Inhalt

Ab dem 31. März 2026 wird die CCO Image Download-Funktion mit dem Embedded Wireless Controller on Catalyst Access Points (EWC-AP) nicht mehr unterstützt und funktioniert auch nicht mehr.

Dazu gehören:

- CCO-Modus für Software-Upgrades (GUI) - d. h. "Modus CCO" unter Administration > Software Management > Software Upgrade

- CCO Image Download (CLI) - Image-Download-Modus, der unter "Wireless Profile Image-Download Default" konfiguriert ist

Alternativ können Sie die gewünschten Software-Images von software.cisco.com herunterladen und anschließend über die Methoden TFTP, SFTP oder HTTP Image Download installieren. Weitere Informationen finden Sie im Kapitel Image Download im Cisco Embedded Wireless Controller im Catalyst Access Points Configuration Guide, IOS XE 17.15.x.

����

����