Inhalt

Einführung

vPC-Objektverfolgung

Netzwerkdiagramm

Baseline-Show-Befehle

Einführung

In diesem Dokument werden die vPC-Objektverfolgung, ihre Verwendung und ihre Funktionsweise beschrieben.

vPC-Objektverfolgung

Netzwerkdiagramm

Das für diese Demonstration verwendete Netzwerkdiagramm ist wie folgt:

Die vPC-Peer-Verbindung ist Port-Channel 1.  Ethernet 5/1 ist die vPC Peer-Keepalive-Verbindung.  Es gibt zwei Core-Router, die über L3/30-Verbindungen e3/3 und e3/4 an jedem N7K-Gerät angeschlossen sind.  N5KA und N5KB simulieren L2-Switches vPC, die auf vPC 100 und vPC 101 angeschlossen sind.  N7KA ist das primäre vPC-Gerät.

Baseline-Show-Befehle

N7KA:

N7KA-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:51:57 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.2 source 1.1.1.1 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KA-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:51:59 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KA-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:24:08

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:26:59

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:48

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:53:17 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.1 source 1.1.1.2 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KB-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:53:20 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KB-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:25:51

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:29:09

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:55

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:56

Tracked by:

Track List  1

N7KB-vdc2#

vPC-Objektverfolgung wird in einem Szenario wie diesem verwendet.  Es wird ein M132-Modul für die vPC-Peer-Verbindung sowie die L3-Uplinks zum Core verwendet.  Wenn Sie aufgrund eines HW-Fehlers das M132-Modul verlieren, gehen sowohl die vPC-Peer-Verbindung als auch die L3-Uplinks verloren.  Wenn dies auf der sekundären vPC-Box (N7KB) der Fall wäre, wäre dies kein Problem, da der primäre betriebliche Peer die vPC-Port-Channels und VLAN-Schnittstellen auf der sekundären betrieblichen Ebene außer Kraft setzen würde.  Das Problem besteht im Fall eines Hardware-Ausfalls auf dem operativen primären Gerät (N7KA).  Wenn Sie die Objektverfolgung nicht verwenden, werden alle vPC-Port-Channels auf N7KB sowie die VLAN-Schnittstellen außer Kraft gesetzt.  Die Peer-Verbindung ist ebenfalls inaktiv.  In diesem Szenario wäre es nicht möglich, den Core-Datenverkehr in unsere vPC-VLANs zu leiten.

Die Objektverfolgung umgeht dies, indem sie vPC auf den betriebsbereiten primären Switch herunterfährt, sodass wir nicht in dieses Szenario gelangen, in dem die VLAN-Schnittstellen und vPC-Port-Channels auf dem Gerät heruntergefahren werden, das die verbleibenden Uplinks zum Kern hat.

Hier sehen Sie die vPC-Peer-Keepalive-Nachrichten mit Ethanalyzer:

N7KA# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:01:09.629309      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:09.954909      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.639097      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.954944      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KA#

N7KB# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:00:22.606593      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:22.922517      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.616427      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.922557      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KB#

Jetzt simulieren Sie den Ausfall von Modul 3 auf N7KA, indem Sie das Modul ausschalten:

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:03:25 N7KA %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

Protokolle:

N7KA:

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_INITIALIZING: Interface port-channel1 is down (Initializing)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/3 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/4 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel101 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel100 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel101: Ethernet4/7 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel100: Ethernet4/6 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel101: first operational port changed from Ethernet4/7 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel100: first operational port changed from Ethernet4/6 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

N7KB:

2013 Sep 26 20:02:39 N7KB-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:02:40 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:02:40 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/2 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/1 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

Jetzt befinden Sie sich in diesem Zustand.  N7KA ist der primäre vPC-Peer, aber es beendet das Senden von vPC-Peer-Keepalive-Nachrichten an N7KB, sodass N7KB nicht ausgesetzt wird.  N7KB ist das einzige System mit Uplinks.

Hinweis: e3/4 auf N7KB stellt eine Verbindung zu einem anderen VDC auf N7KA her, weshalb auch dieser ausfiel.  Der Punkt ist, dass Sie die Schnittstellen in N7KB und in N7KA nachverfolgt haben, sodass das Senden von Nachrichten an N7KB auf dem Peer-Keepalive-Link gestoppt wird.

Ethanalyzer-Ausgabe von N7KA:

(Nach dem Syslog TRACK_INTFS_DOWN senden wir keine Peer-Keepalive-Nachrichten mehr an N7KB, sondern nur noch von N7KB, das 1.1.1.2 ist.)

2013-09-26 20:03:23.684887      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:23.685766      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.684863      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.685580      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:25 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:03:25 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:03:25.684869      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:25.685771      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.684835      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.685716      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.690661      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.691367      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013-09-26 20:03:28.700594      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:29.700538      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:30.700603      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:31.710665      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:32.720601      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:33.715295      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:34.713112      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:35.713177      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Ethanalyzer-Ausgabe von N7KB:

2013-09-26 20:02:36.651007      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:36.651534      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651053      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651644      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.650967      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.651579      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.656523      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.657500      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

(Here we stop receiving keepalive messages from N7KA or 1.1.1.1):

2013-09-26 20:02:40.666531      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:41.666442      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:42.666479      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:43.676461      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:44.686478      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:02:45 N7KB-vdc2 %$ VDC-2 %$ %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013-09-26 20:02:45.681050      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:46.678911      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:47.678918      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:48.678961      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  down   success     success                    -

101  Po101  down   success     success                    -

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is DOWN

3 changes, last change 00:20:50

Track List Members:

object 4 DOWN

object 3 DOWN

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:20:50

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:57:10

Track List Members:

object 4 DOWN

object 3 UP

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:22:04

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:22:04

Tracked by:

Track List  1

N7KB-vdc2#

Jetzt können Sie das Setup wiederherstellen:

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# no poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:26:53 N7KA %PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of Module 3  from Command Line Interface

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_DETECT: Module 3 detected (Serial number JAF1703ALTD) Module-Type 10 Gbps Ethernet XL Module Model N7K-M132XP-12L

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_PWRUP: Module 3 powered up (Serial number JAF1703ALTD)

2013 Sep 26 20:26:56 N7KA %PLATFORM-5-MOD_STATUS: Module 3 current-status is MOD_STATUS_POWERED_UP

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary, operational secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

4 changes, last change 00:01:44

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:01:40

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:43

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:44

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 1d00h

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:02:07

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:02:09

Tracked by:

Track List  1

N7KB-vdc2#

Details zum vPC-Peer-Keepalive-Ausfall:

Führen Sie den Test erneut aus, um zu sehen, was mit der Peer-Keepalive-Verbindung geschieht.

Senden Sie die Keepliaves bidirektional - derzeit ist alles in Betrieb:

2013-09-26 20:32:12.532319      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:12.533083      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.532485      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.533147      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Fahren Sie jetzt das M132-Modul 3 auf N7KA erneut herunter:

2013 Sep 26 20:32:14 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:32:14.532364      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:14.533217      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.532453      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.533158      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.532452      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.536224      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:32:17 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:17 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:16 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:32:17 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

Nun sehen Sie, dass nur N7KB (1.1.1.2) die Keepalive-Nachrichten an N7KA (1.1.1.1) sendet:

2013-09-26 20:32:17.549161      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:18.549352      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:19.549294      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:20.549358      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:21.549303      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:22.549991      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Hier sehen Sie den Status auf N7KB, der anzeigt, dass die Peer-Keepalive-Funktion fehlgeschlagen ist:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is not reachable through peer-keepalive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#

Nach kurzer Zeit (90 Sekunden) erhalten Sie jetzt wieder Peer-Keepalive-Nachrichten vom N7KA:

<snip>

2013-09-26 20:33:42.630255      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:43.630199      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:44.630263      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:45.640201      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:46.650262      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.652445      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.660318      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.652768      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.653347      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652409      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652705      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652423      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652773      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652401      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652839      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Dann sehen Sie den aktuellen Status auf N7KB (zeigt Peer ist aktiv):

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#