Inhalt

Einführung

Problem

Lösung

Referenzen

Einführung

Dieses Dokument beschreibt ein Problem mit der Installation von Sicherheitsanwendungscontainern, wenn Sicherheitsrichtlinien in einer Gerätevorlage verwendet werden, und wie dieses Problem gelöst werden kann.

Problem

Der Benutzer kann keine Gerätevorlage mit einer Sicherheitsrichtlinie anhängen, die einen Sicherheitsanwendungscontainer benötigt, um mit diesem Fehler in einem vManage installiert zu werden:

Failed to install 1/1 Security App container (app-hosting-UTD-Snort-Feature-aarch64_be-1.0.8_SV2.9.11.1_XE16.10). Failed to enabled iox: null

05 Apr 2019 11:46:09 AM IST

[5-Apr-2019 6:16:09 UTC] Total number of Security App containers to be installed: 1. Security App containers to be installed are following: [app-hosting-UTD-Snort-Feature-aarch64_be-1.0.8_SV2.9.11.1_XE16.10]

[5-Apr-2019 6:16:09 UTC] Started 1/1 Security app container (app-hosting-UTD-Snort-Feature-aarch64_be-1.0.8_SV2.9.11.1_XE16.10) installation

[5-Apr-2019 6:16:10 UTC] Checking if iox is enabled on device

[5-Apr-2019 6:16:18 UTC] Failed to install 1/1 Security App container (app-hosting-UTD-Snort-Feature-aarch64_be-1.0.8_SV2.9.11.1_XE16.10).

Failed to enabled iox: null

Im Ordner /var/log/nms/vmanage-server.log eines vManage-Controllers wird dieser Fehler angezeigt:

05-Apr-2019 08:41:54,488 UTC ERROR [vManage] [AppHostingTemplateProcessor] (device-action-lxc_install-10) |default| Error while enabling iox on device-C1111X-8P-FGL230513Y0-1.1.1.1: rpc-reply error: <rpc-reply xmlns="urn:ietf:params:xml:ns:netconf:base:1.0" xmlns:nc="urn:ietf:params:xml:ns:netconf:base:1.0" message-id="5">

<rpc-error>

<error-type>application</error-type>

<error-tag>invalid-value</error-tag>

<error-severity>error</error-severity>

<error-message unknown:lang="en">inconsistent value: Device refused one or more commands</error-message>

<error-info>

<severity xmlns=" http://cisco.com/yang/cisco-ia">error_cli</severity>;

<detail xmlns=" http://cisco.com/yang/cisco-ia">;

<bad-cli>

<bad-command>iox</bad-command>

<error-location>1</error-location>

<parser-response/>        </bad-cli>

</detail>

</error-info>

</rpc-error>

</rpc-reply>

at com.tailf.jnc.NetconfSession.recv_rpc_reply_ok(Unknown Source) [JNC-1.2.jar:]

at com.tailf.jnc.NetconfSession.recv_rpc_reply_ok(Unknown Source) [JNC-1.2.jar:]

at com.tailf.jnc.NetconfSession.commit(Unknown Source) [JNC-1.2.jar:]

at com.viptela.vmanage.server.device.common.NetConfClient.commitAndUnlock(NetConfClient.java:458) [classes:]

at com.viptela.vmanage.server.deviceaction.processor.config.AppHostingTemplateProcessor.checkAndEnableIox(AppHostingTemplateProcessor.java:358) [classes:]

at com.viptela.vmanage.server.deviceaction.processor.config.AppHostingTemplateProcessor.preTemplatePushCheck(AppHostingTemplateProcessor.java:173) [classes:]

at com.viptela.vmanage.server.deviceaction.processor.service.lxc.LxcInstallActionProcessor$LxcInstallActionWorker.startMaintenanceDeviceActions(LxcInstallActionProcessor.java:340) [classes:]

at com.viptela.vmanage.server.deviceaction.DefaultActionWorker.startDeviceAction(DefaultActionWorker.java:82) [classes:]

at com.viptela.vmanage.server.deviceaction.AbstractActionWorker.call(AbstractActionWorker.java:117) [classes:]

at com.viptela.vmanage.server.deviceaction.AbstractActionWorker.call(AbstractActionWorker.java:35) [classes:]

at java.util.concurrent.FutureTask.run(FutureTask.java:266) [rt.jar:1.8.0_162]

at java.util.concurrent.ThreadPoolExecutor.runWorker(ThreadPoolExecutor.java:1149) [rt.jar:1.8.0_162]

at java.util.concurrent.ThreadPoolExecutor$Worker.run(ThreadPoolExecutor.java:624) [rt.jar:1.8.0_162]

at java.lang.Thread.run(Thread.java:748) [rt.jar:1.8.0_162]

05-Apr-2019 08:41:54,496 UTC ERROR [vManage] [LxcInstallActionProcessor] (device-action-lxc_install-10) |default| On device C1111X-8P-FGL230513Y0-1.1.1.1, Failed to install 1/1 Security App container (app-hosting-UTD-Snort-Feature-aarch64_be-1.0.8_SV2.9.11.1_XE16.10).

Failed to enabled iox: null

05-Apr-2019 08:41:54,524 UTC INFO  [vManage] [DeviceActionStatusDAO] (device-action-lxc_install-10) |default| End task lxc_install

05-Apr-2019 08:41:54,533 UTC INFO  [vManage] [DeviceActionStatusDAO] (device-action-lxc_install-10) |default| Publish client event: ACTIVITY

05-Apr-2019 08:41:54,533 UTC INFO  [vManage] [DeviceActionStatusDAO] (device-action-lxc_install-10) |default| Publish client event: DEVICE_ACTION

Wie oben zu sehen, einige nicht sehr informative Meldung "Failed to enabled iox: Null" ist in beiden Ausgaben zu sehen, was manchmal bedeutet, dass der Arbeitsspeicher für das ausgewählte, mit dem Gerät verbundene Security App Hosting-Profil nicht ausreicht.

Lösung

Da Speicherprobleme aufgrund des Security App Hosting-Profils vermutet wurden, wird es überprüft und anschließend festgestellt, dass das Standardprofil verwendet wird.

Im Gegensatz zu dem hohen Profil, das bekanntermaßen Probleme verursacht, wenn das Gerät nicht über genügend Speicher verfügt.

Im nächsten Schritt wurde der Speicherverbrauch auf dem Gerät selbst überprüft und es wurde entdeckt, dass der C111X-Router mit 8 GB RAM nur etwa 1 GB freien Speicher hat (bitte beachten Sie Free):

cEdge10#show memory platform

Virtual memory   : 11512180736

Pages resident   : 730200

Major page faults: 2501

Minor page faults: 114581800

Architecture     : aarch64_be

Memory (kB)

Physical       : 3758804

Total          : 3758804

Used           : 2620884

Free           : 1137920

Active         : 2191472

Inactive       : 807536

Inact-dirty    : 0

Inact-clean    : 0

Dirty          : 0

AnonPages      : 1473636

Bounce         : 0

Cached         : 1212660

Commit Limit   : 1813864

Committed As   : 3224504

High Total     : 0

High Free      : 0

Low Total      : 3758804

Low Free       : 1137920

Mapped         : 416524

NFS Unstable   : 0

Page Tables    : 17160

Slab           : 170624

Writeback      : 0

Swap (kB)

Total          : 0

Used           : 0

Free           : 0

Cached         : 0

Buffers (kB)     : 312844

Load Average

1-Min          : 0.60

5-Min          : 0.66

15-Min         : 0.86

Gleichzeitig wurde nach der Ausgabe der Programmversion bestätigt, dass das Gerät über 8 GB RAM verfügt (physischer Speicher beachten):

cisco C1111X-8P (1RU) processor with 1453914K/6147K bytes of memory.

Processor board ID FGL230513Y0

1 Virtual Ethernet interface

10 Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

8388608K bytes of physical memory.

6336511K bytes of flash memory at bootflash:.

Der Speichermangel ist der Grund, warum der Sicherheitsanwendungscontainer nicht installiert werden kann. Daher wird die ROMmon-Version überprüft, da die ROMmon-Mindestanforderung für die von IOS-XE SD-WAN unterstützten Plattformen existiert. Diese Version befindet sich auf dem Gerät:

cEdge10#show platform | b Firmware

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

0         17100501            16.8(1r)

R0        17100501            16.8(1r)

F0        17100501            16.8(1r)

Während Sie 16.10.2 Software ausführen und laut Release Notes ist die ROMmon Version mindestens 16.9(1r) erforderlich, sodass ROMmon aktualisiert wurde und der freie Speicher erneut überprüft wird:

cEdge10#sh memory platform

Virtual memory   : 11516805120

Pages resident   : 708276

Major page faults: 2303

Minor page faults: 1705306

Architecture     : aarch64_be

Memory (kB)

Physical       : 8143440

Total          : 8143440

Used           : 2571908

Free           : 5571532

Active         : 2213868

Inactive       : 1128140

Inact-dirty    : 0

Inact-clean    : 0

Dirty          : 8

AnonPages      : 1410328

Bounce         : 0

Cached         : 1619664

Commit Limit   : 4006184

Committed As   : 3136948

High Total     : 0

High Free      : 0

Low Total      : 8143440

Low Free       : 5571532

Mapped         : 397692

NFS Unstable   : 0

Page Tables    : 17216

Slab           : 158776

Writeback      : 0

Beachten Sie in der obigen Ausgabe den freien und physischen Speicher (mehr als 5 GB und 8 GB entsprechend).

Nachdem die Installation dieses Security App-Containers erneut angestoßen wurde, während die Gerätevorlage entfernt und wieder angefügt wird und die Meldungen über eine erfolgreiche Installation angezeigt werden:

%IOSXE-5-PLATFORM: R0/0: VCONFD_NOTIFIER: Install status: cc761b3b-cb3b-4070-81de-9b842fd68b27 download-start. Message Downloading http://10.10.10.100:8080/software/package/lxc/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar?deviceId=10.10.10.10

%Cisco-SDWAN-cEdge10-action_notifier-6-INFO-1400002: R0/0: VCONFD_NOTIFIER: Notification: 4/5/2019 09:54:4 system-software-install-status severity-level:minor host-name:cEdge10 system-ip:10.10.10.10 status:download-start install-id:cc761b3b-cb3b-4070-81de-9b842fd68b27 message:Downloading http://10.10.10.100:8080/software/package/lxc/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar?deviceId=10.10.10.10

%IOSXE-5-PLATFORM: R0/0: VCONFD_NOTIFIER: Install status: cc761b3b-cb3b-4070-81de-9b842fd68b27 download-complete. Message Downloaded app image to /bootflash/.UTD_IMAGES/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar

%Cisco-SDWAN-cEdge10-action_notifier-6-INFO-1400002: R0/0: VCONFD_NOTIFIER: Notification: 4/5/2019 09:54:5 system-software-install-status severity-level:minor host-name:cEdge10 system-ip:10.10.10.10 status:download-complete install-id:cc761b3b-cb3b-4070-81de-9b842fd68b27 message:Downloaded app image to /bootflash/.UTD_IMAGES/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar

%IOSXE-5-PLATFORM: R0/0: VCONFD_NOTIFIER: Install status: 9fd36cd6-f601-4fac-a5b0-1a36f06ba18a verification-complete. Message NOOP

%Cisco-SDWAN-cEdge10-action_notifier-6-INFO-1400002: R0/0: VCONFD_NOTIFIER: Notification: 4/5/2019 9:54:5 system-software-install-status severity-level:minor host-name:cEdge10 system-ip:10.10.10.10 status:verification-complete install-id:cc761b3b-cb3b-4070-81de-9b842fd68b27 message:NOOP

%VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: R0/0: vman: Package 'iox-utd_1.0.8_SV2.9.11.1_XE16.10.tar' for service container 'utd' is 'Cisco signed', signing level cached on original install is 'Cisco signed'

%VIRT_SERVICE-5-INSTALL_STATE: Successfully installed virtual service utd

%IOSXE-5-PLATFORM: R0/0: VCONFD_NOTIFIER: Install status: cc761b3b-cb3b-4070-81de-9b842fd68b27 install-start. Message Success, App state: DEPLOYED

%Cisco-SDWAN-cEdge10-action_notifier-6-INFO-1400002: R0/0: VCONFD_NOTIFIER: Notification: 4/5/2019 09:54:5 system-software-install-status severity-level:minor host-name:ISR-4331 system-ip:10.10.10.10 status:install-start install-id:cc761b3b-cb3b-4070-81de-9b842fd68b27 message:Success, App state: DEPLOYED

Hier ist zu sehen, wie eine erfolgreiche Installation von vManage aussieht:

[6-Apr-2019 12:38:13 CEST] Total number of Security App containers to be installed: 1. Security App containers to be installed are following: [app-hosting-UTD-Snort-Feature-x86_64-1.0.8_SV2.9.11.1_XE16.10]

[6-Apr-2019 12:38:13 CEST] Started 1/1 Security app container (app-hosting-UTD-Snort-Feature-x86_64-1.0.8_SV2.9.11.1_XE16.10) installation

[6-Apr-2019 12:38:14 CEST] Checking if iox is enabled on device

[6-Apr-2019 12:38:17 CEST] Waiting for iox to be enabled on device

[6-Apr-2019 12:40:05 CEST] iox enable

[6-Apr-2019 12:40:05 CEST] Iox enabled on device

[6-Apr-2019 12:40:11 CEST] Security App container image: app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar

[6-Apr-2019 12:40:19 CEST] Connection Instance: 0, Color: biz-internet

[6-Apr-2019 12:40:19 CEST] Downloading http://10.10.10.100:8080/software/package/lxc/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar?deviceId=10.10.10.10

[6-Apr-2019 12:56:45 CEST] Downloaded app image to /bootflash/.UTD_IMAGES/app-hosting_UTD-Snort-Feature-x86_64_1.0.8_SV2.9.11.1_XE16.10_secapp-ucmk9.16.10.2.1.0.8_SV2.9.11.1_XE16.10.x86_64.tar

[6-Apr-2019 12:56:48 CEST]

[6-Apr-2019 12:57:19 CEST] Success, App state: DEPLOYED

[6-Apr-2019 12:57:27 CEST] utd installed successfully

Current state is deployed

[6-Apr-2019 12:57:27 CEST] app-hosting-UTD-Snort-Feature-x86_64 installed in DEPLOYED state

[6-Apr-2019 12:57:27 CEST] Finished 1/1 Security app container (app-hosting-UTD-Snort-Feature-x86_64-1.0.8_SV2.9.11.1_XE16.10) installation

Referenzen

- https://sdwan-docs.cisco.com/Product_Documentation/vManage_Help/Release_18.4/Security/Configuring_SD-WAN_Security/Configuring_the_Security_Virtual_Image_for_IPS%2F%2FIDS_and_URL_Filtering

- https://sdwan-docs.cisco.com/Product_Documentation/Software_Features/Release_18.4/Release_Notes/Release_Notes_for_IOS_XE_SD-WAN_Release_16.10_and_SD-WAN_Release_18.4#ROMmon_Requirements_Matrix