Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Befehle zur Fehlerbehebung

Zugehörige Informationen

Einführung

Diese Beispielkonfiguration verschlüsselt den Datenverkehr aus dem Netzwerk hinter Light in das Netzwerk hinter House (das Netzwerk 192.168.100.x bis 192.168.200.x). Die Network Address Translation (NAT) wird ebenfalls überlastet. Verschlüsselte VPN-Client-Verbindungen sind mit Wild-Card-, vorinstallierten Schlüsseln und Modus-Konfiguration in Light zugelassen. Der Datenverkehr ins Internet wird übersetzt, aber nicht verschlüsselt.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco IOS® Softwareversion 12.2.7 und 12.2.8T

- Cisco Secure VPN Client 1.1 (wird in der IRE-Client-Hilfe als 2.1.12 > Info angezeigt)

- Cisco Router der Serie 3600

Hinweis: Wenn Sie die Cisco Router der Serie 2600 für ein derartiges VPN-Szenario verwenden, müssen die Router mit IPsec-VPN-IOS-Images mit Verschlüsselung installiert werden.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurationen

In diesem Dokument werden diese Konfigurationen verwendet.

- Lichtkonfiguration

- Hauskonfiguration

- VPN-Client-Konfiguration

Lichtkonfiguration

Current configuration : 2047 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Light

!

boot system flash:c3660-ik9o3s-mz.122-8T

!

ip subnet-zero

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

!--- IPsec Internet Security Association and !--- Key Management Protocol (ISAKMP) policy.

crypto isakmp policy 5

hash md5

authentication pre-share

!--- ISAKMP key for static LAN-to-LAN tunnel !--- without extended authenticaton (xauth).

crypto isakmp key cisco123 address 10.64.10.45 no-xauth

!--- ISAKMP key for the dynamic VPN Client.

crypto isakmp key 123cisco address 0.0.0.0 0.0.0.0

!--- Assign the IP address to the VPN Client.

crypto isakmp client configuration address-pool local test-pool

!

!

!

crypto ipsec transform-set testset esp-des esp-md5-hmac

!

crypto dynamic-map test-dynamic 10

set transform-set testset

!

!

!--- VPN Client mode configuration negotiation, !--- such as IP address assignment and xauth.

crypto map test client configuration address initiate

crypto map test client configuration address respond

!--- Static crypto map for the LAN-to-LAN tunnel.

crypto map test 5 ipsec-isakmp

set peer 10.64.10.45

set transform-set testset

!--- Include the private network-to-private network traffic !--- in the encryption process.

match address 115

!--- Dynamic crypto map for the VPN Client.

crypto map test 10 ipsec-isakmp dynamic test-dynamic

!

call rsvp-sync

!

!

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

controller E1 2/0

!

!

!

interface FastEthernet0/0

ip address 10.64.10.44 255.255.255.224

ip nat outside

duplex auto

speed auto

crypto map test

!

interface FastEthernet0/1

ip address 192.168.100.1 255.255.255.0

ip nat inside

duplex auto

speed auto

!

interface BRI4/0

no ip address

shutdown

!

interface BRI4/1

no ip address

shutdown

!

interface BRI4/2

no ip address

shutdown

!

interface BRI4/3

no ip address

shutdown

!

!--- Define the IP address pool for the VPN Client.

ip local pool test-pool 192.168.1.1 192.168.1.254

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.64.10.33

ip http server

ip pim bidir-enable

!

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

access-list 110 deny   ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

access-list 110 deny   ip 192.168.100.0 0.0.0.255 192.168.1.0 0.0.0.255

access-list 110 permit ip 192.168.100.0 0.0.0.255 any

!--- Include the private network-to-private network traffic !--- in the encryption process.

access-list 115 permit ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

!

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

line 97 108

line aux 0

line vty 0 4

!

end

Hauskonfiguration

Current configuration : 1689 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname house

!

boot system flash:c3660-jk8o3s-mz.122-7.bin

!

ip subnet-zero

!

!

no ip domain-lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

!--- IPsec ISAKMP policy.

crypto isakmp policy 5

hash md5

authentication pre-share

!--- ISAKMP key for static LAN-to-LAN tunnel without xauth authenticaton.

crypto isakmp key cisco123 address 10.64.10.44 no-xauth

!

!

crypto ipsec transform-set testset esp-des esp-md5-hmac

!

!--- Static crypto map for the LAN-to-LAN tunnel.

crypto map test 5 ipsec-isakmp

set peer 10.64.10.44

set transform-set testset

!--- Include the private network-to-private network traffic !--- in the encryption process.

match address 115

!

call rsvp-sync

cns event-service server

!

!

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

!

!

interface FastEthernet0/0

ip address 10.64.10.45 255.255.255.224

ip nat outside

duplex auto

speed auto

crypto map test

!

interface FastEthernet0/1

ip address 192.168.200.1 255.255.255.0

ip nat inside

duplex auto

speed auto

!

interface BRI2/0

no ip address

shutdown

!

interface BRI2/1

no ip address

shutdown

!

interface BRI2/2

no ip address

shutdown

!

interface BRI2/3

no ip address

shutdown

!

interface FastEthernet4/0

no ip address

shutdown

duplex auto

speed auto

!

!--- Exclude the private network traffic !--- from the dynamic (dynamic association to a pool) NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.64.10.33

no ip http server

ip pim bidir-enable

!

!--- Exclude the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

access-list 110 permit ip 192.168.200.0 0.0.0.255 any

!--- Include the private network-to-private network traffic !--- in the encryption process.

access-list 115 permit ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

!--- Exclude the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

VPN-Client-Konfiguration

Network Security policy:

1- TOLIGHT

My Identity

Connection security: Secure

Remote Party Identity and addressing

ID Type: IP subnet

192.168.100.0

255.255.255.0

Port all Protocol all

Connect using secure tunnel

ID Type: IP address

10.64.10.44

Pre-shared Key=123cisco

Authentication (Phase 1)

Proposal 1

Authentication method: pre-shared key

Encryp Alg: DES

Hash Alg: MD5

SA life: Unspecified

Key Group: DH 1

Key exchange (Phase 2)

Proposal 1

Encapsulation ESP

Encrypt Alg: DES

Hash Alg: MD5

Encap: tunnel

SA life: Unspecified

no AH

2- Other Connections

Connection security: Non-secure

Local Network Interface

Name: Any

IP Addr: Any

Port: All

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- show crypto ipsec sa: Zeigt die Security Associations (SAs) der Phase 2.

- show crypto isakmp sa - Zeigt die SAs der Phase 1 an.

Fehlerbehebung

In diesem Abschnitt finden Sie eine Fehlerbehebung für Ihre Konfiguration.

Befehle zur Fehlerbehebung

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Hinweis: Beachten Sie vor der Verwendung von Debug-Befehlen die Informationen zu Debug-Befehlen.

- debug crypto ipsec - Zeigt die IPsec-Aushandlungen für Phase 2.

- debug crypto isakmp - Zeigt die ISAKMP-Verhandlungen für Phase 1.

- debug crypto engine - Zeigt den verschlüsselten Datenverkehr an.

- clear crypto isakmp: Löscht die SAs für Phase 1.

- clear crypto sa: Löscht die SAs für Phase 2.

Zugehörige Informationen

- Konfigurieren der IPSec-Netzwerksicherheit

- Konfigurieren des Internet Key Exchange Security Protocol

- Support-Seite für IPsec-Aushandlung/IKE-Protokoll

- Cisco Secure VPN Client - Support-Seiten

- Technischer Support - Cisco Systems