Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Konfigurieren der WAN-Schnittstelle und der IKEv2-Verschlüsselungsparameter auf der Hub-ASA

Konfigurieren der IKEv2-Parameter auf der Hub-ASA

Erstellen einer Loopback- und Virtual-Template-Schnittstelle

Erstellen Sie eine Tunnelgruppe, und geben Sie die Tunnel-Schnittstellen-IPs über IKEv2 Exchange an.

Konfigurieren von EIGRP-Routing auf der Hub-ASA

Konfigurieren der Schnittstellen auf der Spoke-ASA

Konfigurieren der IKEv2-Verschlüsselungsparameter auf der Spoke-ASA

Konfigurieren der statischen virtuellen Tunnelschnittstelle auf der Spoke-ASA

Erstellen Sie eine Tunnelgruppe, und geben Sie die Tunnel-Schnittstellen-IPs über IKEv2 Exchange an.

Konfigurieren von EIGRP-Routing auf der Spoke-ASA

Konfigurieren der Schnittstellen auf dem Spoke-Router

Konfigurieren der IKEv2-Parameter und AAA auf dem Spoke-Router

Konfigurieren der statischen virtuellen Tunnelschnittstelle auf dem Spoke-Router

Konfigurieren von EIGRP-Routing auf dem Spoke-Router

Überprüfung

Fehlerbehebung

Zugehörige Informationen

Einleitung

In diesem Dokument wird die Implementierung einer Hub-and-Spoke-Lösung mit Dynamic Virtual Tunnel Interface und EIGRP auf der Adaptive Security Appliance beschrieben.

Voraussetzungen

Anforderungen

Cisco empfiehlt, dass Sie über Kenntnisse in folgenden Bereichen verfügen:

- Grundlegendes Verständnis von virtuellen Tunnelschnittstellen auf ASA

- Grundlegende Underlay-Verbindungen zwischen Hub/Spokes/ISP

- Grundlegendes Verständnis des EIGRP

- Adaptive Security Appliance Version 9.19(1) oder höher

Verwendete Komponenten

Die Informationen in diesem Dokument basierend auf folgenden Software- und Hardware-Versionen:

- Zwei ASAv-Geräte, beide Version 9.19(1). Für Spoke 1 und Hub verwendet

- Zwei Cisco IOS® v-Geräte Version 15.9(3)M4. Eines für ISP-Gerät, eines für Spoke 2.

- Zwei Ubuntu-Hosts für generischen Datenverkehr für die Tunnel

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle kennen.

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Konfigurieren der WAN-Schnittstelle und der IKEv2-Verschlüsselungsparameter auf der Hub-ASA

Wechseln Sie auf dem Hub in den Konfigurationsmodus.

interface g0/0

ip address 198.51.100.1 255.255.255.0

nameif OUTSIDE

Konfigurieren der IKEv2-Parameter auf der Hub-ASA

Erstellen Sie eine IKEv2-Richtlinie, die die Phase-1-Parameter der IKE-Verbindung definiert.

crypto ikev2 policy 1      (The number is locally significant on the device, this determine the order in which the IKEv2 policies are presented to the peer)

encryption aes-256         (Defines the encryption parameter used to encrypt the initial communication between the devices)

integrity sha256           (Defines the integrity used to secure the initial communication between the devices)

group 21                   (Defines the Diffie-Hellman group used to protect the key exchange between devices)

prf sha256                 (Pseudo Random Function, an optional value to define, automatically chooses the value defined for integrity)

lifetime seconds 86400     (Controls the phase 1 rekey, specified in seconds. Optional value, as the default is 86400)

Erstellen Sie einen IKEv2-IPsec-Vorschlag, um die Parameter für Phase 2 zum Schutz des Datenverkehrs zu definieren.

crypto ipsec ikev2 ipsec-proposal NAME                (Name is locally signicant and is used as a reference point later in the configuration)

protocol esp encryption aes-256                       (specifies that Encapsulating Security Payload and aes-256 is used to encrypt the traffic traversing the tunnel)

protocol esp integrity sha-256                        (specifies that Encapsulating Security Payload and sha-256 is used to ensure the integrity of the traffic traversing the tunnel)

Erstellen Sie ein IPsec-Profil, das den IPsec-Vorschlag enthält.

crypto ipsec profile NAME                    (This name is referenced on the Virtual-Template Interface to allow the crypto parameters to be utilized)

set ikev2 ipsec-proposal NAME                (This is the name previously used when creating the ipsec-proposal)

Erstellen einer Loopback- und Virtual-Template-Schnittstelle

interface loopback 1

ip address 172.16.50.254 255.255.255.255        (This IP address is used for all of the Virtual-Access Interfaces spawned from the Virtual-Template)

nameif LOOP1

interface Virtual-Template 1 type tunnel

ip unnumbered LOOP1                                (Borrows the IP address specified in Loopback1 for all Virtual-Access Interfaces)

nameif DVTI

tunnel source Interface OUTSIDE                    (Specifies the Interface that the tunnel terminates on, commonly used as the WAN Interface)

tunnel mode ipsec ipv4                             (Specifies that the mode uses ipsec, and uses ipv4)

tunnel protection ipsec profile NAME               (Reference the name of the previously created ipsec profile)

Erstellen Sie eine Tunnelgruppe, und geben Sie die Tunnel-Schnittstellen-IPs über IKEv2 Exchange an.

Erstellen Sie eine Tunnelgruppe, um den Tunneltyp und die Authentifizierungsmethode anzugeben.

tunnel-group DefaultL2LGroup ipsec-attributes             ('DefaultL2LGroup' is a default tunnel-group used for hub DVTI with pre-shared keys, this applied with the virtual template allows dynamic spoke connections)

virtual-template 1                                        (This command ties the Virtual-Template previously created to the tunnel-group to allow for proper authentication and connection)

ikev2 remote-authentication pre-shared-key cisco123       (This specifies the remote authentication as a pre-shared-key with the key being cisco123)

ikev2 local-authentication pre-shared-key cisco123        (This specifies the local authentication as a pre-shared-key with the key being cisco123)

ikev2 route set Interface                                 (Advertises the VTI Interface IP over IKEv2 exchanges. Enables unicast reachability between VTI Interfaces for BGP or path monitoring to work over the tunnel)

Konfigurieren von EIGRP-Routing auf der Hub-ASA

router eigrp 100

network 172.16.50.254 255.255.255.255         (Advertise the IP address of the Loopback used for the Virtual-Template. This is used to form an EIGRP neighborship via VTI connectivity)

Konfigurieren der Schnittstellen auf der Spoke-ASA

Konfigurieren der WAN-Schnittstelle

interface g0/1

ip address 203.0.113.1 255.255.255.0

nameif OUTSIDE-SPOKE-1

Konfigurieren der LAN-Schnittstelle

interface g0/0

ip address 10.45.0.4 255.255.255.0

nameif INSIDE-SPOKE-1

Konfigurieren einer Loopback-Schnittstelle

interface loopback1

ip address 172.16.50.1 255.255.255.255

nameif Loop1

Konfigurieren der IKEv2-Verschlüsselungsparameter auf der Spoke-ASA

Erstellen Sie eine IKEv2-Richtlinie, die mit den Parametern auf dem Hub übereinstimmt.

crypto ikev2 policy 1

encryption aes-256

integrity sha256

group 21

prf sha256

lifetime 86400

Erstellen Sie einen IKEv2-IPsec-Vorschlag, der mit den Parametern auf dem Hub übereinstimmt.

crypto ipsec ikev2 ipsec-proposal NAME           (Name is locally signicant, this does not need to match the hub device.)

protocol esp encryption aes-256

protocol esp integrity sha-256

Erstellen Sie ein IPsec-Profil, das den IPsec-Vorschlag enthält.

crypto ipsec profile NAME               (This name is locally significant and is referenced in the SVTI configuration.)

set ikev2 ipsec-proposal NAME           (This is the name previously used when creating the ipsec-proposal.)

Konfigurieren der statischen virtuellen Tunnelschnittstelle auf der Spoke-ASA

Konfigurieren Sie eine statische virtuelle Tunnelschnittstelle, die auf den Hub verweist. Die Spoke-Geräte konfigurieren reguläre statische virtuelle Tunnelschnittstellen zum Hub, nur für den Hub ist eine virtuelle Vorlage erforderlich.

interface tunnel1

ip unnumbered loopback1

nameif ASA-SPOKE-SVTI

tunnel destination  198.51.100.254          (Tunnel destination references the Hub ASA tunnel source. Commonly referred to as the WAN address.)

tunnel mode ipsec ipv4

tunnel protection ipsec profile NAME

Erstellen Sie eine Tunnelgruppe, und geben Sie die Tunnel-Schnittstellen-IPs über IKEv2 Exchange an.

tunnel-group 198.51.100.1 type ipsec-l2l                   (This specifies the connection type as ipsec-L2L (Lan-to-Lan), using the IKE ID of the hub device.)

tunnel-group 198.51.100.1 ipsec-attributes                 (Ipsec attributes allows you to make changes to the method of authentication and parameters used.)

ikev2 remote-authentication pre-shared-key cisco123

ikev2 local-authentication pre-shared-key cisco123

ikev2 route set Interface

Konfigurieren von EIGRP-Routing auf der Spoke-ASA

Erstellen Sie ein autonomes EIGRP-System und wenden Sie die gewünschten Netzwerke an, die beworben werden sollen.

router eigrp 100

network 10.45.0.0 255.255.255.0        (Advertises the Host-A network to the hub. This allows the hub to notify connecting spokes how to reach this network.)

network 172.16.50.1 255.255.255.255    (Advertises and utilizes the tunnel IP address to form an EIGRP neighborship.)

Konfigurieren der Schnittstellen auf dem Spoke-Router

interface g0/0

ip address 192.0.2.1 255.255.255.0

no shut

interface g0/1

ip address 10.12.0.2

no shut

interface loopback1

ip address 172.16.50.2 255.255.255.255

Konfigurieren der IKEv2-Parameter und AAA auf dem Spoke-Router

Erstellen Sie ein IKEv2-Angebot, das mit den Phase-1-Parametern auf der ASA übereinstimmt.

crypto ikev2 proposal NAME       (These parameters must match the ASA IKEv2 Policy.)

encryption aes-cbc-256           (aes-cbc-256 is the same as the ASA aes-256. However, AES-GCM of any variant is not the same,

and is not a matching parameter with plain AES.)

integrity sha256

group 21

Erstellen Sie eine IKEv2-Richtlinie, um die Angebote hinzuzufügen.

crypto ikev2 policy NAME

proposal NAME               (This is the name of the IKEv2 proposal created in the step ikev2.)

Erstellen einer IKEv2-Autorisierungsrichtlinie

crypto ikev2 authorization policy NAME   (IKEv2 authorization policy serves as a container of IKEv2 local AAA group authorization parameters.)

route set Interface

Aktivieren Sie AAA auf dem Gerät.

aaa new-model

Erstellen Sie ein AAA-Autorisierungsnetzwerk.

aaa authorization network NAME local    (Creates a name and method for aaa authorization that is referenced in the IKEv2 profile along with the IKEv2 authorization policy.)

Erstellen Sie ein IKEv2-Profil, das ein Repository der nicht übertragbaren Parameter der IKE SA enthält, z. B. lokale oder entfernte Identitäten und Authentifizierungsmethoden.

crypto ikev2 profile NAME

match identity remote address  198.51.100.1    (Used to match the address of the Hub VTI source Interface, can also be 0.0.0.0 to match any peer address but this is not best practice.)

identity local address  192.0.2.1              (Defines the local IKE-ID of the router for this IKEv2 profile.)

authentication remote pre-share key cisco123

authentication local pre-share key cisco123

no config-exchange request                     (Applies to Cisco IOS, Cisco IOS-XE devices do this by default. This stops the device from sending IKEv2 config-exchange requests to the ASA,

which is unsupported on the ASA.)

aaa authorization group psk list NAME NAME     (Specifies an AAA method list and username for group. The first NAME is the aaa network name, the second NAME is the IKEv2 authorization policy.)

Erstellen Sie einen Transformationssatz, um die Verschlüsselungs- und Hashing-Parameter zu definieren, die zum Schutz des getunnelten Datenverkehrs verwendet werden.

crypto ipsec transform-set NAME esp aes 256 esp-sha256-hmac

Erstellen Sie ein Krypto-IPsec-Profil, das den Transformationssatz und das IKEv2-Profil enthält.

crypto ipsec profile NAME                  (Define the name of the ipsec-profile.)

set transform-set NAME                     (Reference the name of the created transform set.)

set ikev2-profile NAME                     (Reference the name of the created IKEv2 profile.)

Konfigurieren der statischen virtuellen Tunnelschnittstelle auf dem Spoke-Router

Konfigurieren Sie eine statische virtuelle Tunnelschnittstelle, die auf den Hub verweist.

interface tunnel1

ip unnumbered loopback1

tunnel source g0/0

tunnel mode ipsec ipv4

tunnel destination 198.51.100.1

tunnel protection ipsec profile NAME      (Reference the name of the created ipsec profile. This applies the IKEv2

and transform set parameters to the tunnel Interface.)

Konfigurieren von EIGRP-Routing auf dem Spoke-Router

Erstellen Sie ein autonomes EIGRP-System und wenden Sie die gewünschten Netzwerke an, die beworben werden sollen.

router eigrp 100

network 172.16.50.2 0.0.0.0     (Routers advertise EIGRP networks with the wildcard mask.

This advertises the tunnel IP address to allow the device to form an EIGRP neighborship via the tunnel.)

network 10.12.0.0 0.0.0.255      (Advertises the Host-B network to the hub. This allows the hub to notify connecting spokes how to reach this network.

Überprüfung

Verwenden Sie diesen Abschnitt, um zu überprüfen, ob Ihre Konfiguration ordnungsgemäß funktioniert.

ASA-Routing:

show run router

show eigrp topology

show eigrp neighbors

show route [eigrp]

ASA-Verschlüsselung:

show run crypto ikev2

show run crypto ipsec

show run tunnel-group [NAME]

show crypto ikev2 sa

show crypto ipsec sa peer X.X.X.X

ASA Virtual-Template und Virtual-Access:

show run interface virtual-template # type tunnel

show interface virtual-access #

Cisco IOS-Routing:

show run | sec eigrp

show ip eigrp topology

show ip eigrp neighbors

show ip route

show ip route eigrp

Cisco IOS-Verschlüsselung:

show run | sec cry

show crypto ikev2 sa

show crypto ipsec sa peer X.X.X.X

Cisco IOS-Tunnelschnittstelle:

show run interface tunnel#

Fehlerbehebung

Dieser Abschnitt enthält Informationen, die Sie zur Fehlerbehebung bei Ihrer Konfiguration verwenden können.

ASA-Fehlersuche:

debug crypto ikev2 platform 255

debug crypto ikev2 protocol 255

debug crypto ipsec 255

debug ip eigrp #

debug ip eigrp neighbor X.X.X.X

Cisco IOS-Debugger:

debug crypto ikev2

debug crypto ikev2 error

debug crypto ikev2 packet

debug crypto ikev2 internal

debug crypto ipsec

debug crypto ipsec error

debug ip eigrp #

debug ip eigrp neighbor X.X.X.X

Zugehörige Informationen

- Technischer Support und Downloads von Cisco