Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Konzepte

Konfigurieren

UTD deinstallieren

Precheck

Konfigurationen

Überprüfung

Konfigurieren

Installation von UTD

Precheck

Konfigurationen

Überprüfung

Fehlerbehebung

Zugehörige Informationen

Einleitung

In diesem Dokument wird das Verfahren zur Installation und Deinstallation von Unified Threat Defense (UTD) über CLI in SDWAN-Routern beschrieben.

Voraussetzungen

Anforderungen

Cisco empfiehlt, dass Sie über Kenntnisse in folgenden Bereichen verfügen:

- Cisco Software-defined Wide Area Network (SD-WAN)

- Cisco IOS® XE Befehlszeilenschnittstelle (CLI)

Verwendete Komponenten

Dieses Dokument basiert auf den folgenden Software- und Hardwareversionen:

- Router ISR4461/K9

- Softwareversion 17.3.4

- Router im Controller-Modus

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle verstehen.

Hintergrundinformationen

Diese Schritte müssen angewendet werden, wenn sich der cedge im CLI-Modus befindet oder keine Kontrollverbindung zwischen vManage und cedge besteht.

Wenn Sie jedoch eine Kontrollebene haben und sich Ihr cedge im vManage-Modus befindet, lesen Sie diesen anderen Artikel .

Konzepte

Spezifische Anforderungen für dieses Dokument:

- Cisco vManage Version 20.3 oder höher

- Cisco Integrated Services Router der Serie 4431, Version 17.3.4

Weitere Informationen zu unterstützten Plattformen finden Sie unter UTD für SDWAN-unterstützte Plattformen und Einschränkungen.

Konfigurieren

UTD deinstallieren

Precheck

Dies ist ein Beispiel dafür, wie ein Cedge-Router wie eine vorherige UTD-Deinstallation aussieht.

* Das Gerät befindet sich im Controller-Modus, und es wurde keine Vorlage angehängt, aber die UTD-Konfiguration wurde angewendet.

cedge#show sdwan system

Viptela (tm) vEdge Operating System Software

Copyright (c) 2013-2022 by Viptela, Inc.

Controller Compatibility: 20.3

Version: 17.03.04a.0.5574

Build: Not applicable

Model name: ISR4461/K9 Services: None vManaged: false Commit pending: false Configuration template: None cedge#show platform software device-mode Device Operating-mode: Controller-Managed cedge#show run | sec utd utd multi-tenancy utd engine standard multi-tenancy threat-inspection whitelist profile Sig-white-list generator id 3 signature id 22089 generator id 3 signature id 36208 threat-inspection profile IPS-POLICY threat detection policy balanced logging level alert whitelist profile Sig-white-list policy utd-policy-vrf-1 vrf 511 all-interfaces threat-inspection profile IPS-POLICY app-hosting appid utd app-vnic gateway0 virtualportgroup 0 guest-interface 0 guest-ipaddress 192.168.1.2 netmask 255.255.255.252 app-vnic gateway1 virtualportgroup 1 guest-interface 1 guest-ipaddress 192.0.2.2 netmask 255.255.255.252 app-resource package-profile urlf-low start cedge# cedge#show running-config | section VirtualPortGroup0 interface VirtualPortGroup0 description Management interface vrf forwarding 65529 ip address 192.168.1.1 255.255.255.252 no mop enabled no mop sysid cedge#show running-config | section VirtualPortGroup1 interface VirtualPortGroup1 description Data interface ip address 192.0.2.1 255.255.255.252 no mop enabled no mop sysid cedge#

Hinweis: Die UTD-Konfiguration muss vor der Deinstallation entfernt werden.

Konfigurationen

1. UTD-Dienst beenden.

cedge#config-transaction

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no start

cedge(config-app-hosting)# commit

Commit complete.

Hinweis: Der UTD-Status ändert sich von "Running" (Wird ausgeführt) in "Deployed" (Bereitgestellt), sobald kein Start angewendet wird.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#

2. Entfernen der UTD-Konfiguration

cedge#config-transaction

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no policy utd-policy-vrf-1

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge#config-transaction

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no threat-inspection whitelist profile Sig-white-list

cedge(config-utd-multi-tenancy)# no threat-inspection profile IPS-POLICY

cedge(config-utd-multi-tenancy)# exit

cedge(config)# commit

Commit complete.

cedge(config)# no utd engine standard multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge#config-transaction

cedge(config)# no utd multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting)# no app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting)# no app-resource package-profile urlf-low

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#exit

cedge(config)# no app-hosting appid utd

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no interface VirtualPortGroup0

cedge(config)# no interface VirtualPortGroup1

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no iox

cedge(config)# commit

Commit complete.

cedge(config)#

3. Validierung.

Dies ist ein Beispiel dafür, wie ein Edge-Router aussieht, wenn die UTD-Konfiguration entfernt wurde.

cedge#show running-config | section iox

cedge#show running-config | section VirtualPortGroup0

cedge#show running-config | section VirtualPortGroup1

cedge#show running-config | section utd

cedge#

cedge#show platform software utd global

UTD Global state

=========================

Engine : Standard

Global Inspection : Disabled

Operational Mode : Intrusion Detection

Fail Policy : Fail-open

Container technology : LXC

Redirect interface : Not specified

UTD interfaces

No interfaces are protected by UTD

<snipped>

Hinweis: Obwohl die Konfiguration entfernt wurde, wird UTD als installiert angezeigt. Das wird erwartet.

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 0

<snipped>

cedge#show app-hosting list

The process for the command is not responding or is otherwise unavailable   >>>> Expected because UTD config was removed but UTD engine remains installed

** Before to remove Configuration **

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3

** After configuration is removed **

cedge#

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None

4. Entfernen Sie den UTD-Motor.

Tipp: Sie müssen iox und app-hosting appid utd aktiviert haben, um die UTD-Engine zu deinstallieren.

Hier ist ein Beispiel dafür, was passiert, wenn UTD ohne Iox- und App-Hosting-Aktivierung gelöscht wird.

cedge#app-hosting uninstall appid utd    >>>> No action is taken.

cedge#

Dies ist ein Beispiel für die erfolgreiche Deinstallation von UTD.

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

cedge#app-hosting uninstall appid utd

Uninstalling 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 20:26:31.653: %VIRT_SERVICE-5-INSTALL_STATE: Successfully uninstalled virtual service utd

*Mar 3 20:26:32.706: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Uninstall succeeded: utd uninstalled successfully

cedge#

Überprüfung

Führen Sie die nächsten Befehle aus, um zu überprüfen, ob UTD entfernt wurde.

cedge#show app-hosting list

No App found

cedge#show virtual-service version name utd running

% Error: Virtual-service utd is not found

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 0

Total virtual services activated : 0

<snipped>

Konfigurieren

Installation von UTD

Precheck

Überprüfen Sie die von UTD unterstützte Version, und laden Sie sie in den Bootflash herunter.

cedge#

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#

cedge#dir bootflash: | i utd

36 -rw- 55050240 Mar 1 2022 01:08:29 +00:00 secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

cedge#

Konfigurationen

1. Iox und App-Hosting aktivieren.

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

2. Installieren Sie das UTD-Modul.

cedge#app-hosting install appid utd package bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

Installing package 'bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 21:07:43.529: %VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: R0/0: vman: Package 'secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for service container 'utd' is 'Cisco signed', signing level cached on original install is 'Cisco signed'

*Mar 3 21:07:56.332: %VIRT_SERVICE-5-INSTALL_STATE: Successfully installed virtual service utd

*Mar 3 21:07:56.922: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Install succeeded: utd installed successfully Current state is deployed

cedge#

3. Stellen Sie sicher, dass das UTD-Modul installiert ist. Ausführen der nächsten Befehle

Hinweis: Der Status "BEREITGESTELLT" bedeutet, dass UTD installiert, aber nicht konfiguriert ist. Der Status RUNNING bedeutet "UTD installiert und konfiguriert".

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None >>>> "None", it is expected due to the fact that no config yet

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3 >>>> UTD Package installed

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1 >>>> Installed 1 but Activated 0 as expected

Total virtual services activated : 0

4. Um den Status "RUNNING" für UTD festzulegen, fahren Sie mit der Konfiguration von IPS/URL fort. Dies ist ein Beispiel aus dem Labor.

cedge#config-transaction

cedge(config)# interface VirtualPortGroup0

cedge(config-if)# description Management interface

cedge(config-if)# vrf forwarding 65529

cedge(config-if)# ip address 192.168.1.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# interface VirtualPortGroup1

cedge(config-if)# description Data interface

cedge(config-if)# ip address 192.168.2.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.1.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.2.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-resource package-profile urlf-low

cedge(config-app-hosting)# start

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

cedge(config-app-hosting)# exit

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# threat-inspection whitelist profile Sig-white-list

cedge(config-utd-mt-whitelist)# generator id 3 signature id 22089

cedge(config-utd-mt-whitelist)# generator id 3 signature id 36208

cedge(config-utd-mt-whitelist)# exit

cedge(config-utd-multi-tenancy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-threat)# threat detection

cedge(config-utd-mt-threat)# policy balanced

cedge(config-utd-mt-threat)# whitelist profile Sig-white-list

cedge(config-utd-mt-threat)# logging level alert

cedge(config-utd-mt-threat)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# policy utd-policy-vrf-1

cedge(config-utd-mt-policy)# vrf 511

cedge(config-utd-mt-policy)# all-interfaces

cedge(config-utd-mt-policy)# fail close

cedge(config-utd-mt-policy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-policy)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# end

cedge#

5. Sicherstellen, dass die Konfiguration abgeschlossen ist

cedge#show run | section utd

utd multi-tenancy

utd engine standard multi-tenancy

threat-inspection whitelist profile Sig-white-list

generator id 3 signature id 22089

generator id 3 signature id 36208

threat-inspection profile IPS-POLICY

threat detection

policy balanced

logging level alert

whitelist profile Sig-white-list

policy utd-policy-vrf-1

vrf 511

all-interfaces

threat-inspection profile IPS-POLICY

fail close

app-hosting appid utd

app-vnic gateway0 virtualportgroup 0 guest-interface 0

guest-ipaddress 192.168.1.2 netmask 255.255.255.252

app-vnic gateway1 virtualportgroup 1 guest-interface 1

guest-ipaddress 192.168.2.2 netmask 255.255.255.252

app-resource package-profile urlf-low

start

cedge#

Überprüfung

1. Führen Sie show logging aus, und stellen Sie sicher, dass Sie ähnliche Protokolle erhalten, wie als Nächstes gezeigt.

*Mar 3 23:17:17.573: %LINK-3-UPDOWN: Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:18.094: %LINK-3-UPDOWN: Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:18.572: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:19.095: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:25.630: %LINEPROTO-5-UPDOWN: Line protocol on Interface Tunnel2000000001, changed state to up

*Mar 3 23:19:36.863: %VIRT_SERVICE-5-ACTIVATION_STATE: Successfully activated virtual service utd

*Mar 3 23:19:37.577: %IM-6-START_MSG: R0/0: ioxman: app-hosting: Start succeeded: utd started successfully Current state is running

*Mar 3 23:19:38.318: %ONEP_BASE-6-CONNECT: [Element]: ONEP session Application:utd_snort Host:cedge ID:6633 User: has connected.

*Mar 3 23:19:50.428: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has started

*Mar 3 23:20:06.460: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has completed

*Mar 3 23:20:08.389: %IOSXE-5-PLATFORM: R0/0: cpp_cp: QFP:0.0 Thread:011 TS:00000780131568867961 %SDVT-5-SDVT_HEALTH_UP: Service node is up for channel Threat Defense. Current Health: Green, Previous Health: Down

Hinweis: Der aktuelle Zustand ändert sich von Nach unten zu Grün, wenn die Konfiguration erfolgreich durchgeführt wurde.

2. Führen Sie diese Befehle aus, um die UTD-Installation zu überprüfen.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      RUNNING   >>> State change from Deployed to Running

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3 >>>> Changed from NONE to "1.0.16_SV2.9.16.1_XE17.3" after config.

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 1 >>>>>>>>> Now it is activated

cedge#show virtual-service version name utd running Virtual service utd running version: Name : UTD-Snort-Feature Version : 1.0.16_SV2.9.16.1_XE17.3

Fehlerbehebung

In diesem Abschnitt finden Sie Informationen zur Behebung von Fehlern in Ihrer Konfiguration.

Nützliche Befehle

show platform software device-mode

show app-hosting list

show virtual-service version name utd running

show utd engine standard version

show utd engine standard status

show virtual-service

Zugehörige Informationen

- Leitfaden zur Sicherheitskonfiguration: Unified Threat Defense, Cisco IOS XE 17

- Leitfaden zur Sicherheitskonfiguration: Unified Threat Defense, Cisco IOS XE 16

- UTD für SDWAN-unterstützte Plattformen und Einschränkungen.

- Installieren Sie UTD mit vManage.