue

exit

exit

exit

Grafana-Schecks

Es wurde eine direkte Korrelation zwischen dem HTTP 504-Timeout und dem Zeitpunkt des Problems beobachtet.

query: sum(increase(smf_restep_http_msg_total{nf_type="chf", namespace=~"$namespace"}[15m])) by (api_name, response_cause, response_status)

Nexus-Prüfungen

Überprüfen Sie, ob irgendwelche Klappen aufgetreten sind.

Nexus# show logging last 500 | include BFD

Lösung

Die Lösung dieses Problems ist in diesem Fall unterschiedlich, da SMF der Client und CHF der Server ist.

Der Verbindungsverlust wurde nicht durch SMF verursacht.