Inhalt

Einführung

Hintergrundinformationen

Erste Schritte

1. ROMMON-Version prüfen

2. Bild überprüfen

3. VSS überprüfen

4. Stellen Sie sicher, dass der Switch im Installationsmodus und nicht im Paketmodus ausgeführt wird.

5. Bei der Lizenz muss es sich entweder um Anbieter oder um IP Base handeln.

6. Die Tochterkarte wird nur im Installationsmodus und nicht im Paketmodus aktiviert.

7. Max. unterstützte AP/Clients

8. AP-Verbindung

9. Wie 5760/3850/3650 von hier an

Einführung

Dieses Dokument beschreibt die grundlegende Checkliste, die Sie beachten müssen, um die 4500 SUP8E für Wireless-Netzwerke zu aktivieren. Dieses Dokument behandelt nicht die Konfiguration des Wireless-Controllers für Sup8E, sondern konzentriert sich auf die zuvor zu überprüfenden und plattformspezifischen Aspekte. Anschließend verhält sich diese Plattform meist wie jeder andere konvergente Access Switch, und es können weitere Dokumente und Leitfäden befolgt werden.

Hintergrundinformationen

Die Cisco Catalyst® 4500E Supervisor Engine 8-E ist eine Switching-Engine der Enterprise-Klasse der nächsten Generation, die eine vollständige Konvergenz zwischen kabelgebundenen und Wireless-Netzwerken auf einer einzigen Plattform ermöglicht. Diese neue Cisco® Unified Access Data Plane (UADP) Application-Specific Integrated Circuit (ASIC) unterstützt die Wireless-Konvergenz und ermöglicht die einheitliche Durchsetzung von Richtlinien für kabelgebundene und Wireless-Netzwerke, Anwendungstransparenz, Flexibilität und Anwendungsoptimierung.

Erste Schritte

Um das Wireless-Netzwerk auf diesem Gerät in Betrieb zu nehmen, müssen Sie sicherstellen, dass diese Anforderungen erfüllt sind:

1. Rommon-Version überprüfen

2. Das Bild muss K9 sein - Krypto

3. Virtual Switching System (VSS) wird nur ab Version 3.8 unterstützt (nur Dual-Sup)

4. Switch muss im Installationsmodus ausgeführt werden

5. Die Lizenz muss Entservices oder IP-Basis sein.

6. Im Paketmodus wird die Tochterkarte nicht angezeigt (nur im Installationsmodus)

7. Die maximal unterstützten Access Points (APs) sind Clients mit 50/max. Unterstützung - 2000

8. AP muss im selben Chassis/Supervisor (SUP) enden.

9. Sobald diese verfügbar sind, ähnelt der Rest der Konfiguration einem beliebigen konvergenten Access Switch (3850/5760 ...).

Schauen wir uns jede einzelne von ihnen aus Output-Perspektive an.

1. ROMMON-Version prüfen

Hinweis: Es muss 15.1(Xr)SG4 [X - Zahl ab 1] oder höher sein.

BGL.I.15-4500-2#sh version

ROM: 15.1(1r)SG4

BGL.I.15-4500-2 uptime is 6 minutes

System returned to ROM by power-on

Running default software

Jawa Revision 3, RadTrooper Revision 0x0.0x41, Conan Revision 0x1449

Last reload reason: power-on

2. Bild überprüfen

Hinweis: Es muss 3.7 oder höher sein und ein K9-Krypto-Image sein. Nichts anderes funktioniert.

Das Kryptobild sieht wie folgt aus:

4500-2#sh version

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch  Software (cat4500es8-UNIVERSALK9-M), Version 03.07.00E RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2014 by Cisco Systems, Inc.

Compiled Sun 07-Dec-14 17:59 by prod_rel_team

Ein Bild ohne Krypto sieht wie folgt aus:

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch Software (cat4500es8-UNIVERSAL-M), Version 03.03.00.XO RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 14-Aug-13 09:51 by prod_rel_team

3. VSS überprüfen

Verhalten vor 3.8:

Hinweis: Wenn VSS aktiviert ist, sind keine Wireless-Befehle vorhanden, und umgekehrt, wenn Wireless-Befehle aktiviert sind, sind keine VSS-Befehle vorhanden.

4500-2#sh switch  virtual

Switch Mode : Standalone

Not in Virtual Switch mode due to:

Domain ID is not configured

Ab IOS® XE 3.8:

Hinweis: Dual-Sup VSS wird bei Wireless-Vorgängen unterstützt. Quad-Sup-VSS wird jedoch nicht von Wireless unterstützt.

4. Stellen Sie sicher, dass der Switch im Installationsmodus und nicht im Paketmodus ausgeführt wird.

Bundle Mode - bootsystem pointing to .bin image (no wireless commands)

Install Mode - Bootsystem pointing to package.conf instead of Bin

BGL.I.15-4500-2#dir bootflash:

Im Paketmodus:

Directory of bootflash:/

81602  -rw-   181583336   Oct 7 2014 09:18:45 +00:00  cat4500es8-universal.SPA.03.03.00.XO.151-1.XO.bin

81603  -rw-   181601128  Nov 18 2014 18:28:43 +00:00  cat4500es8-universal.SPA.03.03.02.XO.151-1.XO2.bin

81604  -rw-   483862876  Dec 31 2014 20:21:43 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

1708220416 bytes total (857677824 bytes free)

This is how the boot looks like

4500-2#sh boot

---------------------------

Switch 1

---------------------------

Current Boot Variables:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Boot Variables on next reload:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Allow Dev Key = yes

Manual Boot = no

Enable Break = no

Im Installationsmodus:

BGL.I.20-4500-1#dir bootflash:

Directory of bootflash:/

81602  -rwx   199051336   Oct 7 2014 02:00:02 +00:00  cat4500es8-universalk9.SPA.03.06.00.E.152-2.E.bin

81603  -rw-   215049252  Dec 29 2014 07:07:31 +00:00  cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin

16  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance

18  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance-stby-sync

81606  drwx        4096  Dec 30 2014 01:52:34 +00:00  wnweb_store

21  -rw-   126880776  Dec 30 2014 01:34:38 +00:00  cat4500es8-base.SPA.03.07.00E.pkg

57125  -rw-    82245776  Dec 30 2014 01:34:45 +00:00  cat4500es8-dc-base.SPA.03.07.00E.pkg

57126  -rw-     7019480  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-drivers.SPA.03.07.00E.pkg

57127  -rw-    35161204  Dec 30 2014 01:34:46 +00:00  cat4500es8-dc-infra.SPA.03.07.00E.pkg

81604  -rw-   483862876  Dec 30 2014 01:24:49 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

57128  -rw-    26876920  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-platform.SPA.03.07.00E.pkg

57129  -rw-     4225328  Dec 30 2014 01:34:39 +00:00  cat4500es8-firmware.SPA.03.07.00E.pkg

57130  -rw-       54192  Dec 30 2014 01:34:39 +00:00  cat4500es8-infra.SPA.03.07.00E.pkg

57131  -rw-     1987552  Dec 30 2014 01:34:47 +00:00  cat4500es8-platform.SPA.03.07.00E.pkg

57132  -rw-    88661144  Dec 30 2014 01:34:42 +00:00  cat4500es8-universalk9.SPA.152-3.E.pkg

57133  -rw-   110742524  Dec 30 2014 01:34:51 +00:00  cat4500es8-wcm.SPA.10.3.100.0.pkg

20  -rw-        1724  Dec 30 2014 01:35:59 +00:00  packages.conf

81605  ----       11679  Dec 31 2014 23:15:15 +00:00  dc_console_log-20141230-014159-UTC

1708220416 bytes total (321839104 bytes free)

BGL.I.20-4500-1#

4500-2#sh run | i boot

boot-start-marker

boot system bootflash:packages.conf

boot-end-marker

BGL.I.15-4500-2#sh boot

BOOT variable = bootflash:packages.conf,12;

CONFIG_FILE variable does not exist

BOOTLDR variable does not exist

Configuration register is 0x2102

Hinweis: Das Konfigurationsregister ist 0x2102, damit die Tochterkarte erkannt wird.

Hinweis: 4500(config)#config-register ? <0x0-0xFFFF> Konfig.-Registernummer

Konvertieren des Pakets in die Installation

5. Bei der Lizenz muss es sich entweder um Anbieter oder um IP Base handeln.

Hinweis: Wenn Sie Entservices aktivieren und den Neustart durchführen, wird die Anzahl der Access Points im RTU (Right-To-Use) angezeigt.

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

4500-2#license right-to-use activate entservices acceptEula (Requires Reboot)

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Active, In Use

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

6. Die Tochterkarte wird nur im Installationsmodus und nicht im Paketmodus aktiviert.

Hinweis: Wenn das Gerät im Paketmodus ausgeführt wird, wird die für Wireless erforderliche Tochterkarte nicht angezeigt. Dies kann mit dem Befehl show module überprüft werden. Ausfall einer Tochterkarte wird als SUP-Fehler angesehen und erfordert möglicherweise eine RMA.

Während das Gerät startet, sehen Sie:

Cisco IOS®-XE software, Copyright (c) 2005-2014 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.

(http://www.gnu.org/licenses/gpl-2.0.html) For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

Daughter Card is booting.. Please stand by..............................................

Daughter Card is ready, continuing in wireless mode..

BGL.I.20-4500-1#sh module

Chassis Type : WS-C4510R+E

Power consumed by backplane : 40 Watts

Mod Ports Card Type                              Model              Serial No.

---+-----+--------------------------------------+------------------+-----------

2     2  1000BaseX (GBIC)                       WS-X4302-GB        JAE10307QDW

3    48  10/100/1000BaseT POE E Series          WS-X4648-RJ45V-E   JAE1211B9K2

4     6  1000BaseX (GBIC)                       WS-X4306           JAE053700PA

5    12  Sup 8-E 10GE (SFP+), 1000BaseX (SFP)   WS-X45-SUP8-E      CAT1814L3A7

M MAC addresses                    Hw  Fw           Sw               Status

--+--------------------------------+---+------------+----------------+---------

2 0015.62e6.e2b8 to 0015.62e6.e2b9 3.2                               Ok

3 001e.7af2.95f0 to 001e.7af2.961f 1.0                               Ok

4 0004.4dfb.87c4 to 0004.4dfb.87c9 2.0                               Ok

5 70ca.9b5e.6600 to 70ca.9b5e.660b 1.1 15.1(1r)SG4  03.07.00E        Ok

Mod  Redundancy role     Operating mode      Redundancy status

----+-------------------+-------------------+----------------------------------

5   Active Supervisor   RPR                 Active

Mod  Submodule               Model             Serial No.   Hw   Status

----+-----------------------+-----------------+------------+----+---------

5   Daughter Card           WS-UA-SUP8E       CAT1814L5H1  1.0  Ok

7. Max. unterstützte AP/Clients

Max. unterstützte APs - 50/Max unterstützte Clients - 2000

8. AP-Verbindung

Stellen Sie sicher, dass die APs im gleichen Chassis/SUP terminiert werden, andernfalls werden die APs nicht zum Wireless-Controller des Switches hinzugefügt.

Genau wie die APs 3850 und 3650 müssen die APs direkt an einen Access-Port der 4507 angeschlossen werden, um dem Sup8-Controller beizutreten.

9. Wie 5760/3850/3650 von hier an

Hinweis: Sobald die oben genannten Dinge erledigt sind, sind die anderen ähnlich, um 3850/5760 in Betrieb zu nehmen.

Die grafische Benutzeroberfläche (GUI) ist wie im Bild dargestellt.