Ziel

Dynamic Host Configuration Protocol (DHCP) ist ein Netzwerkkonfigurationsprotokoll für Hosts in IP-Netzwerken. DHCP stellt IP-Adressen sowie eine Standardroute und ein Routing-Präfix für Computer bereit. Wenn DHCP Relay aktiviert ist, kann ein DHCP-Client ohne IP-Adresse über DHCP-Relay-Agenten mit dem Server kommunizieren.

In diesem Dokument wird die DHCP-Server- oder Relay-Konfiguration auf den VPN-Routern RV016, RV042, RV042G und RV082 erläutert.

Unterstützte Geräte

RV016

•RV042

・ RV042G

RV082

Software-Version

•4.2.1.02

IPv4-DHCP-Serverkonfiguration

Weitere Informationen zum Konfigurieren eines IPv4-DHCP-Servers finden Sie im Artikel IPv4 DHCP Server Configuration on RV016, RV042, RV042G and RV082 VPN Routers.

IPv4-DHCP-Relay-Konfiguration des DHCP-Servers oder DHCP-Relay

Weitere Informationen zum Konfigurieren eines IPv4 DHCP-Relays finden Sie im Artikel IPv4 DHCP Relay Configuration on RV016, RV042, RV042G and RV082 VPN Routers.

IPv6-DHCP-Serverkonfiguration

Weitere Informationen zum Konfigurieren eines IPv6-DHCP-Servers finden Sie im Artikel IPv6 DHCP Server Configuration on RV016, RV042, RV042G and RV082 VPN Routers.