Inhalt

Einführung

Beispiel für ein CLI-Protokoll des Routers

Router-Flash-Inhalte

AP-Flash neu formatieren

Herstellen einer Verbindung mit AP802

Kopieren von AP IOS auf Router Flash

AP-IOS extrahieren

Konfigurieren des Access Points zum Starten des neuen IOS-Images

Router-Flash löschen und autonom konfigurieren

Ermitteln, ob ein ISR über AP801 oder AP802 verfügt

Ähnliche Diskussionen in der Cisco Support Community

Einführung

Dieses Dokument zeigt, wie die Image-Wiederherstellung eines Access Points auf einem ISR (Integrated Services Router) mit integriertem AP802 durchgeführt wird.  Die hier beschriebene Methode beruht darauf, dass der direkte Zugriff auf die Flash-Partition des AP802 vom Host-Router aus möglich ist.  Dieses Verfahren kann von einem Router mit integriertem AP801 nicht verwendet werden. auf solchen Plattformen müssen Sie die Image-Wiederherstellung des Access Points über die AP801-Konsole (Bootloader) durchführen (Ermitteln, ob Sie einen AP801 oder AP802 haben).

Beispiel für ein CLI-Protokoll des Routers

Das nachfolgende Beispiel wurde mit einem 819HWD mit IOS (Internetwork Operating System) 15.2(4)M5 ausgeführt.

Router-Flash-Inhalte

819HWD#dir all-filesystems

[ ... ]

Directory of flash:1:/

2 -rw- 100041 Aug 1 2014 19:37:46 +00:00 event.log

25 -rw- 215 Sep 15 2014 17:17:38 +00:00 env_vars

4 -rw- 125729 Aug 1 2014 12:29:16 +00:00 event.capwap

5 -rw- 281 Jun 9 2014 23:28:12 +00:00 info

6 -rw- 8216 Sep 15 2014 17:17:50 +00:00 private-multiple-fs

7 drw- 0 Dec 26 2013 19:52:46 +00:00 ap802-rcvk9w8-mx

17 -rw- 3072 Dec 26 2013 20:02:30 +00:00 cpconfig-ap802.cfg

3 -rw- 0 Sep 15 2014 17:18:02 +00:00 config.txt

18 -rw- 5 Jun 25 2014 21:06:00 +00:00 private-config

19 -rw- 64 Jun 24 2014 23:12:10 +00:00 sensord_CSPRNG1

20 -rw- 64 Jun 24 2014 23:21:44 +00:00 sensord_CSPRNG0

21 drw- 0 Jul 31 2014 18:29:32 +00:00 configs

AP-Flash neu formatieren

Flash:1: Dateisystem ist die vom AP802 verwendete Partition.  In unserem Test formatieren wir dieses Dateisystem so, dass es sauber ist, und starten dann den AP802 neu, damit es im AP-Bootloader bootet. (Hinweis: formatieren Sie AP-Flash nur, wenn es erforderlich ist. Dies geschieht hier zu Illustrationszwecken.)

819HWD#format flash:1:/

Format operation may take a while. Continue? [confirm]y

Format operation will destroy all data in "flash:1:". Continue? [confirm]y

Format: All system sectors written. OK...

Format: Total sectors in formatted partition: 80801

Format: Total bytes in formatted partition: 41370112

Format: Operation completed successfully.

Format of flash:1: complete

819HWD#service-module wlan-ap 0 reset

Use reset only to recover from shutdown or failed state

AP config will not be saved

Do you want to reset?[confirm]y

Trying to reload Service Module wlan-ap0.

Pause - wait for open files to finish...

819HWD#

*Sep 15 17:28:30.232: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:28:30.248: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UP

Herstellen einer Verbindung mit AP802

Stellen Sie eine Verbindung zur Konsole des AP802 her, um zu überprüfen, ob der Flash-Speicher nun leer ist.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

Connecting to AP console, enter Ctrl-^ followed by x,

then "disconnect" to return to router prompt

ap: dir flash:

Directory of flash:/

41168896 bytes available (139264 bytes used)

ap:

Ctrl-^x

819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

Kopieren von AP IOS auf Router Flash

Kopieren Sie den gewünschten AP-IOS-Tarball von einem TFTP-Server (Trivial File Transfer Protocol) auf die Haupt-Flash-Partition des Routers.  In diesem Fall verwenden wir ap802-k9w7-tar.152-4.JB5.tar, das autonome IOS 15.2(4)JB5 ist.  (Siehe den Artikel Understanding Access Point IOS Images.)

819HWD#copy tftp flash:

Address or name of remote host [192.168.148.1]?

Source filename [/192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar]? ap802-k9w7-tar.152-4.JB5.tar

Destination filename [ap802-k9w7-tar.152-4.JB5.tar]?

Accessing tftp://192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar...

Loading ap802-k9w7-tar.152-4.JB5.tar from 192.168.148.1 (via GigabitEthernet0): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 13834240 bytes]

13834240 bytes copied in 46.368 secs (298357 bytes/sec)

AP-IOS extrahieren

Entbündeln Sie den Tarball mithilfe des Befehls archiv tar /xtract im AP-Flash (flash:1:).

819HWD#archive tar /xtract ap802-k9w7-tar.152-4.JB5.tar flash:1:

extracting info (282 bytes)

ap802-k9w7-mx.152-4.JB5/ (directory)

ap802-k9w7-mx.152-4.JB5/html/ (directory)

[ ... ]

extracting info.ver (282 bytes)

819HWD#dir flash:1:

Directory of flash:1:/

4 -rw- 282 Sep 15 2014 17:31:40 +00:00 info

5 drw- 0 Sep 15 2014 17:31:42 +00:00 ap802-k9w7-mx.152-4.JB5

199 -rw- 282 Sep 15 2014 17:33:38 +00:00 info.ver

41308160 bytes total (26963968 bytes free)

Konfigurieren des Access Points zum Starten des neuen IOS-Images

Konsolen zum Bootloader des AP802 und Konfigurieren zum Starten des IOS-Images  Beachten Sie, dass das IOS-Image von AP normalerweise als flash:/platform-featureset-mx.version/platform-featureset-mx-version bezeichnet wird.  Starten Sie dann AP IOS.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

ap: dir flash:

Directory of flash:/

4 -rw- 282

info

5 drw- 0

ap802-k9w7-mx.152-4.JB5

199 -rw- 282

info.ver

26963968 bytes available (14344192 bytes used)

ap:

set BOOT flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5

ap: reset

Are you sure you want to reset the system (y/n)?y

System resetting...

*Sep 15 17:35:12.758: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core SAFE FOR RESET

IOS Bootloader - Starting system.

[ ... ]

*Sep 15 17:35:25.329: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:35:25.345: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UPLoading "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5"...###############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

File "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5" uncompressed and installed, entry point: 0x18003000

[ ... ]

Cisco IOS Software, AP802 Software (AP802-K9W7-M), Version 15.2(4)JB5, RELEASE SOFTWARE (fc1)

[ ... ]

*Sep 15 17:37:29.371: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core UP

*Sep 15 17:37:37.435: %WLAN_AP_SM-6-UNIFIED_IMAGE: Embedded AP will change boot image to mini-IOS also called LWAPP recovery

Please check router config to ensure connectivity between WLC and AP

Use service-module wlan-ap 0 reload to boot up mini-IOS image on AP

Save the autonomous configuration file with a file name other than

flash:[config.txt] as it will be erased upon AP reload

Press RETURN to get started!

ap>

Ctrl-^x 819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

819HWD#

Router-Flash löschen und autonom konfigurieren

Löschen Sie jetzt den Tarball aus dem Router-Flash, da er nicht mehr benötigt wird.  Weisen Sie auch auf die Meldung "WLAN_AP_SM-6-UNIFIED_IMAGE" hin, die besagt, dass der Router meint, der Access Point sollte ein IOS mit geringem Gewicht ausführen. Daher müssen wir den Befehl service-module-wlan n bootimage verwenden, um dem Router mitzuteilen, dass der Access Point autonom (oder leicht) ausgeführt wird.

819HWD#del flash:/ap802-k9w7-tar.152-4.JB5.tar

Delete filename [ap802-k9w7-tar.152-4.JB5.tar]?

Delete flash:/ap802-k9w7-tar.152-4.JB5.tar? [confirm]

819HWD#conf t

Enter configuration commands, one per line. End with CNTL/Z.

819HWD(config)#service-module wlan-ap 0 bootimage autonomous

819HWD(config)#end

819HWD#wri

Building configuration...[OK]

Ermitteln, ob ein ISR über AP801 oder AP802 verfügt

Frage: Wie erkennen Sie, ob ein ISR über einen AP801 oder einen AP802 verfügt?

Antwort 1. Führen Sie eine Show-Version auf dem Access Point aus.

Antwort 2. http://www.cisco.com/c/en/us/products/routers/800-series-routers/brochure-listing.html > Cisco ISR der Serie 800 im Vergleich