Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Verteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD

Netzwerkdiagramm

Verteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD unter Verwendung der Netzwerkanweisung

Konfigurieren

Überprüfung

Neuverteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD mithilfe des statischen Neuverteilungsansatzes

Konfigurieren

Überprüfung

Konfiguration der EIGRP-Summary-Adresse

Konfigurieren

Überprüfung

Neuverteilung von Remote Access-VPN-Subnetzen über OSPF auf FTD

Netzwerkdiagramm

Konfigurieren

Überprüfung

Konfiguration der OSPF-Summary-Adresse

Konfigurieren

Überprüfung

Verteilung von Remote Access-VPN-Subnetzen über eBGP auf FTD

Netzwerkdiagramm

Konfigurieren

Überprüfung

Konfiguration der aggregierten BGP-Adresse

Konfigurieren

Überprüfung

Einleitung

In diesem Dokument werden die verfügbaren Optionen für die Ankündigung VPN-bezogener Subnetze unter Verwendung der Routing-Protokolle EIGRP, OSPF und BGP beschrieben.

Voraussetzungen

Anforderungen

Es gibt keine spezifischen Anforderungen für dieses Dokument.

Verwendete Komponenten

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle kennen.

Die Informationen in diesem Dokument basierend auf folgenden Software- und Hardware-Versionen:

- Cisco Secure Firewall Management Center 7.6.0

- Cisco Secure Firewall 7.6.0

Anmerkung: In diesem Dokument wird die Konfiguration für die Neuverteilung von Remote Access-VPN-Subnetzen über EIGRP, OSPF und BGP mithilfe des FMC beschrieben. Hinweise zur Routen-Neuverteilung mit FDM finden Sie im FDM-Konfigurationsleitfaden.

Hintergrundinformationen

Zunächst muss ermittelt werden, wie die FTD VPN-Subnetze in ihrer Routing-Tabelle klassifiziert. Obwohl diese Subnetze durch VPN verbunden erscheinen, gelten sie nicht als direkt verbundene Subnetze; Stattdessen werden sie als statische Routen behandelt.

Die Ausgabe von show veranschaulicht dies.

FTD Routen-Ausgabe anzeigen:

FTD-1# show route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is not set

C        10.10.20.0 255.255.255.0 is directly connected, outside

L        10.10.20.1 255.255.255.255 is directly connected, outside

C        192.168.100.0 255.255.255.252 is directly connected, inside

L        192.168.100.2 255.255.255.255 is directly connected, inside

V        10.100.100.10 255.255.255.255 connected by VPN (advertised), outside

FTD zeigt die Ausgabe für verbundene Routen an:

FTD-1# show route connected

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is not set

C        10.10.20.0 255.255.255.0 is directly connected, outside

L        10.10.20.1 255.255.255.255 is directly connected, outside

C        192.168.100.0 255.255.255.252 is directly connected, inside

L        192.168.100.2 255.255.255.255 is directly connected, inside

FTD zeigt statische Routenausgabe an:

FTD-HQ-1# show route static

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is not set

V        10.100.100.10 255.255.255.255 connected by VPN (advertised), outside

Nachdem nun klar ist, wie VPN-Subnetze in der Routing-Tabelle der Firewall behandelt werden, besteht der nächste Schritt darin, zu prüfen, wie sie mithilfe verschiedener Routing-Protokolle angekündigt werden können.

Verteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD

Netzwerkdiagramm

Statische Routen, die in den Anwendungsbereich einer Netzwerkanweisung fallen, werden automatisch an EIGRP weitergeleitet. müssen Sie für diese keine Umverteilungsregel definieren. Wenn Sie jedoch statische Routen, die auf VTI-Schnittstellen in EIGRP verweisen, neu verteilen, müssen Sie die Kennzahl angeben. Bei statischen Routen, die auf andere Schnittstellentypen verweisen, ist die Angabe der Metrik nicht erforderlich.

Aufgrund des Verhaltens von EIGRP, statische Routen, die in den Anwendungsbereich der Netzwerkanweisungen fallen, automatisch neu zu verteilen, gibt es zwei Möglichkeiten, VPN-Subnetze über EIGRP auf FTD anzukündigen:

1. Verwenden einer Netzwerkanweisung.

2. Verwenden des statischen Redistribution-Ansatzes.

In diesem Beispiel soll R1 dazu gebracht werden, das VPN-Subnetz 10.100.100.0/24 über EIGRP zu erlernen.

FTD-Erstkonfiguration:

hostname FTD-1

!

ip local pool VPN-POOL1 10.100.100.10-10.100.100.254 mask 255.255.255.0

!

webvpn

...

group-policy LAB_GROUP1 internal

group-policy LAB_GROUP1 attributes

...

address-pools value VPN-POOL1

!

router eigrp 100

no default-information in

no default-information out

no eigrp log-neighbor-warnings

no eigrp log-neighbor-changes

network 192.168.100.0 255.255.255.252

FTD Initial Routing Table:

FTD-1# show route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is not set

C        10.10.20.0 255.255.255.0 is directly connected, outside

L        10.10.20.1 255.255.255.255 is directly connected, outside

C        192.168.100.0 255.255.255.252 is directly connected, inside

L        192.168.100.2 255.255.255.255 is directly connected, inside

V       10.100.100.10 255.255.255.255 connected by VPN (advertised), outside

FTD Initial EIGRP Topologietabelle:

FTD-1# show eigrp topology

EIGRP-IPv4 Topology Table for AS(100)/ID(192.168.100.2)

Codes: P - Passive, A - Active, U - Update, Q - Query, R - Reply,

r - reply Status, s - sia Status

P 192.168.100.0 255.255.255.252, 1 successors, FD is 512 via Connected, inside

R1 Erstroutingtabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

Verteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD unter Verwendung der Netzwerkanweisung

Konfigurieren

Schritt 1: Erstellen Sie ein Netzwerkobjekt für das VPN-Subnetz.

Schritt 2: Integrieren Sie das VPN-Subnetzobjekt in der Netzwerkanweisung.

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > EIGRP > Setup, und fügen Sie das VPN-Subnetz in die ausgewählten Netzwerke/Hosts ein.

Speichern und Bereitstellen der Konfiguration auf dem FTD

Überprüfung

FTD EIGRP-Konfiguration:

FTD-1# show run router

router eigrp 100

no default-information in

no default-information out

no eigrp log-neighbor-warnings

no eigrp log-neighbor-changes

network 10.100.100.0 255.255.255.0

network 192.168.100.0 255.255.255.252

FTD EIGRP-Topologietabelle:

FTD-1# show eigrp topology

EIGRP-IPv4 Topology Table for AS(100)/ID(192.168.100.2)

Codes: P - Passive, A - Active, U - Update, Q - Query, R - Reply,

r - reply Status, s - sia Status

P 10.100.100.10 255.255.255.255, 1 successors, FD is 512

via Rstatic (512/0)

P 192.168.100.0 255.255.255.252, 1 successors, FD is 512

via Connected, inside

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/32 is subnetted, 1 subnets

D        10.100.100.10

[90/3072] via 192.168.100.2, 00:02:17, GigabitEthernet1

Anmerkung: Beachten Sie, dass die FTD ein /32-Subnetz über EIGRP verteilt, obwohl die Netzwerk-Anweisung 10.100.100.0/24 lautete. Dies liegt daran, dass die FTD für jede Remotezugriff-VPN-Sitzung eine statische Route mit einem /32-Präfix erstellt. Um dies zu optimieren, können Sie die Funktion "EIGRP Summary Address" (EIGRP-Zusammenfassungsadresse) verwenden.

Neuverteilung von Remote Access-VPN-Subnetzen über EIGRP auf FTD mithilfe des statischen Neuverteilungsansatzes

Konfigurieren

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > EIGRP > Redistribution, und wählen Sie dann die Schaltfläche Hinzufügen aus.

Wählen Sie im Protokollfeld die Option Statisch aus, und klicken Sie dann auf die Schaltfläche OK.

Vorsicht: Dadurch werden alle statischen Routen auf EIGRP umverteilt. Wenn Sie nur die VPN-Subnetze ankündigen müssen, können Sie entweder den Network Statement-Ansatz verwenden oder eine Routing-Map anwenden, um sie zu filtern.

Ergebnis:

Speichern und Bereitstellen der Konfiguration auf dem FTD

Überprüfung

FTD EIGRP-Konfiguration:

FTD-HQ-1# show run router

router eigrp 100

no default-information in

no default-information out

no eigrp log-neighbor-warnings

no eigrp log-neighbor-changes

network 192.168.100.0 255.255.255.252

redistribute static

FTD EIGRP-Topologietabelle:

FTD-1# show eigrp topology

EIGRP-IPv4 Topology Table for AS(100)/ID(192.168.100.2)

Codes: P - Passive, A - Active, U - Update, Q - Query, R - Reply,

r - reply Status, s - sia Status

P 10.100.100.10 255.255.255.255, 1 successors, FD is 512

via Rstatic (512/0)

P 192.168.100.0 255.255.255.252, 1 successors, FD is 512

via Connected, inside

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

D EX     10.100.100.10

[170/3072] via 192.168.100.2, 00:03:52, GigabitEthernet1

Tipp: Optional können Sie die EIGRP-Summary-Address-Funktion auf FTD verwenden, um die Größe der Routing-Tabelle zu optimieren.

Konfiguration der EIGRP-Summary-Adresse

Konfigurieren

Falls noch nicht erstellt, erstellen Sie ein Netzwerkobjekt für die VPN-Subnetze.

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > EIGRP > Summary Address, und wählen Sie dann die Schaltfläche Add (Hinzufügen).

Geben Sie im Feld interface (Schnittstelle) das Objekt ein, das dem EIGRP-Nachbarn zugewandt ist, und im Feld network (Netzwerk) das Objekt, das für das VPN-Subnetz erstellt wurde.

Ergebnis:

Überprüfung

FTD EIGRP Summary-Adresskonfiguration:

FTD-1# sh run interface

interface GigabitEthernet0/0

nameif inside

security-level 0

zone-member inside

ip address 192.168.100.2 255.255.255.252

summary-address eigrp 100 10.100.100.0 255.255.255.0

FTD EIGRP-Topologietabelle:

FTD-1# show eigrp topology

EIGRP-IPv4 Topology Table for AS(100)/ID(192.168.100.2)

Codes: P - Passive, A - Active, U - Update, Q - Query, R - Reply,

r - reply Status, s - sia Status

P 10.100.100.10 255.255.255.255, 1 successors, FD is 512

via Rstatic (512/0)

P 10.100.100.0 255.255.255.0, 1 successors, FD is 512

via Summary (512/0), Null0

P 192.168.100.0 255.255.255.0, 1 successors, FD is 512

via Connected, inside

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/24 is subnetted, 1 subnets

D        10.100.100.0 [90/3072] via 192.168.100.2, 00:01:54, GigabitEthernet1

Neuverteilung von Remote Access-VPN-Subnetzen über OSPF auf FTD

Netzwerkdiagramm

Startkonfigurationen

ip local pool VPN-POOL1 10.100.100.10-10.100.100.254 mask 255.255.255.0

!

webvpn

group-policy LAB_GROUP1 internal

...

group-policy LAB_GROUP1 attributes

...

address-pools value VPN-POOL1

!

router ospf 1

network 192.168.100.0 255.255.255.252 area 0

FTD zeigt ospf Neighbor-Ausgabe an:

FTD-1# show ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.168.100.1          1   FULL/DR         0:00:39     192.168.100.1   inside

R1 show ip ospf neighbor output:

R1#show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.168.100.2    1   FULL/BDR        00:00:37    192.168.100.2  GigabitEthernet1

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

Konfigurieren

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > OSPF > Redistribution, und wählen Sie dann die Schaltfläche Hinzufügen.

Anmerkung: Die OSPF-Rolle muss als ASBR oder ABR und ASBR festgelegt werden, um die Neuverteilung zu ermöglichen.

Wählen Sie im Feld "Route Type" die Option Static (Statisch) aus, und aktivieren Sie dann das Kontrollkästchen Use Subnets (Subnetze verwenden).

Achtung: Dadurch werden alle statischen Routen in OSPF umverteilt. Wenn Sie nur die VPN-Subnetze ankündigen müssen, können Sie eine Routenübersicht anwenden, um sie zu filtern.

Ergebnis:

Überprüfung

FTD OSPF-Neuverteilungskonfiguration:

FTD-1# sh run router

router ospf 1

network 192.168.100.0 255.255.255.252 area 0

redistribute static subnets

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/32 is subnetted, 1 subnets

O E2     10.100.100.10 [110/20] via 192.168.100.2, 00:08:01, GigabitEthernet1

Tipp: Beachten Sie, dass der VPN-Pool zwar 10.100.100.0/24 lautet, die FTD jedoch ein /32-Subnetz über OSPF verteilt. Dies liegt daran, dass die FTD für jede Remotezugriff-VPN-Sitzung eine statische Route mit einem /32-Präfix erstellt. Um dies zu optimieren, können Sie die Funktion "OSPF Summary Address" (OSPF-Summary-Adresse) verwenden.

Konfiguration der OSPF-Summary-Adresse

Konfigurieren

Falls noch nicht erstellt, erstellen Sie ein Netzwerkobjekt für die VPN-Subnetze.

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > OSPF > Summary Address, und wählen Sie dann die Schaltfläche Add (Hinzufügen).

Fügen Sie das VPN-Subnetzobjekt hinzu, und aktivieren Sie das Kontrollkästchen Anzeigen.

Ergebnis:

Überprüfung

FTD-OSPF-Konfiguration:

FTD-1# sh run router

router ospf 1

network 192.168.100.0 255.255.255.252 area 0

redistribute static subnets

summary-address 10.100.100.0 255.255.255.0

R1-Routing-Tabelle:

R1#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/24 is subnetted, 1 subnets

O E2     10.100.100.0 [110/20] via 192.168.100.2, 00:00:26, GigabitEthernet1

Verteilung von Remote Access-VPN-Subnetzen über eBGP auf FTD

Netzwerkdiagramm

In diesem Beispiel soll erreicht werden, dass R1 das VPN-Subnetz 10.100.100.0/24 via eBGP erlernt.

Startkonfigurationen

FTD Erstkonfiguration:

hostname FTD-1

!

ip local pool VPN-POOL1 10.100.100.10-10.100.100.254 mask 255.255.255.0

!

webvpn

...

group-policy LAB_GROUP1 internal

group-policy LAB_GROUP1 attributes

...

address-pools value VPN-POOL1

!

router bgp 65000

bgp log-neighbor-changes

bgp router-id vrf auto-assign

address-family ipv4 unicast

neighbor 192.168.100.1 remote-as 65001

neighbor 192.168.100.1 transport path-mtu-discovery disable

neighbor 192.168.100.1 activate

no auto-summary

no synchronization

exit-address-family

Ausgabe der FTD-BGP-Tabelle:

FTD-1# show bgp

BGP table version is 25, local router ID is 192.168.100.2

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath

Origin codes: i - IGP, e - EGP, ? - incomplete

Network               Next Hop        Metric LocPrf Weight  Path

r> 192.168.100.0/30  192.168.100.1       1             0  65001 ?

FTD zeigt BGP-Übersichtsausgabe an:

FTD-1# show bgp summary

BGP router identifier 192.168.100.2, local AS number 65000

BGP table version is 25, main routing table version 25

1 network entries using 2000 bytes of memory

17 path entries using 1360 bytes of memory

3/3 BGP path/bestpath attribute entries using 624 bytes of memory

2 BGP AS-PATH entries using 48 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 4032 total bytes of memory

BGP activity 176/166 prefixes, 257/240 paths, scan interval 60 secs

Neighbor        V           AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

192.168.100.1  4        65001 4589    3769          25    0    0 2d21h  8

R1 show ip bgp summary output:

R1#sh ip bgp summary

BGP router identifier 192.168.100.1, local AS number 65001

BGP table version is 258, main routing table version 258

1 network entries using 2480 bytes of memory

1 path entries using 2312 bytes of memory

1/1 BGP path/bestpath attribute entries using 864 bytes of memory

1 BGP AS-PATH entries using 64 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 5720 total bytes of memory

BGP activity 85/75 prefixes, 244/227 paths, scan interval 60 secs

12 networks peaked at 11:10:00 Apr 17 2025 UTC (00:06:27.485 ago)

Neighbor        V           AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

192.168.100.2  4        65000    3770    4590      258    0    0 2d21h           9

Ausgabe der R1-BGP-Tabelle:

R1#show ip bgp

BGP table version is 258, local router ID is 192.168.100.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path, L long-lived-stale,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   192.168.100.0/30                      0.0.0.0                  1         32768 ?

R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

Konfigurieren

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > BGP > IPv4 > Redistribution, und wählen Sie dann die Schaltfläche Hinzufügen.

Wählen Sie im Feld Source Protocol (Quellprotokoll) die Option Static (Statisch) aus, und klicken Sie dann auf die Schaltfläche OK.

Achtung: Dadurch werden alle statischen Routen über das BGP neu verteilt. Wenn Sie nur die VPN-Subnetze ankündigen müssen, können Sie eine Routenübersicht anwenden, um sie zu filtern.

Ergebnis:

Speichern und Bereitstellen der Konfiguration auf dem FTD

Überprüfung

FTD-BGP-Konfiguration:

FTD-HQ-1# show run router

router bgp 65000

bgp log-neighbor-changes

bgp router-id vrf auto-assign

address-family ipv4 unicast

neighbor 192.168.100.1 remote-as 65001

neighbor 192.168.100.1 transport path-mtu-discovery disable

neighbor 192.168.100.1 activate

redistribute static

no auto-summary

no synchronization

exit-address-family

Ausgabe der FTD-BGP-Tabelle:

FTD-1# show bgp

BGP table version is 26, local router ID is 192.168.100.2

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop        Metric LocPrf Weight  Path

*> 10.100.100.10/32 10.100.100.10        0         32768  ?

r> 192.168.100.0/30 192.168.100.1      1             0  65001 ?

Ausgabe der R1-BGP-Tabelle:

R1#show ip bgp

BGP table version is 259, local router ID is 192.168.100.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path, L long-lived-stale,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.100.100.10/32 192.168.100.2           0             0 65000 ?

*>   192.168.100.0/30  0.0.0.0                 1         32768 ?

Ausgabe der R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/32 is subnetted, 1 subnets

B        10.100.100.10 [20/0] via 192.168.100.2, 00:02:00

Tipp: Beachten Sie, dass der VPN-Pool zwar 10.100.100.0/24 lautet, die FTD jedoch ein /32-Subnetz über BGP verteilt. Dies liegt daran, dass die FTD für jede Remotezugriff-VPN-Sitzung eine statische Route mit einem /32-Präfix erstellt. Um dies zu optimieren, können Sie die Funktion "BGP Aggregate Address" verwenden.

Konfiguration der aggregierten BGP-Adresse

Konfigurieren

Falls noch nicht erstellt, erstellen Sie ein Netzwerkobjekt für die VPN-Subnetze.

Navigieren Sie in der Benutzeroberfläche für das FMC-Gerätemanagement zu Routing > BGP> IPv4 > Add Aggregate Address, und wählen Sie dann die Schaltfläche Add (Hinzufügen).

Fügen Sie im Feld "Network" (Netzwerk) das Objekt für das VPN-Subnetz hinzu, und aktivieren Sie dann das Kontrollkästchen Filter all route from updates (Alle Routen aus Updates filtern).

Anmerkung: Wenn das Kontrollkästchen Alle Routen von Updates filtern deaktiviert ist, kündigt das FTD die zusammengefasste Adresse und die spezifischen /32 VPN-Routen über BGP an. Wenn das Kontrollkästchen aktiviert ist, überträgt das FMC den Befehl aggregate-address summary-only an die FTD-LINA-Konfiguration und stellt sicher, dass nur die zusammengefasste Adresse angekündigt wird.

Ergebnis:

Speichern und Bereitstellen der Konfiguration auf dem FTD

Überprüfung

FTD-BGP-Konfiguration:

FTD-1# sh run router

router bgp 65000

bgp log-neighbor-changes

bgp router-id vrf auto-assign

address-family ipv4 unicast

neighbor 192.168.100.1 remote-as 65001

neighbor 192.168.100.1 transport path-mtu-discovery disable

neighbor 192.168.100.1 activate

redistribute static

aggregate-address 10.100.100.0 255.255.255.0 summary-only

no auto-summary

no synchronization

exit-address-family

Ausgabe der FTD-BGP-Tabelle:

FTD-1# sh bgp

BGP table version is 28, local router ID is 192.168.100.2

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop        Metric LocPrf Weight  Path

*> 10.100.100.0/24  0.0.0.0                        32768  i

s> 10.100.100.10/32 10.100.100.10        0         32768  ?

r> 192.168.100.0/30 192.168.100.1       1             0  65001 ?

Ausgabe der R1-BGP-Tabelle:

R1#show ip bgp

BGP table version is 261, local router ID is 192.168.100.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path, L long-lived-stale,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.100.100.0/24  192.168.100.2          0             0 65000 i

*>   192.168.100.0/30  0.0.0.0                  1         32768 ?

Ausgabe der R1-Routing-Tabelle:

R1#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

C        192.168.100.0/30 is directly connected, GigabitEthernet1

L        192.168.100.1/32 is directly connected, GigabitEthernet1

10.0.0.0/24 is subnetted, 1 subnets

B        10.100.100.0 [20/0] via 192.168.100.2, 00:02:04