Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Konfigurationen

Überprüfen

Fehlerbehebung

Befehle zur Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument enthält eine Beispielkonfiguration für einen IOS-zu-IOS IPSec-Tunnel unter Verwendung der AES-Verschlüsselung (Advanced Encryption Standard).

Voraussetzungen

Anforderungen

AES-Verschlüsselungsunterstützung wurde in Cisco IOS® 12.2(13)T eingeführt.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco IOS Softwareversion 12.3(10)

- Cisco 1721-Router

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Konfigurationen

In diesem Dokument werden die hier gezeigten Konfigurationen verwendet.

- Router 1721-A

- Router 1721-B

Router 1721-A

R-1721-A#show run

Building configuration...

Current configuration : 1706 bytes

!

! Last configuration change at 00:46:32 UTC Fri Sep 10 2004

! NVRAM config last updated at 00:45:48 UTC Fri Sep 10 2004

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname R-1721-A

!

boot-start-marker

boot-end-marker

!

!

memory-size iomem 15

mmi polling-interval 60

no mmi auto-configure

no mmi pvc

mmi snmp-timeout 180

no aaa new-model

ip subnet-zero

ip cef

!

!

!

ip audit po max-events 100

no ip domain lookup

no ftp-server write-enable

!

!

!

!

!--- Define Internet Key Exchange (IKE) policy.

crypto isakmp policy 10

!--- Specify the 256-bit AES as the !--- encryption algorithm within an IKE policy.

encr aes 256

!--- Specify that pre-shared key authentication is used.

authentication pre-share

!--- Specify the shared secret.

crypto isakmp key cisco123 address 10.48.66.146

!

!

!--- Define the IPSec transform set.

crypto ipsec transform-set aesset esp-aes 256 esp-sha-hmac

!

!--- Define crypto map entry name "aesmap" that will use !--- IKE to establish the security associations (SA).

crypto map aesmap 10 ipsec-isakmp

!--- Specify remote IPSec peer.

set peer 10.48.66.146

!--- Specify which transform sets !--- are allowed for this crypto map entry.

set transform-set aesset

!--- Name the access list that determines which traffic !--- should be protected by IPSec.

match address acl_vpn

!

!

!

interface ATM0

no ip address

shutdown

no atm ilmi-keepalive

dsl equipment-type CPE

dsl operating-mode GSHDSL symmetric annex A

dsl linerate AUTO

!

interface Ethernet0

ip address 192.168.100.1 255.255.255.0

ip nat inside

half-duplex

!

interface FastEthernet0

ip address 10.48.66.147 255.255.254.0

ip nat outside

speed auto

!--- Apply crypto map to the interface.

crypto map aesmap

!

ip nat inside source list acl_nat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.48.66.1

ip route 192.168.200.0 255.255.255.0 FastEthernet0

no ip http server

no ip http secure-server

!

ip access-list extended acl_nat

!--- Exclude protected traffic from being NAT'ed.

deny   ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

permit ip 192.168.100.0 0.0.0.255 any

!--- Access list that defines traffic protected by IPSec.

ip access-list extended acl_vpn

permit ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

!

end

R-1721-A#

Router 1721-B

R-1721-B#show run

Building configuration...

Current configuration : 1492 bytes

!

! Last configuration change at 14:11:41 UTC Wed Sep 8 2004

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname R-1721-B

!

boot-start-marker

boot-end-marker

!

!

memory-size iomem 15

mmi polling-interval 60

no mmi auto-configure

no mmi pvc

mmi snmp-timeout 180

no aaa new-model

ip subnet-zero

ip cef

!

!

!

ip audit po max-events 100

no ip domain lookup

no ftp-server write-enable

!

!

!

!

!

!--- Define IKE policy.

crypto isakmp policy 10

!--- Specify the 256-bit AES as the !--- encryption algorithm within an IKE policy.

encr aes 256

!--- Specify that pre-shared key authentication is used.

authentication pre-share

!--- Specify the shared secret.

crypto isakmp key cisco123 address 10.48.66.147

!

!

!--- Define the IPSec transform set.

crypto ipsec transform-set aesset esp-aes 256 esp-sha-hmac

!

!--- Define crypto map entry name "aesmap" that uses !--- IKE to establish the SA.

crypto map aesmap 10 ipsec-isakmp

!--- Specify remote IPSec peer.

set peer 10.48.66.147

!--- Specify which transform sets !--- are allowed for this crypto map entry.

set transform-set aesset

!--- Name the access list that determines which traffic !--- should be protected by IPSec.

match address acl_vpn

!

!

!

interface Ethernet0

ip address 192.168.200.1 255.255.255.0

ip nat inside

half-duplex

!

interface FastEthernet0

ip address 10.48.66.146 255.255.254.0

ip nat outside

speed auto

!--- Apply crypto map to the interface.

crypto map aesmap

!

ip nat inside source list acl_nat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.48.66.1

ip route 192.168.100.0 255.255.255.0 FastEthernet0

no ip http server

no ip http secure-server

!

ip access-list extended acl_nat

!--- Exclude protected traffic from being NAT'ed.

deny   ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

permit ip 192.168.200.0 0.0.0.255 any

!--- Access list that defines traffic protected by IPSec.

ip access-list extended acl_vpn

permit ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

!

end

R-1721-B#

Überprüfen

Dieser Abschnitt enthält Informationen, mit denen Sie überprüfen können, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

- show crypto isakmp sa: Zeigt den Status für die Internet Security Association and Key Management Protocol (ISAKMP) SA an.

Router 1721-A

R-1721-A#show crypto isakmp sa

dst             src             state          conn-id slot

10.48.66.147    10.48.66.146    QM_IDLE              1    0

Router 1721-B

R-1721-B#show crypto isakmp sa

dst             src             state          conn-id slot

10.48.66.147    10.48.66.146    QM_IDLE              1    0

- show crypto ipsec sa: Zeigt die Statistiken der aktiven Tunnel an.

Router 1721-A

R-1721-A#show crypto ipsec sa

interface: FastEthernet0

Crypto map tag: aesmap, local addr. 10.48.66.147

protected vrf:

local  ident (addr/mask/prot/port): (192.168.100.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (192.168.200.0/255.255.255.0/0/0)

current_peer: 10.48.66.146:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 30, #pkts encrypt: 30, #pkts digest 30

#pkts decaps: 30, #pkts decrypt: 30, #pkts verify 30

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.48.66.147, remote crypto endpt.: 10.48.66.146

path mtu 1500, ip mtu 1500, ip mtu idb FastEthernet0

current outbound spi: 2EB0BA1A

inbound esp sas:

spi: 0xFECA28BC(4274661564)

transform: esp-256-aes esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: aesmap

sa timing: remaining key lifetime (k/sec): (4554237/2895)

IV size: 16 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x2EB0BA1A(783333914)

transform: esp-256-aes esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: aesmap

sa timing: remaining key lifetime (k/sec): (4554237/2894)

IV size: 16 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

R-1721-A#

Router 1721-B

R-1721-B#show crypto ipsec sa

interface: FastEthernet0

Crypto map tag: aesmap, local addr. 10.48.66.146

protected vrf:

local  ident (addr/mask/prot/port): (192.168.200.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (192.168.100.0/255.255.255.0/0/0)

current_peer: 10.48.66.147:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 30, #pkts encrypt: 30, #pkts digest 30

#pkts decaps: 30, #pkts decrypt: 30, #pkts verify 30

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 5, #recv errors 0

local crypto endpt.: 10.48.66.146, remote crypto endpt.: 10.48.66.147

path mtu 1500, ip mtu 1500, ip mtu idb FastEthernet0

current outbound spi: FECA28BC

inbound esp sas:

spi: 0x2EB0BA1A(783333914)

transform: esp-256-aes esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: aesmap

sa timing: remaining key lifetime (k/sec): (4583188/2762)

IV size: 16 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xFECA28BC(4274661564)

transform: esp-256-aes esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: aesmap

sa timing: remaining key lifetime (k/sec): (4583188/2761)

IV size: 16 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

R-1721-B#

- show crypto engine connections active - Zeigt die Gesamtzahl der Verschlüsselungen/Entschlüsselungen pro SA an.

Router 1721-A

R-1721-A#show crypto engine connections active

ID Interface       IP-Address      State  Algorithm           Encrypt  Decrypt

1 FastEthernet0   10.48.66.147    set    HMAC_SHA+AES_256_C        0        0

2000 FastEthernet0   10.48.66.147    set    HMAC_SHA+AES_256_C        0       30

2001 FastEthernet0   10.48.66.147    set    HMAC_SHA+AES_256_C       30        0

Router 1721-B

R-1721-B#show crypto engine connections active

ID Interface       IP-Address      State  Algorithm           Encrypt  Decrypt

1 FastEthernet0   10.48.66.146    set    HMAC_SHA+AES_256_C        0        0

2000 FastEthernet0   10.48.66.146    set    HMAC_SHA+AES_256_C        0       30

2001 FastEthernet0   10.48.66.146    set    HMAC_SHA+AES_256_C       30        0

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Befehle zur Fehlerbehebung

Hinweis: Bevor Sie Debugbefehle ausgeben, lesen Sie Wichtige Informationen über Debug-Befehle.

- debug crypto ipsec: Zeigt IPSec-Ereignisse an.

- debug crypto isakmp: Zeigt Meldungen über IKE-Ereignisse an.

- debug crypto engine: Zeigt Informationen vom Crypto Engine an.

Weitere Informationen zur Fehlerbehebung für IPSec finden Sie unter IP Security Troubleshooting - Understanding and Using Debug Commands.

Zugehörige Informationen

- Cisco IOS Software Releases 12.2T - Advanced Encryption Standard (AES)

- Konfigurieren der IPSec-Netzwerksicherheit

- IPSec-Support-Seite

- Technischer Support - Cisco Systems