Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrund

Konventionen

Schritt-für-Schritt-Anleitung

Beispiel für das Ergebnis

Zugehörige Informationen

Einleitung

In diesem Dokument wird beschrieben, wie Sie ein Kennwort für Catalyst Switches der Serien 6500/600 und 7600 wiederherstellen können, auf denen die Cisco IOS® Systemsoftware ausgeführt wird.

Voraussetzungen

Anforderungen

Es gibt keine spezifischen Anforderungen für dieses Dokument.

Verwendete Komponenten

Dieses Dokument gilt für die Systeme Supervisor 1, Supervisor 2, Supervisor 720 und Virtual Switching System (VSS) 1440. Für Systeme mit Supervisor 720 gilt dieses Dokument, wenn Cisco IOS Software Release 12.2(17)SX oder höher ausgeführt wird. Wenn der Supervisor 720 eine ältere Version ausführt, finden Sie weitere Informationen unter Verfahren zur Kennwortwiederherstellung für den Catalyst 6500 mit Supervisor 720 unter Ausführen der Cisco IOS-Systemsoftware vor 12.2(17)SX.

Hinweis: Die unterstützte Software für Virtual Switching System (VSS) 1440-basierte Systeme ist die Cisco IOS® Softwareversion 12.2(33)SXH1 oder höher.

Hintergrund

Die Bootreihenfolge bei der Cisco IOS-Systemsoftware für Catalyst 6500/600 und Cisco 7600 unterscheidet sich von der für den Cisco Router der Serie 7200 verwendeten, da die Hardware unterschiedlich ist. Nachdem Sie das Gerät aus- und wieder eingeschaltet haben, wird der Switch-Prozessor (SP) zuerst gestartet. Nach kurzer Zeit (ca. 25 bis 60 Sekunden) überträgt er das Konsoleneigentum an den Routingprozessor (RP, MSFC). Der RP lädt weiterhin das gebündelte Software-Image. Es ist wichtig, dass Sie Strg-Taste drücken, kurz nachdem der SP die Steuerung der Konsole an den RP übergibt. Wenn Sie die Break-Sequenzierung zu früh senden, landen Sie im ROMMON des SP, wo Sie nicht sein sollten. Senden Sie die Unterbrechungssequenz, nachdem Sie diese Meldung in der Konsole sehen:

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

Nach diesem Punkt ist die Kennwortwiederherstellung mit einem normalen Router identisch.

Hinweis: Ab diesem Zeitpunkt wird der Catalyst Switch der Serie 6000, der die Cisco IOS-Systemsoftware ausführt, als Router bezeichnet.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps von Cisco zu Konventionen).

Schritt-für-Schritt-Anleitung

Der Switch ist aufgrund des Betriebssystems, das auf dem Switch ausgeführt wird, wie ein Router konfiguriert. Das Verfahren zur Kennwortwiederherstellung entspricht den gleichen Schritten wie ein Cisco Router der Serie 7200. Sie müssen jedoch etwa 25 bis 60 Sekunden länger warten, bevor Sie die Unterbrechungssequenz starten.

1. Schließen Sie ein Terminal bzw. einen PC mit Terminal-Emulation an den Konsolenport des Routers an. Verwenden Sie diese Terminaleinstellungen:

9600 baud rate

No parity

8 data bits

1 stop bit

No flow control

Die erforderlichen Konsolenkabelspezifikationen sind im Dokument Cable Specifications (Kabelspezifikationen) beschrieben. Anweisungen zum Herstellen einer Verbindung mit dem Konsolenport finden Sie im Modul-Installationshandbuch. Der Abschnitt Verbindung mit dem Konsolenport - Nur Supervisor Engine enthält nützliche Informationen.

2. Wenn Sie immer noch Zugriff auf den Router haben, geben Sie den Befehl show version aus, und notieren Sie die Einstellung des Konfigurationsregisters. Es ist in der Regel 0x2102 oder 0x102. Klicken Sie hier, um die Ausgabe eines Befehls show version anzuzeigen.

3. Wenn Sie keinen Zugriff auf den Router haben (aufgrund eines verlorenen Anmeldenamens oder TACACS-Kennworts), ist Ihr Konfigurationsregister auf 0x2102 festgelegt.

4. Schalten Sie den Router aus, und schalten Sie ihn dann mithilfe des Netzschalters wieder ein.

5. Vorsicht: Die Unterbrechungssequenz muss erst initiiert werden, nachdem der RP die Kontrolle über den Konsolenport erlangt hat.

Drücken Sie Break (Break) auf der Terminal-Tastatur, nachdem der RP die Steuerung des Konsolenports übernimmt. Auf dem Catalyst 6000, auf dem die Cisco IOS Software ausgeführt wird, wird zuerst der SP gestartet. Nach dem Booten wird die Steuerung auf den RP übertragen. Sobald der RP die Kontrolle erhält, starten Sie die Break-Sequenz. Der RP erhält die Kontrolle über den Konsolenport, wenn Sie diese Meldung sehen. (Initiieren Sie erst die Unterbrechungssequenz, wenn Sie diese Meldung sehen.):

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

Ab diesem Zeitpunkt ist das Verfahren zur Kennwortwiederherstellung identisch mit dem für jeden anderen Router. Wenn die Unterbrechungssequenz nicht funktioniert, finden Sie für andere Tastenkombinationen Informationen in den Standardkombinationen für die Unterbrechungssequenz während der Kennwortwiederherstellung.

6. Geben Sie confreg 0x2142 an der Eingabeaufforderung 1> ein, um von Flash zu starten, ohne die Konfiguration zu laden.

7. Geben Sie reset bei der Eingabeaufforderung rommon 2> ein.

Der Router wird neu gestartet. Die gespeicherte Konfiguration wird jedoch ignoriert.

8. Geben Sie no nach jeder Einrichtungsfrage ein, oder drücken Sie Strg-C, um die Ersteinrichtung zu überspringen.

9. Geben Sie enable bei der Eingabeaufforderung Router> ein.

Sie befinden sich im Aktivierungsmodus und sehen die Eingabeaufforderung Router#.

10. Wichtig: Geben Sie den konfigurierten Speicher aus, oder kopieren Sie die Befehle zum Starten der Ausführung, um den nichtflüchtigen RAM (NVRAM) in den Speicher zu kopieren. Führen Sie den Befehl configure terminal nicht aus.

11. Geben Sie den Befehl write terminal oder show running ein.

Die Befehle show running and write terminal zeigen die Konfiguration des Routers an. In dieser Konfiguration sehen Sie unter allen Schnittstellen den Befehl shutdown. Dies bedeutet, dass alle Schnittstellen derzeit deaktiviert sind.Die Kennwörter werden entweder verschlüsselt oder unverschlüsselt angezeigt.

12. Geben Sie den Befehl configure terminal ein, um in den globalen Konfigurationsmodus zu wechseln und die Änderungen vorzunehmen.

Die Eingabeaufforderung lautet jetzt hostname(config)#.

13. Geben Sie den Befehl enable secret < password > im globalen Konfigurationsmodus ein, um das enable-Kennwort zu ändern.

14. Geben Sie den Befehl config-register 0x2102 oder den in Schritt 2 im globalen Konfigurationsmodus (Router(config)#) aufgezeichneten Wert ein, um den Konfigurationswert wieder auf den ursprünglichen Wert zurückzusetzen.

15. Ändern Sie ggf. die virtuellen Terminalkennwörter:

Router(config)#line vty 0 4

Router(config-line)#password cisco

Router(config-line)#^Z

Router#

16. Geben Sie den Befehl no shutdown für jede Schnittstelle aus, die normalerweise verwendet wird. Geben Sie einen Befehl show ip interface brief ein, um eine Liste der Schnittstellen und deren aktuellen Status anzuzeigen. Sie müssen sich im Aktivierungsmodus (Router#) befinden, um den Befehl show ip interface brief auszuführen. Hier ein Beispiel für eine Schnittstelle:

Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      172.17.10.10    YES TFTP   administratively down dow

Vlan10                     10.1.1.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES unset  administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/2         unassigned      YES TFTP   administratively down dow

FastEthernet3/1            172.16.84.110   YES TFTP   administratively down dow

<snip>...

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#interface fastEthernet 3/1

Router(config-if)#no shutdown

Router(config-if)#exit

Router(config)# <do other interfaces as necessary...>

17. Drücken Sie Strg-z, um den Konfigurationsmodus zu verlassen.

Die Eingabeaufforderung lautet jetzt hostname#.

18. Geben Sie den Schreibspeicher aus oder kopieren Sie die ausgeführten Startbefehle, um die Änderungen zu bestätigen.

Beispiel für das Ergebnis

Das Beispiel hier zeigt eine eigentliche Kennwortwiederherstellung. Dieses Beispiel wird mithilfe eines Catalyst Switches der Serie 6000 erstellt. Beginnen Sie mit der show version und show module-Befehle, um zu sehen, welche Komponenten in diesem Beispiel verwendet werden.

Press RETURN to get started.

Router>enable

Password:

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) c6sup1_rp Software (c6sup1_rp-JSV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:14 by eaarmas

Image text-base: 0x60020950, data-base: 0x6165E000

ROM: System Bootstrap, Version 12.0(3)XE, RELEASE SOFTWARE

BOOTFLASH: MSFC Software (C6MSFC-BOOT-M), Version 12.1(6)E, EARLY DEPLOYMENT RE)

Router uptime is 14 minutes

System returned to ROM by power-on (SP by reload)

System image file is "sup-bootflash:c6sup11-jsv-mz.121-6.E"

Cisco Catalyst 6000 (R5000) processor with 114688K/16384K bytes of memory.

Processor board ID SAD04281AF6

R5000 CPU at 200Mhz, Implementation 35, Rev 2.1, 512KB L2 Cache

Last reset from power-on

Bridging software.

X.25 software, Version 3.0.0.

SuperLAT software (copyright 1990 by Meridian Technology Corp).

TN3270 Emulation software.

24 Ethernet/IEEE 802.3 interface(s)

2 Virtual Ethernet/IEEE 802.3  interface(s)

48 FastEthernet/IEEE 802.3 interface(s)

4 Gigabit Ethernet/IEEE 802.3 interface(s)

381K bytes of non-volatile configuration memory.

4096K bytes of packet SRAM memory.

16384K bytes of Flash internal SIMM (Sector size 256K).

Configuration register is 0x2102

Router#

Router#show module

Slot Ports Card Type                                 Model                 Serial Number

---- ----- ----------------------------------------- --------------------- -----------

1     2   Cat 6000 sup 1 Enhanced QoS (active)      WS-X6K-SUP1A-2GE      SAD043301JS

2     2   Cat 6000 sup 1 Enhanced QoS (standby)     WS-X6K-SUP1A-2GE      SAD03510114

3    48   48 port 10/100 mb RJ45                    WS-X6348-RJ-45        SAD04230FB6

6    24   24 port 10baseFL                          WS-X6024-10FL-MT      SAD03413322

Slot MAC addresses                      Hw    Fw           Sw

---- ---------------------------------- ----- ------------ ----------

1   00d0.c0d2.5540 to 00d0.c0d2.5541   3.2   unknown      6.1(0.105)OR

2   00d0.bcf1.9bb8 to 00d0.bcf1.9bb9   3.2   unknown      6.1(0.105)OR

3   0002.7ef1.36e0 to 0002.7ef1.370f   1.1   5.3(1) 1999- 6.1(0.105)OR

6   00d0.9738.5338 to 00d0.9738.534f   0.206 5.3(1) 1999- 6.1(0.105)OR

Router#

Router#reload

Proceed with reload? [confirm]

!--- Here you turn off the power and then turn it back on. !--- Here it is done with a reload instead of a hard power-cycle.

00:15:28: %SYS-SP-3-LOGGER_FLUSHING: System pausing to ensure console debugging.

00:15:27: %C6KPWR-SP-4-DISABLED: power to module in slot 2 set off (admin reque)

00:15:28: %C6KPWR-SP-4-DISABLED: power to module in slot 3 set off (admin reque)

00:15:28: %C6KPWR-SP-4-DISABLED: power to module in slot 6 set off (admin reque)

00:15:28: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

00:15:28: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:15:30: %SYS-SP-3-LOGGER_FLUSHING: System pausing to ensure console debugging.

***

*** --- SHUTDOWN NOW ---

***

00:15:30: %SYS-SP-5-RELOAD: Reload requested

00:15:30: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

00:15:30: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:15:31: %OIR-SP-6-REMCARD: Card removed from slot 1, interfaces disabled

!--- First, the switch processor comes up.

System Bootstrap, Version 5.3(1)

Copyright (c) 1994-1999 by cisco Systems, Inc.

c6k_sup1 processor with 65536 Kbytes of main memory

Autoboot executing command: "boot bootflash:c6sup11-jsv-mz.121-6.E"

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

Cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (TM) c6sup1_sp Software (c6sup1_sp-SPV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:52 by eaarmas

Image text-base: 0x60020950, database: 0x605FC000

Start as Primary processor

00:00:03: %SYS-3-LOGGER_FLUSHING: System pausing to ensure console debugging ou.

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

!--- The RP now has control of the console. !--- This is when you send the break sequence.

System Bootstrap, Version 12.0(3)XE, RELEASE SOFTWARE

Copyright (c) 1998 by cisco Systems, Inc.

*** Address Error (Load/Fetch) Exception ***

Access address = 0x5e

PC = 0x5e, Cause = 0x10, Status Reg = 0x3040d003

ROM Monitor Can Not Recover From Exception

A Board Reset Is Issued

*** Software NMI ***

PC = 0xbfc0b6b0, SP = 0x00002a90

Cat6k-MSFC platform with 131072 Kbytes of main memory

Self decompressing the image : ################################################]

*** System received an abort due to Break Key ***

signal= 0x3, code= 0x0, context= 0x6049ed68

PC = 0x601011ac, Cause = 0x20, Status Reg = 0x34008002

!--- You are now in ROMMON mode on the RP. Continue the password !--- recovery procedure just as on any router. Changing the configuration !--- register from 0x2102 to 0x2142 causes the router to ignore the existing !--- configuration. You want it to be ignored because it has passwords that you do not !--- know.

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect

rommon 2 > reset

System Bootstrap, Version 12.0(3)XE, RELEASE SOFTWARE

Copyright (c) 1998 by cisco Systems, Inc.

Cat6k-MSFC platform with 131072 Kbytes of main memory

Self decompressing the image : ################################################]

Attempt to download 'sup-bootflash:c6sup11-jsv-mz.121-6.E' ... okay

Starting download of 'sup-bootflash:c6sup11-jsv-mz.121-6.E': 8722810 bytes!!!!!!

Chksum: Verified!

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

Cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (TM) c6sup1_RP Software (c6sup1_rp-JSV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:14 by eaarmas

Image text-base: 0x60020950, database: 0x6165E000

Cisco Catalyst 6000 (R5000) processor with 114688K/16384K bytes of memory.

Processor board ID SAD04281AF6

R5000 CPU at 200Mhz, Implementation 35, Rev 2.1, 512KB L2 Cache

Last reset from power-on

Bridging software.

X.25 software, Version 3.0.0.

SuperLAT software (copyright 1990 by Meridian Technology Corp).

TN3270 Emulation software.

24 Ethernet/IEEE 802.3 interface(s)

1 Virtual Ethernet/IEEE 802.3  interface(s)

48 FastEthernet/IEEE 802.3 interface(s)

4 Gigabit Ethernet/IEEE 802.3 interface(s)

381K bytes of nonvolatile configuration memory.

4096K bytes of packet SRAM memory.

16384K bytes of Flash internal SIMM (Sector size 256K).

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: n

!--- The router ignores the saved configuration and enters !--- the initial configuration mode.

Press RETURN to get started!

00:00:03: %SYS-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure conso.

00:00:04: %C6KPWR-4-PSINSERTED: power supply inserted in slot 1.

00:00:04: %C6KPWR-4-PSOK: power supply 1 turned on.

00:02:08: %SYS-SP-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (TM) c6sup1_SP Software (c6sup1_sp-SPV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:52 by eaarmas

00:02:13: L3-MGR: l2 flush entry installed

00:02:13: L3-MGR: l3 flush entry installed

00:02:14: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (TM) c6sup1_RP Software (c6sup1_rp-JSV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:14 by eaarmas

00:02:17: %C6KPWR-SP-4-DISABLED: power to module in slot 1 set off (admin reque)

00:02:18: %C6KPWR-SP-4-ENABLED: power to module in slot 3 set on

00:02:18: %C6KPWR-SP-4-ENABLED: power to module in slot 6 set on

00:02:28: sm_set_moduleFwVersion:  nonexistent module (1)

00:02:38: %SNMP-5-MODULETRAP: Module 1 [Up] Trap

00:02:38: %OIR-SP-6-INSCARD: Card inserted in slot 1, interfaces are now online

00:02:56: %SNMP-5-MODULETRAP: Module 6 [Up] Trap

00:02:56: %OIR-SP-6-INSCARD: Card inserted in slot 6, interfaces are now online

00:02:59: SP: SENDING INLINE_POWER_DAUGHTERCARD_MSG SCP MSG

00:02:59: %SNMP-5-MODULETRAP: Module 3 [Up] Trap

00:02:59: %OIR-SP-6-INSCARD: Card inserted in slot 3, interfaces are now online

Router>enable

Router#

!--- You go right into privilege mode without needing a password. !--- At this point, the configuration running-config is a default configuration !--- with all the ports administratively down (shutdown).

Router#copy startup-config running-config

Destination filename [running-config]? <press enter>

!--- This pulls in the original configuration. Since you are already in privilege !--- mode, the passwords in this configuration do not affect you.

4864 bytes copied in 2.48 secs (2432 bytes/sec)

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!--- Overwrite the password that you do not know. This is your new enable password.

Router(config)#^Z

Router#

Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      172.17.10.10    YES TFTP   administratively down dow

Vlan10                     10.1.1.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES unset  administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/2         unassigned      YES TFTP   administratively down dow

FastEthernet3/1            172.16.84.110   YES TFTP   administratively down dow

<snip>...

!--- Issue the no shut command on all interfaces that you want to bring up.

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#interface fastEthernet 3/1

Router(config-if)#no shutdown

Router(config-if)#exit

!--- Overwrite the virtual terminal passwords.

Router(config)#line vty 0 4

Router(config-line)#password cisco

Router(config-line)#^Z

Router#

!--- Restore the configuration register to its normal state so that it !--- no longer ignores the stored configuration file.

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) c6sup1_rp Software (c6sup1_rp-JSV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:14 by eaarmas

Image text-base: 0x60020950, data-base: 0x6165E000

ROM: System Bootstrap, Version 12.0(3)XE, RELEASE SOFTWARE

BOOTFLASH: MSFC Software (C6MSFC-BOOT-M), Version 12.1(6)E, EARLY DEPLOYMENT RE)

Router uptime is 7 minutes

System returned to ROM by power-on (SP by reload)

System image file is "sup-bootflash:c6sup11-jsv-mz.121-6.E"

Cisco Catalyst 6000 (R5000) processor with 114688K/16384K bytes of memory.

Processor board ID SAD04281AF6

R5000 CPU at 200Mhz, Implementation 35, Rev 2.1, 512KB L2 Cache

Last reset from power-on

Bridging software.

X.25 software, Version 3.0.0.

SuperLAT software (copyright 1990 by Meridian Technology Corp).

TN3270 Emulation software.

24 Ethernet/IEEE 802.3 interface(s)

2 Virtual Ethernet/IEEE 802.3  interface(s)

48 FastEthernet/IEEE 802.3 interface(s)

4 Gigabit Ethernet/IEEE 802.3 interface(s)

381K bytes of non-volatile configuration memory.

4096K bytes of packet SRAM memory.

16384K bytes of Flash internal SIMM (Sector size 256K).

Configuration register is 0x2142

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#config-register 0x2102

Router(config)#^Z

Router#

!--- Verify that the configuration register is changed for the next reload.

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) c6sup1_rp Software (c6sup1_rp-JSV-M), Version 12.1(6)E, EARLY DEPLOYME)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Sat 17-Mar-01 00:14 by eaarmas

Image text-base: 0x60020950, data-base: 0x6165E000

ROM: System Bootstrap, Version 12.0(3)XE, RELEASE SOFTWARE

BOOTFLASH: MSFC Software (C6MSFC-BOOT-M), Version 12.1(6)E, EARLY DEPLOYMENT RE)

Router uptime is 8 minutes

System returned to ROM by power-on (SP by reload)

System image file is "sup-bootflash:c6sup11-jsv-mz.121-6.E"

Cisco Catalyst 6000 (R5000) processor with 114688K/16384K bytes of memory.

Processor board ID SAD04281AF6

R5000 CPU at 200Mhz, Implementation 35, Rev 2.1, 512KB L2 Cache

Last reset from power-on

Bridging software.

X.25 software, Version 3.0.0.

SuperLAT software (copyright 1990 by Meridian Technology Corp).

TN3270 Emulation software.

24 Ethernet/IEEE 802.3 interface(s)

2 Virtual Ethernet/IEEE 802.3  interface(s)

48 FastEthernet/IEEE 802.3 interface(s)

4 Gigabit Ethernet/IEEE 802.3 interface(s)

381K bytes of non-volatile configuration memory.

4096K bytes of packet SRAM memory.

16384K bytes of Flash internal SIMM (Sector size 256K).

Configuration register is 0x2142 (will be 0x2102 at next reload)

Router#

Router#copy running-config startup-config

Destination filename [startup-config]? <press enter>

Building configuration...

[OK]

Router#

!--- Optional: If you want to test that the router !--- operates properly and that you have changed !--- the passwords, then reload and test.

Router#reload

Proceed with reload? [confirm] <press enter>

Zugehörige Informationen

- Support-Seite zum Thema LAN-Switching

- Support-Seiten für LAN-Produkte

- Produkt-Support für Catalyst LAN- und ATM-Switches

- Technischer Support – Cisco Systems