Ziel

Ziel dieses Dokuments ist es, ein Verständnis der Produkt-ID (PID) für einen bestimmten Cisco Switch zu gewinnen.

- Router-PID-Decoder anzeigen

- Wireless Access Point-PID-Decoder anzeigen

Switch-Decoder

Tabellenform der Grafik anzeigen

Tabellen

Tabelle 1: Portfunktionen

Tabelle 2: Netzstecker-Suffix

Suffix

Typ des Netzsteckers

Länder für

AR

Typ I

Argentinien

ALS

Typ C, Typ E (hohe Leistung)

Teile Asiens

AU

Typ I

Australien und Neuseeland

BR

Typ C, Typ E (hohe Leistung)

Brasilien

KN

Typ A, Typ I (hohe Leistung)

China

EU

Typ C, Typ E (hohe Leistung)

Europa (ohne UK und Irland), Teile Asiens, Afrika

G5

Typ C, Typ G (hohe Leistung)

Europa, Teile Asiens, Naher Osten, Afrika

IN

Typ C, Typ D (hohe Leistung)

Indien

JP

Typ A, Typ B (hohe Leistung)

Japan

KR

Typ C, Typ F (hohe Leistung)

Korea

NA

Typ A, Typ B (hohe Leistung)

Nord- und Südamerika, Taiwan

HE

Typ C, Typ F (hohe Leistung)

Russland

SG

Typ G

Singapur

Großbritannien

Typ G

Großbritannien, Irland, Teile Asiens, Naher Osten, Afrika