Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Sicherungsverfahren

Wiederherstellungsverfahren

Ähnliche Artikel

Einführung

Dieses Dokument beschreibt einen Prozess zur Verwendung des Disaster Recovery System (DRS) für Backup- und Wiederherstellungsvorgänge auf dem Cisco Unified Communications Manager (CUCM) mit Befehlszeilenschnittstelle (CLI).

Erstellt von Joy Pal, herausgegeben von Alexander Levichev und Deepak kumar

Voraussetzungen

Für dieses Dokument bestehen keine Voraussetzungen.

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Hintergrundinformationen

Administratoren führen normalerweise Datensicherungs- und Wiederherstellungsvorgänge über die grafische Benutzeroberfläche des Disaster Recovery System (DRS) aus.

Es gibt viele Fälle, in denen ein Administrator aufgrund eines Netzwerkproblems oder wenn der Cisco Tomcat-Dienst nicht ausgeführt wird keine Möglichkeit hat, sich bei der Webseite des Disaster Recovery System (DRS) anzumelden.

In diesen Fällen kann der Administrator mithilfe der Befehle Disaster Recovery System (DRS) und Command Line Interface (CLI) Sicherungs- oder Wiederherstellungsvorgänge ausführen.

Sicherungsverfahren

1. Hinzufügen eines Sicherungsgeräts

Syntax:

utils disable_restore device add network <backup device name> <path> <ip-Adresse des Remote-Servers> <Benutzername> [Anzahl der Sicherungen]

Beispiel:

admin:utils disaster_recovery device add network linuxbox ./ 10.48.53.123 ccmadmin

Please enter password to connect to network server 10.48.53.123:****

drfCliMsg: Backup Device has been saved successfully.

2. Überprüfen Sie das hinzugefügte Gerät.

Syntax:

utils Liste der Disaster_Recovery-Geräte

Beispiel:

admin:utils disaster_recovery device list

Device Name             Device Type             Device Path

--------------------------------------------------------------

linuxbox                NETWORK                 ./

3. Erstellen Sie eine Datensicherung.

Syntax:

utils storage backup network <featurelist> <backup device name>

FeatureList - Kommagetrennte Liste der zu sichernden Funktionen. Verwenden Sie "utils disable_restore show_registration <servername>", um die Liste der registrierten Funktionen anzuzeigen.

Beispiel:

admin:utils disaster_recovery backup network UCM,CDR_CAR,PLM linuxbox

drfCliMsg: Backup initiated successfully. Please run 'utils disaster_recovery status backup' command to see the status

<p style="background-image: url('http://www.cisco.com/en/US/i/templates/warn.gif'); background-repeat: no-repeat; background- position: 2px 4px;

height: auto; width: auto; padding: 10px 5px 10px 35px; margin-top: 10px; margin-bottom: 10px; border-top: 1px solid #ccc; border-bottom: 1px

solid #ccc; overflow-x: hidden;"><strong>Warning</strong>: {The DRS Backup archive encryption depends on the current security password (Provided at the time of install). During a restore, you could be prompted to enter this security password if this password has been changed.}</p>

4.Überprüfen Sie den Status einer Sicherung.

Syntax:

utils backup_restore status

Beispiel:

admin:utils disaster_recovery status backup

Status: SUCCESS :Backup Completed...

Tar Filename: 2017-08-18-12-17-19.tar

Storage Location: NETWORK

Operation: backup

Percentage Complete: 100

PLM CUCM160 ELM-AGENT SUCCESS Fri Aug 18 12:17:19 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_plm_elm-agent.log

PLM CUCM160 ELM-SERVER SUCCESS Fri Aug 18 12:17:21 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_plm_elm-server.log

CDR_CAR CUCM160 CAR SUCCESS Fri Aug 18 12:17:27 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_cdr_car_car.log

UCM CUCM160 BAT SUCCESS Fri Aug 18 12:19:23 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_bat.log

UCM CUCM160 CCMPREFS SUCCESS Fri Aug 18 12:19:25 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ccmprefs.log

UCM CUCM160 PLATFORM SUCCESS Fri Aug 18 12:19:30 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_platform.log

UCM CUCM160 TCT SUCCESS Fri Aug 18 12:19:34 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_tct.log

UCM CUCM160 SYSLOGAGT SUCCESS Fri Aug 18 12:19:35 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_syslogagt.log

UCM CUCM160 CDPAGT SUCCESS Fri Aug 18 12:19:36 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_cdpagt.log

UCM CUCM160 CLM SUCCESS Fri Aug 18 12:19:37 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_clm.log

UCM CUCM160 CCMDB SUCCESS Fri Aug 18 12:19:37 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ccmdb.log

UCM CUCM160 TFTP SUCCESS Fri Aug 18 12:20:15 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_tftp.log

UCM CUCM160 ANN SUCCESS Fri Aug 18 12:21:33 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ann.log

UCM CUCM160 MOH SUCCESS Fri Aug 18 12:21:34 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_moh.log

Wiederherstellungsverfahren

1. Überprüfen Sie die auf einem Remote-SFTP-Server vorhandenen Backup-Dateien.

Syntax:

utils disable-restore show_backupfiles <Name des Backup-Geräts>

Beispiel:

admin:utils disable-restore show_backupfiles linux123

18.08.2017, 14.04.2015

18.08.2017 12.17.2019

2. Stellen Sie das System aus der Sicherung wieder her

Wählen Sie eine Sicherungsdatei aus der vorherigen Ausgabe aus.

Syntax:

utils disable_restore network <IP-Adresse des Remote-Servers> <tarfilename> <Name des Backup-Geräts>

Beispiel:

admin:utils disaster_recovery restore network 10.48.53.160 2017-08-18-14-45-38 linux123

drfCliMsg: WARNING! There are nodes in current production cluster but NOT present in the backup. These nodes will be removed if you restore the Publisher. If you want to keep these nodes, you will need to manually re-add them after the restore.

Do you want DRS to perform a SHA-1 File Integrity Check of your backup archives y/n ?(n) : y

Please enter the comma seperated features you wish to restore. Valid features for server CUCM160 are PLM,CDR_CAR,UCM:PLM,CDR_CAR,UCM

Do you want to restore database from the subscriber y/n ?(n) : n

drfCliMsg: Restore initiated successfully. Please run 'utils disaster_recovery status restore' command to see the status

ALERT: Please restart the server(s) before performing the next restore for changes to take effect. In case of a cluster, restart the entire cluster.

<p style="background-image: url('http://www.cisco.com/en/US/i/templates/note.gif'); background-repeat: no-repeat; background- position: 2px 4px;

height: auto; width: auto; padding: 10px 5px 10px 35px; margin-top: 10px; margin-bottom: 10px; border-top: 1px solid #ccc; border-bottom: 1px

solid #ccc; overflow-x: hidden;"><strong>Note</strong>: {If you are restoring the system to be in FIPS mode, please note that it will be enabled during this restore, but will not take effect until the next reboot..}</p>

3. Überprüfen Sie den Wiederherstellungsstatus

Ein Wiederherstellungsverfahren kann je nach Datenbankgröße Zeit dauern.

Syntax:

utils aster_Recovery-Statuswiederherstellung

Beispiel:

admin:utils disaster_recovery status restore

Status: SUCCESS :Restore Completed...

Tar Filename: 2017-08-18-14-45-38.tar

Storage Location: NETWORK

Operation: restore

Percentage Complete: 100

CDR_CAR   CUCM160   CAR   SUCCESS   Fri Aug 18 15:20:15 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_cdr_car_car.log

PLM   CUCM160   ELM-AGENT   SUCCESS   Fri Aug 18 15:24:34 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_plm_elm-agent.log

PLM   CUCM160   ELM-SERVER   SUCCESS   Fri Aug 18 15:24:34 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_plm_elm-server.log

UCM   CUCM160   BAT   SUCCESS   Fri Aug 18 15:27:06 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_bat.log

UCM   CUCM160   CCMPREFS   SUCCESS   Fri Aug 18 15:27:06 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ccmprefs.log

UCM   CUCM160   PLATFORM   SUCCESS   Fri Aug 18 15:27:13 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_platform.log

UCM   CUCM160   TCT   SUCCESS   Fri Aug 18 15:32:15 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_tct.log

UCM   CUCM160   SYSLOGAGT   SUCCESS   Fri Aug 18 15:34:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_syslogagt.log

UCM   CUCM160   CDPAGT   SUCCESS   Fri Aug 18 15:34:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_cdpagt.log

UCM   CUCM160   CLM   SUCCESS   Fri Aug 18 15:37:03 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_clm.log

UCM   CUCM160   CCMDB   SUCCESS   Fri Aug 18 15:37:05 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ccmdb.log

UCM   CUCM160   TFTP   SUCCESS   Fri Aug 18 15:45:12 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_tftp.log

UCM   CUCM160   ANN   SUCCESS   Fri Aug 18 15:46:38 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ann.log

UCM   CUCM160   MOH   SUCCESS   Fri Aug 18 15:46:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_moh.log

Ähnliche Artikel

Referenzhandbuch zur Befehlszeilenschnittstelle für Cisco Unified Communications-Lösungen

Disaster Recovery System Administration Guide for Cisco Unified Communications Manager and IM & Presence Service