Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Problem

Lösung

Problem

Lösung

Einführung

In diesem Dokument wird beschrieben, wie Sie Prime Collaboration Assurance (PCA)-Probleme beheben und gleichzeitig den Cisco Unified Communications Manager (CUCM) und Prime License Manager (PLM) hinzufügen können. Der Bestand zeigt das Gerät als "Nicht-Cisco" an. in der Erwägung, dass es sich um eine CUCM-Anwendung oder PLM handelt.

Unterstützt von Michal Myszor und Andrea Cingolani, Cisco TAC Engineers.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Dieses Dokument gilt für:

- PCA 11.X Managed Service Provider Mode (MSP)

- Hosted Collaboration Mediation Fulfillment (HCM-F) 10.6.x

- Cisco Unified Communications Manager (CUCM) 11.5.X

- Standalone PLM 11.5.X

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Problem

Das CUCM-Gerät wird auf der Bestandsseite oder in der Geräteansicht als "Nicht Cisco" angezeigt, wenn PCA den Gerätetyp nicht auf der Grundlage von SNMP-Abfragen ermitteln kann.

PCA-Bestand wird angezeigt:

Dasselbe wird in der Ansicht Gerät 360 angezeigt:

Das AccessLevelDiscovery-Protokoll zeigt Folgendes an:

12-Sep-2017|15:25:43.003|DEBUG|AccessLevelDiscovery|pool-4-thread-4|work() : Starting Access Level Discovery for device  10.48.55.29

12-Sep-2017|15:25:43.003|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.AbstractDiscoveryStage|updateStatusReason|41| Later Error Index for device 10.48.55.29 is 1022 Old Message

12-Sep-2017|15:25:43.003|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.AbstractDiscoveryStage|updateStatusReason|94| Error Index for device 10.48.55.29 is 1022 New Message Discovery in progress.

12-Sep-2017|15:25:43.003|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : Started for device  10.48.55.29

12-Sep-2017|15:25:43.003|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : Matching credentials for  10.48.55.29

12-Sep-2017|15:25:43.003|ERROR|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|getFinalDeviceCredentialsList|709| Ignoring the DEFAULT profile as the snmp community string is not provided.

12-Sep-2017|15:25:43.005|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|getFinalDeviceCredentialsList|760| probeAccessLevel() : CmDevice Credentials List size : 0

12-Sep-2017|15:25:43.006|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|probeAccessLevel|231| Before classificationOfDeviceType,  device credential id is 6429244

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : isDeviceTypeReDiscoveryEnabled flag has set to true or mode is MSP -  10.48.55.29  device type is re-initilize to Unknown.

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : ******* CmDevice Type Classification - STARTS [ 10.48.55.29 ]*******

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : DeviceType is null/Other/Unknown for device  10.48.55.29

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : Running device type classification for device  10.48.55.29

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|167| getDeviceType() : For device 10.48.55.29 - Find the device Type

12-Sep-2017|15:25:43.007|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|169| getDeviceType() : For device 10.48.55.29; DC PROFILE NAME : 10.48.55.29

12-Sep-2017|15:25:43.007|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|217| DC Id: 6429244

12-Sep-2017|15:25:43.008|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.access.DeviceUtil|getSysOID|759| DeviceUtil.getSysOID:Before invoking PAL for SysOID10.48.55.29

12-Sep-2017|15:25:43.077|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.access.DeviceUtil|getSysOID|766| DeviceUtil.getSysOID:After involking PAL: sysOID =1.3.6.1.4.1.9.1.1348 Ip Address 10.48.55.29

12-Sep-2017|15:25:43.107|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|240| getDeviceType(): SysOID and SysDescr are fetched from device 10.48.55.29

12-Sep-2017|15:25:43.107|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|241| getDeviceType(): SysOID   : 1.3.6.1.4.1.9.1.1348

12-Sep-2017|15:25:43.107|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|242| getDeviceType(): SysDescr : Linux release:2.6.32-431.20.3.el6.x86_64 machine:x86_64

12-Sep-2017|15:25:43.108|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|268| Device type of profile is null

12-Sep-2017|15:25:43.108|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceSwitchType|getDeviceType|17| Checking is Switch Type check for 10.48.55.29

12-Sep-2017|15:25:43.108|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceRouterType|getDeviceType|17| Checking is Router Type for 10.48.55.29

(...)

12-Sep-2017|15:25:44.548|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceUC500SeriesType|getDeviceType|19| DeviceUC500SeriesType:getDeviceType

12-Sep-2017|15:25:44.548|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceUC500SeriesType|getDeviceType|26| DeviceGroup- Call Control : DeviceName - Cisco CallManager

12-Sep-2017|15:25:44.637|ERROR|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceESXType|checkifESX|65| Exception in checkIfESXnull

12-Sep-2017|15:25:44.692|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceCIMType|checkIfCIM|61| checkIfCIM ()

12-Sep-2017|15:25:45.390|INFO |AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceSOFTSWITCHType|getDeviceType|42| From DeviceSOFTSWITCHType

12-Sep-2017|15:25:45.390|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceSOFTSWITCHType|checkIfSoftSwitch|60| checkIfSoftSwitch ()

12-Sep-2017|15:25:46.070|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceSOFTSWITCHType|getDeviceType|51| Device 10.48.55.29 is not a SOFTSWITCH

12-Sep-2017|15:25:46.070|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.impl.DeviceNonCiscoType|getDeviceType|32| DeviceNonCiscoType: device Type is Non Cisco

12-Sep-2017|15:25:46.139|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceTypeGeneratorManager|getDeviceType|175| probeAccessLevel() : Found DeviceType NONCISCO for device 10.48.55.29

12-Sep-2017|15:25:46.139|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|classificationOfDeviceType|339| probeAccessLevel() : ******* CmDevice Type Classification - ENDS *******

12-Sep-2017|15:25:46.140|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|probeAccessLevel|244| After classificationOfDeviceType,  device credential id is 6429244

12-Sep-2017|15:25:46.140|DEBUG|AccessLevelDiscovery|pool-4-thread-4|com.cisco.nm.emms.inv.access.core.DeviceAccessLevelDiscovery$MyWorkItem|probeAccessLevel|251| After resetting to original  id,  device credential id  is 6429244

12-Sep-2017|15:25:46.140|DEBUG|AccessLevelDiscovery|pool-4-thread-4|probeAccessLevel() : DC  10.48.55.29  with type  null NOT matched CmDevice  10.48.55.29  with type NONCISCO

Lösung

Überprüfen Sie, ob der SNMP-Dienst auf der UC-Anwendung ausgeführt wird.

Hinweis: Cisco CUCM verfügt über zwei SNMP-Services.

SNMP Master Agent[STARTED]

(...)

Cisco CallManager SNMP Service[STOPPED]  Service Not Activated

Der Cisco CallManager SNMP Service ist für die Beantwortung von Cisco-spezifischen MIB-SNMP-Abfragen verantwortlich.

Der Ausfall des SNMP-Services ist bereits in PCA 11.6 behoben, und es wird empfohlen, den SNMP-Dienst auszuschalten:

11-Sep-2017|12:56:52.752|DEBUG|AccessLevelDiscovery|pool-6-thread-10|com.cisco.nm.emms.inv.AbstractDiscoveryStage|updateStatusReason|109| Error Index for device 10.48.50.59 is 1003 New Message SNMP timed out. Probable reasons could be: 1. SNMP service not enabled in the device. 2. SNMP credentials do not match. 3. Firewall settings blocking the port. Refer the Install and Upgrade guide for the exact ports to be unblocked.

Problem

Das PLM-Gerät wird auf der Seite "Inventory" (Inventar) als "Non Cisco" (Nicht Cisco) angezeigt.

Lösung

1. Wählen Sie den PLM-Server auf der Bestandsseite aus, und setzen Sie das Gerät aus.

2. Löschen Sie das Gerät aus dem PCA-Bestand.

3. Löschen Sie einen in der PLM hinzugefügten Community String über die Befehlszeilenschnittstelle (CLI):

utils snmp config 1/2c community-string delete

4. Fügen Sie das Gerät mithilfe der Plattform crendential (OS PLM CLI) wieder in das PCA-Feld (HTTP(s) PCA-Geräteanmeldeinformationen (PCA) ein, wie im Bild gezeigt.