Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Konfigurieren

Konfigurationsbeispiel 1: Warteschlangenbandbreite

Konfigurationsbeispiel 2: Bandbreite und Puffer

Überprüfen

Fehlerbehebung

Einführung

In diesem Dokument wird beschrieben, wie Quality of Service (QoS) auf Cisco Catalyst 6800ia-Host-Ports konfiguriert, verifiziert und Fehler behoben werden. QoS wird von 6800ia-Host-Ports in der Cisco IOS® Softwareversion 152.1.SY und höher in einem übergeordneten Virtual Switching System (VSS) des Catalyst 6800 unterstützt.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco IOS® Softwareversion 152.1.SY

- Cisco Catalyst 6800 übergeordnetes VSS

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Hintergrundinformationen

Der Konfigurationsmodus auf einem Catalyst 6800ia ist deaktiviert, und alle QoS-Konfigurationen für 6800ia-Host-Ports müssen vom übergeordneten Gerät ausgeführt werden. QoS für den Host-Port 6800ia wird mit einer Richtlinienzuweisung konfiguriert. Bei Anwendung auf die Schnittstellen leitet diese Richtlinienzuordnung die relevante Konfiguration intern an die 6800ia weiter und programmiert anschließend die Hardware-Warteschlangen.

6800ia-Host-Ports verfügen über eine 1p3q3t-Architektur in Übertragungsrichtung (TX). Alle Konfigurationsbeispiele in diesem Dokument gelten nur für TX-Warteschlangen auf einem 6800ia.

Wenn auf den 6800ia-Schnittstellen im Standardzustand keine explizite QoS-Konfiguration vorhanden ist, kann die 6800ia-Hostschnittstelle ähnlich der folgenden Beispielausgabe aussehen:

6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

end

6880-VSS#show queueing interface gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:  100[queue 2] 100[queue 3] 100[queue 4]   0[queue 5]

queue-limit ratios:     15[Pri Queue]  25[queue 2]  40[queue 3]  20[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32 33 40 41 42 43 44 45 46 47

1     2

1     3

2     1      16 17 18 19 20 21 22 23 26 27 28 29 30 31 34 35 36 37 38 39

2     2      24

2     3      48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

3     1      25

3     2

3     3      0 1 2 3 4 5 6 7

4     1      8 9 11 13 15

4     2      10 12 14

4     3

Konfigurieren

Konfigurationsbeispiel 1: Warteschlangenbandbreite

Dieses Beispiel zeigt, wie Sie Bandbreiten für 6800ia TX-Warteschlangen konfigurieren können:

1. Konfigurieren Sie Klassenzuordnungen zur Klassifizierung von interessantem Datenverkehr:
class-map type lan-queuing match-any ltest

match dscp 32

class-map type lan-queuing match-any ltest1

match dscp 24

class-map type lan-queuing match-any ltest2

match dscp default

2. Zuweisung von Priorität und Bandbreite zu konfigurierten Klassen:
policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

class type lan-queuing ltest1

bandwidth remaining percent 30

class type lan-queuing ltest2

bandwidth remaining percent 20

class class-default

3. Wenden Sie Policy-Map auf die betreffende 6800ia-Schnittstelle an:
Hinweis: Wenn Sie eine Richtlinienzuweisung für LAN-Warteschlangen auf einen Port in einem 6800ia-Stack anwenden, werden die Änderungen an alle Ports im Stack weitergeleitet.

6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)#service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1 Gi101/1/0/2 Gi101/1/0/3

Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8 Gi101/1/0/9 Gi101/1/0/10

Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16 Gi101/1/0/17

Gi101/1/0/18 Gi101/1/0/19 Gi101/1/0/20 Gi101/1/0/21 Gi101/1/0/22 Gi101/1/0/23

Gi101/1/0/24 Gi101/1/0/25 Gi101/1/0/26 Gi101/1/0/27 Gi101/1/0/28 Gi101/1/0/29

Gi101/1/0/30 Gi101/1/0/31 Gi101/1/0/32 Gi101/1/0/33 Gi101/1/0/34 Gi101/1/0/35

Gi101/1/0/36 Gi101/1/0/37 Gi101/1/0/38 Gi101/1/0/39 Gi101/1/0/40 Gi101/1/0/41

Gi101/1/0/42 Gi101/1/0/43 Gi101/1/0/44 Gi101/1/0/45 Gi101/1/0/46 Gi101/1/0/47 Gi101/1/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/2/0/1 Gi101/2/0/2

Gi101/2/0/3 Gi101/2/0/4 Gi101/2/0/5 Gi101/2/0/6 Gi101/2/0/7 Gi101/2/0/8

Gi101/2/0/9 Gi101/2/0/10 Gi101/2/0/11 Gi101/2/0/12 Gi101/2/0/13 Gi101/2/0/14

Gi101/2/0/15 Gi101/2/0/16 Gi101/2/0/17 Gi101/2/0/18 Gi101/2/0/19 Gi101/2/0/20

Gi101/2/0/21 Gi101/2/0/22 Gi101/2/0/23 Gi101/2/0/24 Gi101/2/0/25 Gi101/2/0/26

Gi101/2/0/27 Gi101/2/0/28 Gi101/2/0/29 Gi101/2/0/30 Gi101/2/0/31 Gi101/2/0/32

Gi101/2/0/33 Gi101/2/0/34 Gi101/2/0/35 Gi101/2/0/36 Gi101/2/0/37 Gi101/2/0/38

Gi101/2/0/39 Gi101/2/0/40 Gi101/2/0/41 Gi101/2/0/42 Gi101/2/0/43 Gi101/2/0/44

Gi101/2/0/45 Gi101/2/0/46 Gi101/2/0/47 Gi101/2/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/3/0/1 Gi101/3/0/2

Gi101/3/0/3 Gi101/3/0/4 Gi101/3/0/5 Gi101/3/0/6 Gi101/3/0/7 Gi101/3/0/8

Gi101/3/0/9 Gi101/3/0/10 Gi101/3/0/11 Gi101/3/0/12 Gi101/3/0/13 Gi101/3/0/14

Gi101/3/0/15 Gi101/3/0/16 Gi101/3/0/17 Gi101/3/0/18 Gi101/3/0/19 Gi101/3/0/20

Gi101/3/0/21 Gi101/3/0/22 Gi101/3/0/23 Gi101/3/0/24 Gi101/3/0/25 Gi101/3/0/26

Gi101/3/0/27 Gi101/3/0/28 Gi101/3/0/29 Gi101/3/0/30 Gi101/3/0/31 Gi101/3/0/32

Gi101/3/0/33 Gi101/3/0/34 Gi101/3/0/35 Gi101/3/0/36 Gi101/3/0/37 Gi101/3/0/38

Gi101/3/0/39 Gi101/3/0/40 Gi101/3/0/41 Gi101/3/0/42 Gi101/3/0/43 Gi101/3/0/44

Gi101/3/0/45 Gi101/3/0/46 Gi101/3/0/47 Gi101/3/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/4/0/1 Gi101/4/0/2

Gi101/4/0/3 Gi101/4/0/4 Gi101/4/0/5 Gi101/4/0/6 Gi101/4/0/7 Gi101/4/0/8

Gi101/4/0/9 Gi101/4/0/10 Gi101/4/0/11 Gi101/4/0/12 Gi101/4/0/13 Gi101/4/0/14

Gi101/4/0/15 Gi101/4/0/16 Gi101/4/0/17 Gi101/4/0/18 Gi101/4/0/19 Gi101/4/0/20

Gi101/4/0/21 Gi101/4/0/22 Gi101/4/0/23 Gi101/4/0/24 Gi101/4/0/25 Gi101/4/0/26

Gi101/4/0/27 Gi101/4/0/28 Gi101/4/0/29 Gi101/4/0/30 Gi101/4/0/31 Gi101/4/0/32

Gi101/4/0/33 Gi101/4/0/34 Gi101/4/0/35 Gi101/4/0/36 Gi101/4/0/37 Gi101/4/0/38

Gi101/4/0/39 Gi101/4/0/40 Gi101/4/0/41 Gi101/4/0/42 Gi101/4/0/43 Gi101/4/0/44

Gi101/4/0/45 Gi101/4/0/46 Gi101/4/0/47 Gi101/4/0/48

6880-VSS(config-if)#

6880-VSS(config-if)#end

4. Überprüfen Sie, ob die Richtlinienzuordnung angewendet wird:
6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

service-policy type lan-queuing output ltest

end

5. Überprüfen Sie die Klassenzuordnung auf Warteschlangenzuordnung, Bandbreiten- und Pufferzuweisungen sowie die Warteschlangenzuordnung zu Differentiated Services Code Point (DSCP)-Zuordnung:
6880-VSS#show queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue] 100[queue 2] 100[queue 3] 100[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22

23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41 42 43

44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

6. Puffer und Bandbreitenzuweisungen aus dem 6800ia doppelt prüfen:
Hinweis: Wenn Sie für eine bestimmte Klasse kein Puffergewicht angeben, dauert es standardmäßig 100 %.

Warteschlange 1: 15 / [15+100+100+100] = 4

Warteschlange 2: 100 / [15+100+100+100] ~ 31

Die Gewichtung wird auch für andere Warteschlangen abgeleitet.

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 buffer

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 4 31 31 34

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

7. Überprüfen Sie, ob der interessierte Datenverkehr in die entsprechende Warteschlange aufgenommen wird und Verwerfungen auftreten:
6880-VSS#remote command fex 101 show mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           13            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0      9118500

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0       516236            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           20            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :         106            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :          41            0            0      9118505       516236

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:      516255          35           5

queue 1:          12           0           0

queue 2:           0           0           0

queue 3:     9118520           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0           0           0

queue 1:           0           0           0

queue 2:           0           0           0

queue 3:       49823            0           0

Policer: Inprofile:            0 OutofProfile:            0

Konfigurationsbeispiel 2: Bandbreite und Puffer

Dieses Beispiel zeigt, wie Sie Bandbreiten und Puffer für 6800ia-TX-Warteschlangen konfigurieren können:

1. In der in Beispiel 1 erstellten Richtlinienzuordnung können Sie Warteschlangenpufferzuweisungen angeben, wie im folgenden Beispiel gezeigt wird:
Hinweis: Wenn Sie für eine bestimmte Klasse kein Puffergewicht angeben, dauert es standardmäßig 100 %.

policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

queue-buffers ratio 15

class type lan-queuing ltest1

bandwidth remaining percent 30

queue-buffers ratio 30

class type lan-queuing ltest2

bandwidth remaining percent 20

queue-buffers ratio 40

class class-default

queue-buffer ratio 15

2. Überprüfen Sie die Klassenzuordnung auf Warteschlangenzuordnung, Bandbreiten- und Pufferzuweisungen und Warteschlangenzuordnung zu DSCP:
6880-VSS#sh queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue]  15[queue 2]  40[queue 3]  30[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21

22 23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41

42 43 44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

3. Puffer und Bandbreitenzuweisungen aus dem 6800ia doppelt prüfen:
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 buffers

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 15 15 40 30

4. Überprüfen Sie, ob der interessierte Datenverkehr in die entsprechende Warteschlange aufgenommen wird und Verwerfungen auftreten:
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          491            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0     57864687

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0     29364400            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          775            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :        5323            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :        1718            0            0     57864691     29364400

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:    29365402        1883           5

queue 1:         793          98           0

queue 2:           0           0           0

queue 3:   530554174           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0          10           0

queue 1:           1       24093           0

queue 2:           0           0           0

queue 3:     2309351           0           0

Policer: Inprofile:            0 OutofProfile:            0

Überprüfen

Für diese Konfiguration ist derzeit kein Überprüfungsverfahren verfügbar.

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Das Output Interpreter Tool (nur registrierte Kunden) unterstützt bestimmte show-Befehle. Verwenden Sie das Output Interpreter Tool, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Hinweis: Weitere Informationen zu Debug-Befehlen vor der Verwendung von Debug-Befehlen finden Sie unter Wichtige Informationen.

1. Aktivieren Sie debug für qos-manager über die 6800ia-CLI. Stellen Sie sicher, dass Protokolle zum Puffer umgeleitet und der Protokollierungspuffer auf eine hohe Anzahl eingestellt ist:
6880-VSS#attach fex 101

Attach FEX:101 ip:192.168.1.101

Trying 192.168.1.101 ... Open

????????FEX-101>en

Password: cisco

FEX-101#

FEX-101#debug platform qos-manager all

QM verbose debugging is on

QM cops debugging is on

QM events debugging is on

QM Statistics debugging is on

FEX-101#exit

[Connection to 192.168.1.101 closed by foreign host]

2. Konfigurieren Sie die Richtlinienzuordnung, um Debuggen auszulösen:
6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)# service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1

Gi101/1/0/2 Gi101/1/0/3 Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8

Gi101/1/0/9 Gi101/1/0/10 Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16

<snip>

6880-VSS(config-if)#end

3. Überprüfen Sie die Protokolle im Fabric Extender (FEX), um die Debugging-Vorgänge zu überprüfen:
6880-VSS#remote command fex 101 show log

<snip>

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

****Setting Priority Queue (FEX-101)

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.208: HQM: hulc_f

_fex_qos_priority_handler:QueueNum=1 PriorityQueue=1 queuetype=2 thresholdsnum=3 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/1 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/2 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/3 (FEX-101)

<snip>

hulc_fex_qos_srr_weight_setting:****Setting weight for queues**** (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=1 RRType=0 WeightRelative=0 WeightAbsolute=0 (FEX-101)

20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

ratio is 0 for queue 1 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=2 RRType=0 WeightRelative=33 WeightAbsolute=0 (FEX-101)

<snip>

20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: **Setting buffer for output queues** (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

queuenum=1 size=15 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=2 size=25 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=3 size=40 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=4 size=20 (FEX-101)

May 20 06:43:19.110: HQM: hqm

20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

May 20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

<snip>

hulc_fex_qos_qthresh_map:****Setting dscp to output queue map**** (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map:

subopcode=2 startport=0 endport=0 size=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map: DscpBma

20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=32 iterator=0 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=33 iterator=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=40 iterator=2 (FEX-101)

<snip>