Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konfigurieren

ATM-Modus

EFM-Modus

Überprüfen

Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument beschreibt die erforderlichen Konfigurationsschritte für die Implementierung einer Back-to-Back-Multirate-Verbindung zwischen zwei EHWIC-4SHDSL-EA-Modulen mit symmetrischer High-Speed Digital Subscriber Line (G.SHDSL).

Sie müssen das eine Ende der Verbindung im Modus für die Zentrale(CO) und das andere Ende im Modus für Geräte am Kundenstandort (CPE) konfigurieren, um die SHDSL-Verbindung zu aktivieren. Diese Art von Back-to-Back-SHDSL-Verbindungen wird in der Regel in einem Campus-Netzwerk implementiert, um die Verbindung zwischen zwei Gebäuden zu ermöglichen, ohne dass ein Digital Subscriber Line Access Multiplexer (DSLAM) zwischen den beiden DSL-Routern erforderlich ist.

Voraussetzungen

Anforderungen

Cisco empfiehlt, über Kenntnisse in folgenden Bereichen zu verfügen:

- EHWIC-4SHDSL-EA-Modul

- Fixed Integrated Service Router (ISR) G2-Router wie C888EA-K9 können sowohl im CO- als auch im CPE-Modus mit Cisco IOS® Software 15.2(2)T2 und höheren Versionen verwendet werden.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Einrichtung umfasst jedoch folgende Geräte:

- Zwei ISR Generation-2-Router (CISCO2901/K9) mit Cisco IOS® 15.4.3M2

- Zwei EHWIC-4SHDSL-EA-Module, die auf beiden ISR G2-Routern installiert sind

- ANSI/TIA/EIA-568-B-Kabel mit RJ-45-Anschlüssen an beiden Enden

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konfigurieren

In dieser Konfiguration verwenden Sie identische Router mit auf diesen installierten EHWIC-4SHDSL-EA-Modulen. Auf dem Gerät mit dem Namen CO_Router ist der SHDSL-Controller für den Betrieb im CO-Modus konfiguriert, während auf dem Gerät mit dem Namen CPE_Router der SHDSL-Controller für den Betrieb im CPE-Modus konfiguriert ist.

Das EHWIC-4SHDSL-EA-Modul kann sowohl für Ethernet im First Mile (EFM) als auch für den Asynchronous Transfer Mode (ATM) konfiguriert werden. In diesem Dokument wird erläutert, wie Sie eine Back-to-Back SHDSL-Verbindung sowohl im EFM- als auch im ATM-Modus einrichten.

Das Beispiel hier zeigt, wie Sie eine Back-to-Back SHDSL-Verbindung im ATM-Modus einrichten.

ATM-Modus

Sie können entweder IP over ATM (IPoA)- oder PPP over ATM (PPPoA)-Lösung implementieren, wenn Sie eine Back-to-Back SHDSL-Verbindung konfigurieren.

1. IPoA-Lösung

- CO-Router:

CO_Router#show running-config

Building configuration...

Current configuration : 1624 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

redundancy

!

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.1 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CO_Router#

- CPE-Router:

CPE_Router#show running-config

Building configuration...

Current configuration : 1538 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

voice-card 0

!

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.2 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

2. PPPoA-Lösung

- CO-Router:

CO_Router#show running-config

Building configuration...

Current configuration : 1779 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

control-plane

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CO_Router#

- CPE-Router:

CPE_Router#show running-config

Building configuration...

Current configuration : 1693 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

3. PPPoE over ATM-Lösung

- CO-Router:

CO_Router#show running-configuration

Building configuration...

Current configuration : 2299 bytes

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot-end-marker

!

no aaa new-model

!

username cisco password 0 cisco

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

bba-group pppoe global

virtual-template 1

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

protocol pppoe group global

!

!

interface Virtual-Template1

ip unnumbered Loopback0

ip mtu 1492

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 10.1.1.2 10.1.1.254

!

line con 0

line aux 0

line vty 0 4

login

transport input all

end

CO_Router#

Verification:

CO_Router#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi1.1          -          10.1.1.2        -               -               in

CO_Router#

- CPE-Router:

CPE_Router#show running-config

Building configuration...

Current configuration : 2554 bytes

!

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/2

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

pppoe-client dial-pool-number 1

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco

ppp chap password 0 cisco

!

!

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CPE_Router#

Verification:

CPE_Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Embedded-Service-Engine0/0 unassigned      YES NVRAM  administratively down down

ATM0/1/0                   unassigned      YES unset  up                    up

ATM0/1/0.1                 unassigned      YES unset  up                    up

Dialer1                    10.1.1.2        YES IPCP   up                    up

Virtual-Access1            unassigned      YES unset  up                    up

CPE_Router#

EFM-Modus

Sie können entweder IPoE- oder PPPoE-Lösungen implementieren, wenn Sie eine Back-to-Back-SHDSL-Verbindung konfigurieren.

1. IPoE-Lösung

- CO-Router:

CO_Router#show running-config

Building configuration...

Current configuration : 2194 bytes

!

! Last configuration change at 14:56:53 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

cts logging verbose

!

!

redundancy

!

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

ip address 1.1.1.1 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE-Router:

CPE_Router#show running-config

Building configuration...

Current configuration : 1646 bytes

!

! Last configuration change at 14:50:55 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

redundancy

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

2. PPPoE-Lösung

- CO-Router:

CO_Router#show running-config

Building configuration...

Current configuration : 1851 bytes

!

! Last configuration change at 15:00:06 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

bba-group pppoe global

virtual-template 1

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

pppoe enable group global

!

interface Virtual-Template1

mtu 1492

ip unnumbered Ethernet0/3/0

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 1.1.1.1

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE-Router:

CPE_Router#show running-config

Building configuration...

Current configuration : 2310 bytes

!

! Last configuration change at 15:10:04 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

!

!

!

!

cts logging verbose

!

!

voice-card 0

!

!

!

!

!

redundancy

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

!

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

!

!

control-plane

!

!

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

1. Um zu überprüfen, ob sich der Router im CO-Modus befindet, führen Sie den Befehl show aus. Die CO-Terminierungsleitung in der Ausgabe (im Beispiel fett formatiert) zeigt an, dass sich der Router im CO-Modus befindet. Der Standardmodus ist CPE. Ein Teil der Ausgabe wird hier nicht angezeigt, aus Gründen der Kürze.

CO# show controllers shdSL 0/1/0

Controller SHDSL 0/1/0 is UP

Hardware is EHWIC-4SHDSL-EA, rev 0 on slot 0, hwic slot 1

Capabilities: EFM: 2-wire, EFM-Bond, Annex A, B, F & G

ATM: 2-wire, Mpair, IMA, Annex A, B, F & G

- CO-Terminierung:

cdb=0x3CF085F0, plugin=0x21C33C1C, ds=0x21C33C68 base=0x10200000

FPGA Version is A14

NPU Source: System

NPU Firmware version: SHDSL_EA_FW_20130116053038

Vendor: Infineon, Chipset: SOCRATES-4e

PHY Source: System

IDC Firmware version: 1.7.5.0

DFE Firmware version: 1.1-1.7.5__002

Firmware reload mode: Auto

<Output abbreviated due to space constraints>

2. Führen Sie im EFM-Modus den Befehl show controller ethernet zur Überprüfung aus.

3. Führen Sie im ATM-Modus den Befehl show controller atm zur Überprüfung aus.

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- Detaillierte Informationen zur Fehlerbehebung bei SHDSL-Verbindungen finden Sie unter Konfigurieren von Cisco G.SHDSL EFM/ATM EHWICs in Cisco Routern.

- Weitere Informationen zur Fehlerbehebung im Zusammenhang mit PPP finden Sie im Flussdiagramm zur PPP-Fehlerbehebung.

- Technischer Support und Dokumentation - Cisco Systems