Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Problem

Fehlerbehebung

Lösung

Einführung

In diesem Dokument wird beschrieben, wie das Problem behoben werden kann, das auftritt, wenn die Gx-Erfolgsrate Key Performance Indicator (KPI)-Beeinträchtigung auftritt, wenn der Grund für die Verbindungstrennung bei "ims-authorized-failed" (nicht autorisierte Benutzer) erhöht wird.

Voraussetzungen

Anforderungen

Cisco empfiehlt, über Kenntnisse in folgenden Bereichen zu verfügen:

- Hardware-Kenntnisse von 5000/5500

- StarOS

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt.

Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Hintergrundinformationen

Abkürzungen:

PCRF

Funktion für Richtlinien und Ladungsregeln

PGW

Gateway für Paketdatennetzwerke

CCR

Kreditkontrollanfrage

CCA

Kreditkontrollantwort

CFC

Virtual Card zur Steuerung

FC

Virtuelle Servicefunktion

KPI

Leistungskennzahl

Problem

Der Service Provider meldete eine Gx-Erfolgsrate zur KPI-Verschlechterung in einem PGW, und es wurde festgestellt, dass der Trennungsgrund "ims-authorized-failure"-Zähler zunimmt.

In diesem Fall beschreibt der Grund für die Trennung der nicht autorisierten Verbindung die Gesamtzahl der Sitzungen, die aufgrund von IMS-Autorisierungsfehlern getrennt wurden.

Der PGW meldete kontinuierlich den Zähler "ims-authorized-failed" (nicht autorisierte Benutzer). Wie aus den Trends hervorgeht, hat der Zähler "ims-authorized-failed" (nicht autorisierte Benutzer) zur Verschlechterung der Gx-Erfolgsrate beigetragen.

1st iteration-

[local]PGW# show session disconnect-reasons verbose | grep -i ims-authorization-failed

Thursday June 13 16:10:39 NZST 2019

..

Disconnect Reason                                       Num Disc    Percentage

-----------------------------------------------------  ----------  ----------

ims-authorization-failed                                    59034     1.68225

2nd iteration-

[local]PGW# show session disconnect-reasons verbose | grep -i ims-authorization-failed

Thursday June 13 16:10:59 NZST 2019

..

Disconnect Reason                                        Num Disc  Percentage

-----------------------------------------------------  ----------  ----------

ims-authorization-failed                                    59202     1.68181         >>168 counter increased in just 20 sec of span

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Behebung des Problems der Gx-Erfolgsrate-KPI-Verschlechterung aufgrund eines Anstiegs des "ims-authorized-failed"-Trennungsgrunds.

Für das Fehlerszenario wurde eine Ablaufverfolgung für den Monitorteilnehmer erfasst.

Die Analyse ergab, dass "ims-authorized-failed" für die mit Karte 7 in Verbindung stehenden Instanzen von Sessmgr beobachtet wurde. Insgesamt wurde der Grund für die IMAS-Autorisierung mit einem getrennten Grund empfangen.

Weitere Informationen finden Sie in der Ablaufverfolgungssequenz für den fehlerhaften Subscriber:

Die Nachricht CREATE_SESSION_REQUEST wurde vom SGW an den PGW gesendet.

INBOUND>>>>>  From sessmgr:102 sessmgr_pgw.c:31631 (Callid 1e283e66) 16:55:07:562 Eventid:141004(3)

[PGW-S5/S2a/S2b]GTPv2C Rx PDU, from 202.73.X.Y:31552 to 202.73.A.B:2123 (262)

TEID: 0x00000000, Message type: EGTP_CREATE_SESSION_REQUEST (0x20)

Sequence Number: 0x18A861 (1615969)

GTP HEADER

Version number: 2

TEID flag: Present

Piggybacking flag: Not present

Message Length: 0x0102 (258)

INFORMATION ELEMENTS

IMSI:

Type: 1  Length: 8  Inst: 0

Value: ABXY01106562064

USER LOCATION INFO:

Type: 86  Length: 13  Inst: 0

Value:

Location type: TAI

MCC: 530

MNC: 01

TAC: 0xA101

Location type: ECGI

MCC: AB0

MNC: XY

ECI: 0x006F902

SERVING NETWORK:

Type: 83  Length: 3  Inst: 0

Value:

MCC: AB0

MNC: XY

RADIO ACCESS TECH:

Type: 82  Length: 1  Inst: 0

Value: EUTRAN (6)

SGW-CONTROL FTEID:

Type: 87  Length: 9  Inst: 0

Value:

Interface: SGW S5/S8-C

IPv4 Flag: 1

IPv6 Flag: 0

Teid: 0x84B8A061

IPV4 Addr: 202.73.X.Y

ACCESS POINT NAME:

Type: 71  Length: 28  Inst: 0

Value: internet.mnc0XY.mcc0AB.gprs

SELECTION MODE:

Type: 128  Length: 1  Inst: 0

Value: MS or network provided APN,subscr verified (0x00)

PDN TYPE:

Type: 99  Length: 1  Inst: 0

Value: IPV4

PDN ADDRESS ALLOC:

Type: 79  Length: 5  Inst: 0

Value:

PDN Type: IPV4

IPV4 Addr: 0.0.0.0

INDICATION:

Type: 77  Length: 6  Inst: 0

Value:

DAF  : 0

DTF  : 0(Direct tunnel disabled)

HI   : 0

DFI  : 0

OI   : 0

ISRSI: 0(ISR not supported)

ISRAI: 0(ISR not Activated)

SGWCI: 0

SQCI : 0

UIMSI: 0(Authenticated IMSI)

CFSI : 0(F-TEID Change Indication not supported)

CRSI : 0(Location Change Reporting not supported)

PS   : 1(Piggybacking feature supported)

PT   : 0(GTPv2)

SI   : 0

MSV  : 0

RetLoc: 0

PBIC: 0

SRNI: 0

S6AF: 0

S4AF: 0

MBMDT: 0

ISRAU: 0

CCRSI: 0(CSG Information Change Reporting mechanism not supported )

CPRAI: 0

ARRL: 0

PPOF: 0

PPON / PPEI: 0

PPSI: 0

CSFBI: 0

CLII: 0

CPSR: 0

UASI: 0

DTCI: 0

BDWI: 0

PCRI: 0

AOSI: 0

AOPI: 0

EPCOSI: 0

CPOPCI: 0

S11TF: 0

PNSI: 0

WPMSI: 0

APN RESTRICTION:

Type: 127  Length: 1  Inst: 0

Value: 0

AGGREGATE MAX BIT RATE:

Type: 72  Length: 8  Inst: 0

Value:

Uplk AMBR: 64000 kbps

Dnlk AMBR: 256000 kbps

PCO:

Type: 78  Length: 32  Inst: 0

Container id: 0x8021 (IPCP)

Container length: 0x10 (16)

Container content:

Conf-Req(0), Pri-DNS=0.0.0.0, Sec-DNS=0.0.0.0

Container id: 0x000D (IPv4-DNS-Server)

Container length: 0x00 (0)

Container content:

DNS Address: Request for IPv4 DNS Address allocation

Container id: 0x000A (IP address allocation via NAS signalling)

Container length: 0x00 (0)

Container content:

IP Address allocation via NAS signalling

Container id: 0x0005 (Bearer Control Mode)

Container length: 0x00 (0)

Container content:

NCQOS BCM Indicator:

Container id: 0x0010 (Link MTU)

Container length: 0x00 (0)

Container content:

BEARER CONTEXT TO BE CREATED:

Type: 93  Length: 44  Inst: 0

Value:

EPS BEARER ID:

Type: 73  Length: 1  Inst: 0

Value: 5

SGW-DATA FTEID:

Type: 87  Length: 9  Inst: 2

Value:

Interface: SGW S5/S8-U

IPv4 Flag: 1

IPv6 Flag: 0

Teid: 0x8A948061

IPV4 Addr: 202.73.X.Y

BEARER QOS:

Type: 80  Length: 22  Inst: 0

Value:

ARP: PCI = 1 (Disabled), PL = 9, PVI = 0 (Enabled)

QCI: 6

Uplnk MBR: 0 kbps

Dnlnk MBR: 0 kbps

Uplnk GBR: 0 kbps

Dnlnk GBR: 0 kbps

UE TIME ZONE:

Type: 114  Length: 2  Inst: 0

Value:

TZ: +12:00

DST: +0 hour

CHARGING CHAR:

Type: 95  Length: 2  Inst: 0

Value: 0x0800

<additional output suprresed>

Der PGW hat in der Nachricht EGTP_CREATE_SESSION_RESPONSE 'Keine Ressource verfügbar' an den SGW gesendet.

<<<<OUTBOUND  From sessmgr:102 sessmgr_egtp.c:2906 (Callid 1e283e66) 16:55:15:492 Eventid:141005(3)

[PGW-S5/S2a/S2b]GTPv2C Tx PDU, from 202.73.195.91:2123 to 202.73.195.89:31552 (33)

TEID: 0x84B8A061, Message type: EGTP_CREATE_SESSION_RESPONSE (0x21)

Sequence Number: 0x18A861 (1615969)

GTP HEADER

Version number: 2

TEID flag: Present

Piggybacking flag: Not present

Message Length: 0x001D (29)

INFORMATION ELEMENTS

CAUSE:

Type: 2  Length: 2  Inst: 0

Value:

Cause: EGTP_CAUSE_NO_RESOURCES_AVAILABLE (0x49)

PCE: 0

BCE: 0

CS: 0

BEARER CONTEXT CREATED:

Type: 93  Length: 11  Inst: 0

Value:

EPS BEARER ID:

Type: 73  Length: 1  Inst: 0

Value: 5

CAUSE:

Type: 2  Length: 2  Inst: 0

Value:

Cause: EGTP_CAUSE_NO_RESOURCES_AVAILABLE (0x49)

PCE: 0

BCE: 0

CS: 0

Insgesamt wurde ein Grund für eine nicht autorisierte Person aus einem getrennten Grund empfangen.

***CONTROL*** From sessmgr:102 sessmgr_func.c:5311 (Callid 1e283e66) 16:55:15:493 Eventid:10285   >>disconnect received for sessmr 102

CALL STATS: <xyz12591615@internet>, msid <ABXY01106562064>, Call-Duration(sec): 0

input pkts: 0                          output pkts: 0

input bytes: 0                         output bytes: 0

input bytes dropped: 0                 output bytes dropped: 0

input pkts dropped: 0                  output pkts dropped: 0

pk rate from user(bps): 0              pk rate to user(bps): 0

ave rate from user(bps): 0             ave rate to user(bps): 0

sust rate from user(bps): 0            sust rate to user(bps): 0

pk rate from user(pps): 0              pk rate to user(pps): 0

ave rate from user(pps): 0             ave rate to user(pps): 0

sust rate from user(pps): 0            sust rate to user(pps): 0

link online/active percent: 0

ipv4 bad hdr: 0                        ipv4 ttl exceeded: 0

ipv4 fragments sent: 0                 ipv4 could not fragment: 0

ipv4 input acl drop: 0                 ipv4 output acl drop: 0

ipv4 bad length trim: 0

ipv4 input non-mip drop: 0             ipv4 output non-mip drop: 0

ipv4 input css drop: 0                 ipv4 output css drop: 0

output gre xoff pkts drop: 0           output gre xoff bytes drop: 0

ipv4 output no-flow drop: 0

ipv4 source violations: 0              ipv4 early pdu drop: 0

ipv4 proxy-dns redirect: 0             ipv4 proxy-dns pass-thru: 0

ipv4 proxy-dns drop: 0                 ipv4 proxy-dns redirect tcp connection: 0

ipv6 bad hdr: 0                        ipv6 bad length trim: 0

ip source violation no acct: 0          ip source violation ignored: 0

dlnk pkts exceeded bw: 0               dlnk pkts violated bw: 0

uplnk pkts exceeded bw: 0              uplnk pkts violated bw: 0

dormancy total: 0                      handoff total: 0

Disconnect Reason: ims-authorization-failed

Last Progress State: IMS Authorizing

Außerdem ist die Instanznummer 102, die der Karte 7 zugeordnet ist, für die ein Zähler für nicht autorisierte Benutzer empfangen wird.

[local]PGW# show task resources facility sessmgr instance 102

Thursday June 13 16:56:14 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

7/0 sessmgr        102 8.80%  100% 792.2M  2.34G   45  500  3097 32504 I   good

Total                 1  8.80%     792.2M            45         3097

Bei der Überprüfung der Konfiguration wurde festgestellt, dass die Konfigurationen mit mehreren Diamantenproxys in Ordnung waren.

[local]PGW# show config | grep multiple

Thursday June 13 15:15:11 NZST 2019

require diameter-proxy multiple

Es wurde dann festgestellt, dass die "ims-permit-failed" für die Karte beobachtet wurde, in der die Diamantenanlage nicht entstanden war.

In diesem Fall konnte die Diamantenanlage nicht mit Karte 7 hervorgebracht werden.

[local]PGW# show card table

Thursday June 13 14:53:53 NZST 2019

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Standby        -

2: CFC      Control Function Virtual Card           Active         No

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Active         No

6: FC       2-Port Service Function Virtual Card    Active         No

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

9: FC       2-Port Service Function Virtual Card    Active         No

10: FC       2-Port Service Function Virtual Card    Active         No

11: FC       2-Port Service Function Virtual Card    Active         No

12: FC       2-Port Service Function Virtual Card    Active         No

13: FC       2-Port Service Function Virtual Card    Active         No

14: FC       2-Port Service Function Virtual Card    Active         No

15: FC       2-Port Service Function Virtual Card    Standby        -

16: FC       2-Port Service Function Virtual Card    Active         No

------- -

[local]PGW# show task resources facility diamproxy all

Thursday June 13 14:55:31 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

3/0 diamproxy        8 1.10%   90% 43.75M 250.0M  271 2500    --    -- -   good

4/0 diamproxy        9 1.09%   90% 43.89M 250.0M  266 2500    --    -- -   good

5/0 diamproxy       10 1.09%   90% 43.93M 250.0M  237 2500    --    -- -   good

9/0 diamproxy        1 1.08%   90% 43.63M 250.0M  212 2500    --    -- -   good

10/0 diamproxy        4 1.08%   90% 43.88M 250.0M  258 2500    --    -- -   good

12/0 diamproxy       11 1.11%   90% 43.93M 250.0M  229 2500    --    -- -   good

13/0 diamproxy        2 1.09%   90% 43.75M 250.0M  258 2500    --    -- -   good

14/0 diamproxy        7 1.06%   90% 43.88M 250.0M  256 2500    --    -- -   good

16/0 diamproxy       13 1.04%   90% 43.89M 250.0M  199 2500    --    -- -   good

Lösung

Es wird festgestellt, dass die Diamantenproxyeinrichtung nicht für Karte 7 hervorgebracht wurde, obwohl Karte 7 aktiv war. Um eine Diamantenproxyanlage zu erzeugen, muss die Diamantenanlage neu gestartet oder ein Wechsel der CF-Karte durchgeführt werden.

Dieser Aktionsplan wurde wie vorgeschlagen umgesetzt.

Wechseln Sie zur aktiven CFC-Karte mit Standby-CFC-Karte.

Nach dem Kartenwechsel wurden die jeweiligen Diamantenproxys korrekt erzeugt und die Gx-KPI-Werte entsprechend den erwarteten Werten wieder auf den Normalwert zurückgesetzt.

******** show card table all *******

Thursday June 13 22:17:54 NZST 2019<tel:2019>

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         No                >>CFC card 1 active post switchover

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Active         No

6: FC       2-Port Service Function Virtual Card    Active         No

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

9: FC       2-Port Service Function Virtual Card    Active         No

10: FC       2-Port Service Function Virtual Card    Active         No

11: FC       2-Port Service Function Virtual Card    Active         No

12: FC       2-Port Service Function Virtual Card    Active         No

13: FC       2-Port Service Function Virtual Card    Active         No

14: FC       2-Port Service Function Virtual Card    Active         No

15: FC       2-Port Service Function Virtual Card    Standby        -

16: FC       2-Port Service Function Virtual Card    Active         No

--------- -

[local]PGW# show task resources facility diamproxy all

Thursday June 13 14:55:31 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

3/0 diamproxy        8 0.95%   90% 43.86M 250.0M  130 2500    --    -- -   good

4/0 diamproxy        9 0.98%   90% 44.00M 250.0M  130 2500    --    -- -   good

5/0 diamproxy       10 1.00%   90% 44.00M 250.0M  135 2500    --    -- -   good

7/0 diamproxy        3 0.26%   90% 43.73M 250.0M  278 2500    --    -- -   good      >>diamproxy instance 3 spawn with card 7

8/0 diamproxy        5 0.31%   90% 43.73M 250.0M  277 2500    --    -- -   good

9/0 diamproxy        1 1.00%   90% 43.86M 250.0M  130 2500    --    -- -   good

10/0 diamproxy        4 0.98%   90% 43.96M 250.0M  133 2500    --    -- -   good

11/0 diamproxy        6 0.24%   90% 43.74M 250.0M  277 2500    --    -- -   good

12/0 diamproxy       11 1.04%   90% 44.01M 250.0M  144 2500    --    -- -   good

13/0 diamproxy        2 0.97%   90% 43.84M 250.0M  134 2500    --    -- -   good

14/0 diamproxy        7 1.04%   90% 43.99M 250.0M  138 2500    --    -- -   good

16/0 diamproxy       13 0.96%   90% 43.74M 250.0M  261 2500    --    -- -   good

Die entsprechende Diamanten-Proxy-Einrichtung wurde hervorgerufen, nachdem die Nachrichten über Aktivität und Durchmesser zwischen dem PGW und der PCRF-Instanz ordnungsgemäß ausgetauscht wurden.