Inhalt

Einführung

Voraussetzungen

Anforderungen

Problem

Lösung

Einführung

In diesem Dokument wird beschrieben, wie die Datenbank von einem Cisco Gerät der M-Serie auf ein anderes gesichert wird.

Voraussetzungen

Anforderungen

Cisco empfiehlt, über Kenntnisse in folgenden Bereichen zu verfügen:

- AsyncOS 7.2 und höher

Problem

Starten Sie die Sicherung der DB zu einem sekundären Gerät der M-Serie.

Lösung

Hier sind die Anforderungen aufgeführt, bevor Sie mit dem Backup der DB auf ein sekundäres Gerät der M-Serie beginnen.

- Beide Geräte der M-Serie müssen sich in derselben AsyncOS-Version befinden (ab Version 7.2).

- Das Ziel-Gerät der M-Serie muss über genügend Speicherplatz für das Backup verfügen. Navigieren Sie zu Systemverwaltung > Datenträgerverwaltung (siehe Online-Dokumentation zur Zuweisung, wenn ein Datenträger nicht vorhanden ist).

Wenn Sie während der Einrichtung nicht genügend Speicherplatz zur Verfügung haben, wird möglicherweise eine ähnliche Meldung angezeigt:

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Spam Quarantine, Centralized Email Tracking, Centralized Reporting. Please

increase disk allocation for these services on the target machine.

ODER

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Web Tracking. Please increase disk allocation for these services on the target

machine.

Überprüfen Sie die Speicherplatzquote wie oben auf dem Zielcomputer angegeben.

Die beiden Security Management Appliances (SMAs), ein M650 (Quelle des DB-Systems m650sma.run) und ein Ziel M1050 (Ziel-Backup des DB-Systems mit dem Namen m1050sma.run und IP 192.168.15.1) ).

Melden Sie sich bei der CLI der Quell-M-Serie an (in unserem Test sma1.example.com), und geben Sie die folgenden Befehle ein:

sma1.example.com> backupconfig

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> setup

Enter level of verbosity:

[0]> 0         < this can be 0 or 3 0=lowest verbosity of backup logs and 3 is the highest>

Compression is desirable on slow connections, but will only slow down backup on

fast networks. Would you like to enable compression? [N]>   <hit enter here to pick default withing the brackets [N]>

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> verify

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <enter admin password for the target SMA>

Verifying target machine for version compatibility and disk space...

Backup can be scheduled on to 192.168.15.1.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> schedule

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <type the admin password on the target SMA>

Verifying target machine for version compatibility and disk space...

1. Set up a repeating backup schedule

2. Schedule a single backup

3. Start a single backup now

[1]>

1. Daily

2. Weekly

3. Monthly

[1]> 3

What day of the month would you like the backup to occur?

[1]>  <hit enter here>

What time of day would you like the backup to start?  Please enter in HH:MM

format.

[]> 02:00

Please enter a name for this backup job:

[]> weekly

Backup "weekly" has been scheduled successfully.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> view

Scheduled Backups:

# Name   IP              Schedule

= ====== =============== ================================

1 weekly To 192.168.15.1 on day 1 of every month at 02:00

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> <hit enter until your back in CLI>

sma1.example.com> commit

Please enter some comments describing your changes:

[]> scheduled a weekly backup

Changes committed: Wed Mar 16 18:09:51 2011 GMT

sma1.example.com>