Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Zugehörige Produkte

Konventionen

Hintergrundinformationen

Schrittweise Vorgehensweise zum Ersetzen des Supervisor-Moduls - dasselbe Hybrid-Betriebssystem

Schrittweise Vorgehensweise zum Ersetzen des Supervisor-Moduls - Anderes Hybrid-Betriebssystem

Überprüfen, bevor Sie das neue Supervisor-Modul hinzufügen

Neues Supervisor-Modul hinzufügen

Überprüfen Sie das Supervisor-Modul, nachdem Sie das neue Supervisor-Modul hinzugefügt haben.

Überprüfen Sie MSFC IOS.

Failover auf Standby-Supervisor und Überprüfung

Umbenennen des Catalyst OS

Zugehörige Informationen

Einführung

Dieses Dokument zeigt, wie ein ausgefallenes redundantes Supervisor-Modul bei Catalyst Switches der Serie 6500 ersetzt wird. In diesem Dokument wird das Verfahren für die Supervisor-Module erläutert, die unter Hybrid OS ausgeführt werden.

Voraussetzungen

Anforderungen

Cisco empfiehlt, über Kenntnisse in folgenden Bereichen zu verfügen:

- Konfigurieren der Redundanz

- Konfigurieren von NSF mit SSO MSFC-Redundanz

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco Catalyst Switches der Serie 6500

- Supervisor-Modul: WS-SUP32-GE-3B

- Hybrid-Betriebssystem:

- Catalyst OS 8.5(8)

- MSFC IOS® 12.2(18)SXF7

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Zugehörige Produkte

Dieses Dokument kann auch mit den folgenden Hardware- und Softwareversionen verwendet werden:

- Supervisor 720 mit Hybrid-Betriebssystem

- Supervisor 2 mit Hybrid-Betriebssystem

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Hintergrundinformationen

Dies sind einige der wichtigsten Punkte im Zusammenhang mit redundanten Supervisor-Modulen:

- Auf der Standby-Supervisor Engine ist der Konsolenport inaktiv, der Modulstatus wird als "Standby" angezeigt und der Status der Uplink-Ports wird normal angezeigt.

- Damit Sie das Booten jeder Supervisor Engine separat steuern können, werden die Konfigurationsregister nicht zwischen den Supervisor Engines synchronisiert.

- Wenn sich die Softwareversionen der beiden Supervisor Engines unterscheiden oder die NVRAM-Konfiguration der beiden Supervisor Engines anders ist, lädt die aktive Supervisor Engine automatisch ihr Software-Image und ihre Konfiguration in die Standby-Supervisor Engine.

- Die Supervisor Engines verwenden zwei Flash-Images: das Boot-Image und das Laufzeitbild. Der in der BOOT-Umgebungsvariable angegebene Bootabbild-Dateiname wird im NVRAM gespeichert. Das Laufzeitabbild ist das Boot-Image, das der ROM-Monitor zum Booten der Supervisor Engine verwendet. Nach dem Systemstart befindet sich das Laufzeitbild im dynamischen RAM (DRAM).

- Die redundanten Supervisor Engines müssen vom gleichen Typ mit derselben Modellfunktionskarte sein. Die WS-X6K-SUP1-2GE und die WS-X6K-SUP1A-2GE, die beide ohne Policy Feature Cards (PFCs) auskommen, sind redundant ausgelegt. Bei Supervisor Engines mit PFCs müssen die PFCs aus Redundanzgründen identisch sein (zwei PFCs, zwei PFC2s, zwei PFC3As, zwei PFC3Bs oder zwei PFC3BXLs).

Schrittweise Vorgehensweise zum Ersetzen des Supervisor-Moduls - dasselbe Hybrid-Betriebssystem

In diesem Abschnitt wird Schritt für Schritt beschrieben, wie das Supervisor-Modul 32 in einem Catalyst Switch der Serie 6500 ersetzt wird. In diesem Beispiel wird ein Cisco Catalyst Switch der Serie 6509 verwendet, der über zwei Supervisor-Module in Steckplatz 5 und 6 verfügt. Das Supervisor-Modul in Steckplatz 6 ist ausgefallen. Es wird davon ausgegangen, dass das ausgefallene Supervisor-Modul in Steckplatz 6 aus dem Chassis entfernt wird. Sie sehen das Verfahren zum Hinzufügen des neuen Supervisor-Moduls zu Steckplatz 6.

Wenn Sie über einen zusätzlichen Cisco Catalyst Switch der Serie 6500 verfügen, können Sie den neuen Supervisor am Switch anschließen und ein Upgrade oder ein Downgrade des Hybrid-Betriebssystems auf die gleiche Ebene vornehmen wie der Supervisor in Steckplatz 5 des Produktions-Switches. Wenn das neue Supervisor-Modul dasselbe Hybrid-Betriebssystem enthält, müssen Sie auf dem neuen Supervisor-Modul keine weiteren Einstellungen vornehmen. Wenn Sie das Supervisor-Modul in Steckplatz 6 einsetzen, synchronisiert die aktive Supervisor Engine die Konfiguration automatisch. In diesem Abschnitt werden der schrittweise Prozess und die Checkliste während des Supervisor-Ersatzes dargestellt.

Dies ist das schrittweise Verfahren zum Austausch des Supervisor-Moduls 32 in einem Catalyst Switch der Serie 6500:

1. Fügen Sie das Supervisor-Modul in Steckplatz 6 ein.

Wenn Sie in Steckplatz 6 über eine Konsolenverbindung zum Supervisor verfügen, sollte diese Ausgabe angezeigt werden:

!--- Supervisor module at slot 6

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ############################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor.

Diese Ausgabe zeigt die Konsole des aktiven Supervisors in Steckplatz 5 an:

Access2> (enable)

Access2> (enable)

Access2> (enable) 2007 May 22 19:17:48 %SYS-5-MOD_INSERT:Module

6 has been inserted

Access2> (enable)

Access2> (enable)

Access2> (enable)

%SYS-5-SUP_MODSBY:Module 6 is in standby mode

%SYS-5-SUP_IMGSYNC:File synchronization process will start in 120 seconds

%DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not supported

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not supported

%SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) are up

%SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 6

%DIAG-6-RUN_MINIMUM:Module 16: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 16: Passed Online Diagnostics

%SYS-5-MOD_OK:Module 16(WS-F6K-MSFC2A,SAL1018LQ3C) is online

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration

for module 6

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration for

module 16

%SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

%SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

2. Überprüfen Sie den Supervisor-Redundanzstatus:

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. Überprüfen Sie den MSFC-Redundanzstatus:

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 10 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 10 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

4. Erzwingen Sie Failover und Test für den Supervisor:

!--- Supervisor in slot 5

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

5. In Supervisor 6 einschließen und Supervisor- und MSFC-Konfiguration überprüfen

Schrittweise Vorgehensweise zum Ersetzen des Supervisor-Moduls - Anderes Hybrid-Betriebssystem

In diesem Abschnitt wird das schrittweise Vorgehen zum Ersetzen des Supervisor-Moduls 32 in einem Catalyst Switch der Serie 6500 beschrieben. In diesem Beispiel wird ein Cisco Catalyst Switch der Serie 6509 verwendet, der über zwei Supervisor-Module in den Steckplätzen 5 und 6 verfügt. Das Supervisor-Modul in Steckplatz 6 ist ausgefallen. Es wird davon ausgegangen, dass das ausgefallene Supervisor-Modul in Steckplatz 6 aus dem Chassis entfernt wird. Sie sehen das Verfahren zum Hinzufügen des neuen Supervisor-Moduls zu Steckplatz 6.

Wenn Sie keine Möglichkeit haben, das neue Hybrid-Betriebssystem des Supervisors auf die gleiche Version wie der aktive Supervisor zu aktualisieren, können Sie dieses Verfahren ausführen, um das Supervisor-Modul hinzuzufügen und das Hybrid-Betriebssystem und die Switch-Konfiguration zu synchronisieren. Der Großteil des Verfahrens ist automatisiert. Dieses Dokument zeigt den schrittweisen Prozess und die Checkliste, die während des Supervisor-Ersatzes durchgeführt wird.

Überprüfen, bevor Sie das neue Supervisor-Modul hinzufügen

In diesem Abschnitt wird die Ausgabe des Switches ohne Supervisor in Steckplatz 6 angezeigt.

- Modul anzeigen

- Version anzeigen

- Boot-Variable

1. Modulausgabe anzeigen:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

Access2> (enable)

2. Versionsausgabe anzeigen:

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA034500F5

PS1  Module: WS-CAC-6000W    Serial #: AZS10130G7T

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

2   48   WS-X6248-RJ-45      SAD03431007 Hw : 1.1

Fw : 4.2(0.24)VAI78

Sw : 8.5(8)

3   48   WS-X6348-RJ-45      SAD04150A2T Hw : 1.1

Fw : 5.3(1)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

4   48   WS-X6348-RJ-45      SAD05070CNX Hw : 2.0

Fw : 5.4(2)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

5   9    WS-SUP32-GE-3B      SAL1010F8KG Hw : 4.2

Fw : 12.2

Fw1: 8.5(8)

Sw : 8.5(8)

Sw1: 8.5(8)

WS-F6K-PFC3B        SAL1012GREU Hw : 2.1

Sw :

7   5    WS-SVC-CMM          SAD100707YJ Hw : 2.8

Fw : 12.4(7a),

Sw : 12.4(7a),

15  1    WS-F6K-MSFC2A       SAL1012GG1X Hw : 3.0

Fw : 12.2(18)SXF7

Sw : 12.2(18)SXF7

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

5      262144K 124421K 137723K 249772K   9796K 239976K 2048K  366K 1682K

Uptime is 0 day, 0 hour, 3 minutes

Access2> (enable)

3. Boot-Variable:

!--- Current working directory

Access2> (enable) pwd

bootdisk

!--- Files in the bootdisk

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

!--- Boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootflash:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

Access2> (enable)

Neues Supervisor-Modul hinzufügen

Das Supervisor-Modul wird in Steckplatz 6 eingesetzt. Die Konsolenausgabe der aktiven und Standby-Supervisor-Module beim Hinzufügen des neuen Standby-Supervisor-Moduls zum Switch wird hier angezeigt:

1. Setzen Sie das neue Supervisor-Modul in Steckplatz 6 ein.

Diese Protokollmeldung wird im aktiven Supervisor-Modul angezeigt:

Access2> (enable) 2007 May 21 20:21:14 %SYS-5-MOD_INSERT:Module 6 has been

inserted

Wenn Sie mit 6 in den Standby-Supervisor eingesteckt haben, wird der folgende Bootvorgang angezeigt:

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-4-5.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

######################################################################## [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-4-5.bin

Firmware compiled 02-Aug-05 16:08 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. Sie können den Redundanzstatus vom aktiven Supervisor-Modul an Steckplatz 5 überprüfen.

Access2> (enable) 2007 May 21 20:23:09 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:23:11 %SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-image-incompatible)

Das aktive Supervisor-Modul kopiert CatOS in das Standby-Supervisor-Modul. Außerdem wird die Boot-Variable der Standby-Supervisor Engine auf das neue CatOS konfiguriert.

Access2> (enable)

2007 May 21 20:24:23 %SYS-5-SUP_IMGSYNCFINISH:Active superviso

r has synchronized bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Nachdem das CatOS-Image in den Standby-Supervisor kopiert wurde, wird das Standby-Modul 6 automatisch mit dem neuen Image neu geladen.

This module is now in standby mode.

Console is disabled for standby supervisor

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

3. Sobald das Standby-Modul aktiv ist, können Sie den Redundanzstatus vom aktiven Supervisor-Modul überprüfen.

Access2> (enable) 2007 May 21 20:26:22 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:26:23 %SYS-5-SUP_IMGSYNC:File synchronization process will start

in 120 seconds

2007 May 21 20:27:08 %SYS-1-SYS_LCPERR1:Module 16: RP requested reset of peer RP

: MSFC on module 16 will be reset

2007 May 21 20:27:24 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics..

.

2007 May 21 20:27:24 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not

supported

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not

supported

2007 May 21 20:27:25 %SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) a

re up

2007 May 21 20:27:25 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module

6

2007 May 21 20:28:24 %SYS-5-SUP_IMGSYNCSTART:Active supervisor

is synchronizing bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

2007 May 21 20:28:25 %SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

Access2> (enable) dir 6/

2   -rw-   9356096    May 11 2006 19:04:09 cat6000-sup32pfc3k8.8-4-5.bin

2287   -rw-  10029260    May 21 2007 20:24:10 RTSYNC_cat6000-sup32pfc3k8.8-5-

8.bin

!--- You can see the copied CatOS name starts with RTSYNC_

236900352 bytes available (19390464 bytes used)

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Überprüfen Sie das Supervisor-Modul, nachdem Sie das neue Supervisor-Modul hinzugefügt haben.

Gehen Sie wie folgt vor:

1. Modulausgabe anzeigen:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

2. Überprüfung des Redundanzverlaufs:

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 33291

Redundant History Switchover Table:

Überprüfen Sie MSFC IOS.

Das CatOS wird während des SYNC-Prozesses automatisch kopiert. IOS auf der MSFC wird jedoch nicht automatisch kopiert.

1. Überprüfen Sie das IOS und die Redundanz der MSFC:

!--- 1. Connect to MSFC

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

!--- 2. Verify the IOS file in the bootflash

LAB-Router#dir

Directory of bootflash:/

1  -rwx    17966324  Dec 13 2006 15:12:29 +00:00  c6msfc2a-adventerprisek9_w

an-mz.122-18.SXF7.bin

65536000 bytes total (47569548 bytes free)

!--- 3. Show version output

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 26 minutes

System returned to ROM by power-on

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

!--- 4. MSFC redundancy status

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Route Processor Redundancy

!--- It is running in the RPR mode because the standby MSFC !--- is running different version of IOS.

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY COLD

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-IPBASE_WAN-M),

Version 12.2(18)SXF4, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Mar-06 14:53 by tinhuang

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

!--- Note that the boot variable is blank. The MSFC boots the !--- first IOS image in the bootflash:

LAB-Router#

LAB-Router#exit

Access2> (enable)

2. Aktualisieren Sie das IOS auf der Standby-MSFC.

1. Kopieren Sie das IOS-Image auf die Standby-MSFC:

LAB-Router#copy c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin slavebootflash:/

Destination filename [c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

17966324 bytes copied in 44.180 secs (406662 bytes/sec)

LAB-Router#

!--- Delete the old IOS image. Because the boot variable is blank !--- and the MSFC boots the first IOS image in the bootflash:

LAB-Router#cd slavebootflash:

LAB-Router#delete c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin

Delete filename [c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin]?

Delete slavebootflash:c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin? [confirm]

LAB-Router#

2. Laden Sie das Standby-Supervisor-Modul neu:

LAB-Router#exit

Access2> (enable) reset 6

This command will reset module 6.

Do you want to continue (y/n) [n]? y

2007 May 21 21:14:03 %SYS-5-MOD_RESET:Module 6 reset from Console//

Resetting module 6...

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-not-present)

Access2> (enable)

2007 May 21 21:16:01 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 21:16:02 %SYS-5-SUP_IMGSYNC:File synchronization

process will start

in 120 seconds

2007 May 21 21:16:03 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal

Diagnostics..

.

2007 May 21 21:16:05 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/1 is not supported

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/2 is not supported

2007 May 21 21:16:06 %SYS-5-PORT_SSUPOK:Ports on standby supervisor

(module 6) are up

2007 May 21 21:16:07 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in

sync for Module

6

2007 May 21 21:16:49 %SYS-1-SYS_LCPERR1:Module 16: RP requeste

d reset of peer RP: MSFC on module 16 will be reset

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. Überprüfen Sie das MSFC IOS nach dem Upgrade:

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 17 minutes

Switchovers system experienced = 0

Standby failures = 1

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 17 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

Failover auf Standby-Supervisor und Überprüfung

Jetzt können Sie das Supervisor-Modul per Failover auf das neu hinzugefügte Standby-Supervisor-Modul aktualisieren und testen.

1. Failover des Supervisor-Moduls:

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. Konsolen-in-Supervisor 6, das jetzt das aktive Modul ist.

1. Redundanzstatus:

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 98984

Redundant History Switchover Table:

Index: 1

Previous active supervisor module: 5

Current active supervisor module : 6

Switchover reason                : user initiated

Switchover time                  : Mon May 21 2007, 20:40:37

2. Version anzeigen:

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

3. Boot-Variable:

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

4. Modul anzeigen:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1          Unknown Card                                  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

16  6    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9          Unknown Card                                  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

Access2> (enable)

3. Überprüfen Sie die MSFC:

Access2> (enable) session 16

Trying Router-16...

Connected to Router-16.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 7 minutes

System returned to ROM by Stateful Switchover

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco MSFC2A (R7000) processor (revision MSFC2A) with 458752K/65536K bytes of me

mory.

Processor board ID MSFC2A

R7000 CPU at 300Mhz, Implementation 0x27, Rev 3.3, 256KB L2, 1024KB L3 Cache

Last reset from power-on

SuperLAT software (copyright 1990 by Meridian Technology Corp).

X.25 software, Version 3.0.0.

Bridging software.

TN3270 Emulation software.

29 Virtual Ethernet/IEEE 802.3 interfaces

509K bytes of non-volatile configuration memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2102

Umbenennen des Catalyst OS

Sie sehen, dass der CatOS-Name im ersetzten Supervisor-Modul mit RTSYNC beginnt. Sie können das System so ausführen lassen, wie es ist. Sie können den Dateinamen auch ändern und als Standardnamen beibehalten, wie hier gezeigt:

Access2> (enable) rename RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

cat6000-sup32pfc3k 8.8-5-8.bin

Access2> (enable) dir

2287   -rw-  10029260    May 21 2007 21:40:01 cat6000-sup32pfc3k8.8-5-8.bin

236900352 bytes available (19390464 bytes used)

Access2> (enable)

Nachdem Sie die Datei umbenannt haben, müssen Sie die Boot-Variable ändern.

!--- Verify boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

!--- Clear all the boot variables

Access2> (enable) clear boot system all

BOOT variable =

Access2> (enable) 2007 May 21 21:41:56 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Configure the boot variable

Access2> (enable) set boot system flash bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

Access2> (enable) 2007 May 21 21:42:14 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Verify the boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

Zugehörige Informationen

- Catalyst Switches der Serien 6000/6500 mit redundanten Supervisor Engines - Software Image Upgrade - Konfigurationsbeispiel

- Cisco Catalyst Switches der Serie 6500 - Support-Dokumente

- Support-Seiten für LAN-Produkte

- Support-Seite für LAN-Switching

- Technischer Support und Dokumentation - Cisco Systems