Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Topologie

Anfängliche Überprüfung

BGP-Konfiguration

Segment-Routing-Konfiguration

Abschließende Überprüfungen

Einleitung

In diesem Dokument wird der Prozess zur Verifizierung der End-to-End-Anbindung eines Segment Routing Service Providers (SP) mit der Cisco IOS®XR-Software beschrieben.

Voraussetzungen

Anforderungen

Cisco empfiehlt, dass Sie über Kenntnisse in folgenden Bereichen verfügen:

- Grundlegendes IP-Routing

- Kenntnisse der Cisco IOS- und Cisco IOS XR-Befehlszeile

Verwendete Komponenten

Die Informationen in diesem Dokument basierend auf folgenden Software- und Hardware-Versionen:

- Router mit Cisco IOS XR-Software

- Router mit Cisco IOS-Software

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle verstehen.

Hintergrundinformationen

In diesem Dokument wird die grundlegende Konfiguration zum Erstellen einer Segment Routing-Cloud und zum Überprüfen der End-to-End-Konnektivität auf Cisco IOS XR-Routern erläutert.

Topologie

Netzwerktopologie

Anfängliche Überprüfung

BGP-Konfiguration

CE-1

Loopback55 simuliert die LAN-Seite des Routers CE-1. Sie können dieses Präfix über eBGP dem PE-1-Nachbarn ankündigen:

CE-1#show run | section r b

router bgp 65535

bgp router-id 10.1.1.1

bgp log-neighbor-changes

redistribute connected

redistribute eigrp 10

neighbor 172.16.20.2 remote-as 8181

CE-1#show ip bgp neighbors 172.16.20.2 advertised-routes

BGP table version is 25, local router ID is 10.1.1.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.1.1.1/32      0.0.0.0                  0         32768 ?

*>   10.11.11.11/32   192.168.1.1          10880         32768 ?

*> 10.55.55.55/32 0.0.0.0 0 32768 ?

*>   172.16.20.0/30   0.0.0.0                  0         32768 ?

*>   192.168.1.0      0.0.0.0                  0         32768 ?

Total number of prefixes 5

PE-1

Dieser Router hat das Präfix 10.55.55.55/32 erhalten und verfügt über eine Konnektivität. Nun kann er dies der Service Provider-Cloud ankündigen:

RP/0/RP0/CPU0:PE-1#show run vrf

Fri Jan 27 15:07:10.465 UTC

vrf Yellow

address-family ipv4 unicast

import route-target

200:200

!

export route-target

200:200

!

RP/0/RP0/CPU0:PE-1#show run router bgp

Fri Jan 27 14:54:33.488 UTC

router bgp 8181

bgp router-id 10.2.2.2

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor 10.3.3.3

remote-as 8181

update-source Loopback0

address-family vpnv4 unicast

route-policy PASS in

route-policy PASS out

!

!

vrf Yellow

rd 200:200

address-family ipv4 unicast

!

neighbor 172.16.20.1

remote-as 65535

address-family ipv4 unicast

route-policy PASS in

route-policy PASS out

as-override

!

RP/0/RP0/CPU0:PE-1#show bgp vrf Yellow ipv4 unicast neighbors 172.16.20.1 routes

Fri Jan 27 14:54:48.433 UTC

BGP VRF Yellow, state: Active

BGP Route Distinguisher: 200:200

VRF ID: 0x60000001

BGP router identifier 10.2.2.2, local AS number 8181

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000001   RD version: 73

BGP main routing table version 73

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 200:200 (default for vrf Yellow)

*> 10.1.1.1/32        172.16.20.1              0             0 65535 ?

*> 10.11.11.11/32     172.16.20.1          10880             0 65535 ?

*> 10.55.55.55/32 172.16.20.1 0 0 65535 ?

*> 172.16.20.0/30     172.16.20.1              0             0 65535 ?

*> 192.168.1.0/24     172.16.20.1              0             0 65535 ?

Processed 5 prefixes, 5 paths

RP/0/RP0/CPU0:PE-1#ping vrf Yellow 10.55.55.55

Fri Jan 27 14:55:06.077 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.55.55.55, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/7 ms

CE-2

Loopback66 simuliert die LAN-Seite des CE-2-Routers. Ähnlich wie CE-1 kündigt dieser Router das Präfix über eBGP dem benachbarten Router PE-2 an.

CE-2#show run | section r b

router bgp 65535

bgp router-id 10.5.5.5

bgp log-neighbor-changes

redistribute connected

redistribute eigrp 10

neighbor 172.16.50.1 remote-as 8181

CE-2#show ip bgp neighbors 172.16.50.1 advertised-routes

BGP table version is 15, local router ID is 10.5.5.5

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   10.5.5.5/32      0.0.0.0                  0         32768 ?

*>   10.22.22.22/32   192.168.4.1          10880         32768 ?

*>   10.66.66.66/32   0.0.0.0                  0         32768 ?

*>   172.16.50.0/30   0.0.0.0                  0         32768 ?

*>   192.168.4.0      0.0.0.0                  0         32768 ?

Total number of prefixes 5

PE-2

Dieser Router hat das Präfix 10.66.66.66/32 erhalten und kann nun folgende Informationen an die Service Provider Cloud weitergeben:

RP/0/RP0/CPU0:PE-2#show run vrf

Fri Jan 27 15:07:51.117 UTC

vrf Yellow

address-family ipv4 unicast

import route-target

200:200

!

export route-target

200:200

!

RP/0/RP0/CPU0:PE-2#show run router bgp

Fri Jan 27 14:59:56.957 UTC

router bgp 8181

bgp router-id 10.4.4.4

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor 10.3.3.3

remote-as 8181

update-source Loopback0

address-family vpnv4 unicast

route-policy PASS in

route-policy PASS out

!

!

vrf Yellow

rd 200:200

address-family ipv4 unicast

!

neighbor 172.16.50.2

remote-as 65535

address-family ipv4 unicast

route-policy PASS in

route-policy PASS out

as-override

!

RP/0/RP0/CPU0:PE-2#show bgp vrf Yellow ipv4 unicast neighbors 172.16.50.2 routes

Fri Jan 27 15:00:10.383 UTC

BGP VRF Yellow, state: Active

BGP Route Distinguisher: 200:200

VRF ID: 0x60000001

BGP router identifier 10.4.4.4, local AS number 8181

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000001   RD version: 64

BGP main routing table version 64

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 200:200 (default for vrf Yellow)

*> 10.5.5.5/32        172.16.50.2              0             0 65535 ?

*> 10.22.22.22/32     172.16.50.2          10880             0 65535 ?

*> 10.66.66.66/32     172.16.50.2              0             0 65535 ?

*> 172.16.50.0/30     172.16.50.2              0             0 65535 ?

*> 192.168.4.0/24     172.16.50.2              0             0 65535 ?

Processed 5 prefixes, 5 paths

RP/0/RP0/CPU0:PE-2#ping vrf Yellow 10.66.66.66

Fri Jan 27 15:00:26.020 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.66.66.66, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 3/26/120 ms

Status der Routing-Informationen von PE-1, Provider und PE-2

Für diese Demonstration wird OSPF als IGP und iBGP konfiguriert.

PE-1

Der OSPF-Nachbar ist UP und die iBGP-Sitzung mit 10.3.3.3, also dem Routen-Reflektor.

RP/0/RP0/CPU0:PE-1#show run router ospf

Fri Jan 27 15:09:23.910 UTC

router ospf 1

router-id 10.2.2.2

area 0

!

interface GigabitEthernet0/0/0/1

!

!

!

RP/0/RP0/CPU0:PE-1#show ospf neighbor

Fri Jan 27 15:09:31.435 UTC

* Indicates MADJ interface

# Indicates Neighbor awaiting BFD session up

Neighbors for OSPF 1

Neighbor ID     Pri   State           Dead Time   Address         Interface

10.3.3.3        1     FULL/BDR        00:00:37    172.16.30.2     GigabitEthernet0/0/0/1

Neighbor is up for 16:59:30

Total neighbor count: 1

RP/0/RP0/CPU0:PE-1#show bgp vpnv4 unicast summary

Fri Jan 27 15:09:37.760 UTC

BGP router identifier 10.2.2.2, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 73

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              73         73         73         73          73           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.3.3.3          0  8181    1010     997       73    0    0 16:24:45          5

Provider-Router

Auf diesem Gerät kann bestätigt werden, dass es als Routen-Reflektor fungiert und eine IBGP-Sitzung mit den Nachbarn 10.2.2.2 und 10.4.4.4 hergestellt wird.

RP/0/RP0/CPU0:Provider#show run router ospf

Fri Jan 27 15:19:33.250 UTC

router ospf 1

router-id 10.3.3.3

area 0

!

interface GigabitEthernet0/0/0/1

!

interface GigabitEthernet0/0/0/2

!

RP/0/RP0/CPU0:Provider#show run router bgp

Fri Jan 27 15:11:08.321 UTC

router bgp 8181

bgp router-id 10.3.3.3

address-family ipv4 unicast

!

address-family vpnv4 unicast

!

neighbor-group IBGP

remote-as 8181

update-source Loopback0

!

neighbor 10.2.2.2

use neighbor-group IBGP

address-family vpnv4 unicast

route-policy PASS in

route-reflector-client

route-policy PASS out

next-hop-self

!

!

neighbor 10.4.4.4

use neighbor-group IBGP

address-family vpnv4 unicast

route-policy PASS in

route-reflector-client

route-policy PASS out

next-hop-self

!

RP/0/RP0/CPU0:Provider#show bgp vpnv4 unicast summary

Fri Jan 27 15:11:19.263 UTC

BGP router identifier 10.3.3.3, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 25

BGP NSR Initial initsync version 1 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              25         25         25         25          25           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.2.2.2          0  8181     998    1011       25    0    0 16:26:27          5

10.4.4.4          0  8181     997    1009       25    0    0 16:24:25          5

PE-2

Der OSPF-Nachbar ist aktiv, und die IBGP-Sitzung mit dem Routen-Reflektor 10.3.3.3 ist aktiv.

RP/0/RP0/CPU0:PE-2#show run router ospf

Fri Jan 27 15:12:47.741 UTC

router ospf 1

router-id 10.4.4.4

area 0

!

interface GigabitEthernet0/0/0/2

!

RP/0/RP0/CPU0:PE-2#show ospf neighbor

Fri Jan 27 15:12:55.229 UTC

* Indicates MADJ interface

# Indicates Neighbor awaiting BFD session up

Neighbors for OSPF 1

Neighbor ID     Pri   State           Dead Time   Address         Interface

10.3.3.3        1     FULL/DR         00:00:35    172.16.40.1     GigabitEthernet0/0/0/2

Neighbor is up for 17:01:21

Total neighbor count: 1

RP/0/RP0/CPU0:PE-2#show bgp vpnv4 unicast summary

Fri Jan 27 15:13:01.911 UTC

BGP router identifier 10.4.4.4, local AS number 8181

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 0

BGP main routing table version 64

BGP NSR Initial initsync version 2 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

BGP is operating in STANDALONE mode.

Process       RcvTblVer   bRIB/RIB   LabelVer  ImportVer  SendTblVer  StandbyVer

Speaker              64         64         64         64          64           0

Neighbor        Spk    AS MsgRcvd MsgSent   TblVer  InQ OutQ  Up/Down  St/PfxRcd

10.3.3.3          0  8181    1011     998       64    0    0 16:26:08          5

RP/0/RP0/CPU0:PE-2#ping 10.2.2.2 source loopback0

Fri Jan 27 15:13:09.728 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.2.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 9/21/67 ms

RP/0/RP0/CPU0:PE-2#ping 10.3.3.3 source loopback0

Fri Jan 27 15:13:16.696 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.3.3.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/6/7 ms

Segment-Routing-Konfiguration

PE-1

RP/0/RP0/CPU0:PE-1#show run router ospf

Fri Jan 27 16:15:56.479 UTC

router ospf 1

router-id 10.2.2.2

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 15

!

Anbieter

RP/0/RP0/CPU0:Provider#show run router ospf

Fri Jan 27 16:17:09.471 UTC

router ospf 1

router-id 10.3.3.3

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 16

!

PE-2

RP/0/RP0/CPU0:PE-2#show run router ospf

Fri Jan 27 16:18:11.090 UTC

router ospf 1

router-id 10.4.4.4

segment-routing mpls

area 0

segment-routing mpls

interface Loopback0

prefix-sid index 17

!

Abschließende Überprüfungen

CE-1 kann den Schnittstellen-Loopback 66 auf dem CE-2-Router erreichen. Die nächste Ausgabe von Traceroute zeigt, dass das Paket den Label Switch-Pfad verwendet, wenn es an das Präfix 10.66.66.66 adressiert ist. Es ist auch zu beobachten, dass das Label die präfix-seitige 16017 verwendet, wenn es den Router PE-2 durchläuft:

CE-1#ping 10.66.66.66 source loopback0

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.66.66.66, timeout is 2 seconds:

Packet sent with a source address of 10.1.1.1

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 9/13/32 ms

CE-1#traceroute 10.66.66.66 source loopback0

Type escape sequence to abort.

Tracing the route to 10.66.66.66

VRF info: (vrf in name/id, vrf out name/id)

1 172.16.20.2 6 msec 5 msec 5 msec

2 172.16.30.2 [MPLS: Labels 16017/24003 Exp 0] 12 msec 13 msec 16 msec 3 172.16.40.2 [MPLS: Label 24003 Exp 0] 15 msec 13 msec 12 msec

4 172.16.50.2 [AS 8181] 13 msec 11 msec *

Da in der Konfiguration nicht die absolute Option verwendet wurde, begannen die Labels mit 16000 Werten und fügten die prefix-sid hinzu, die für Segment-Routing konfiguriert wurde.

RP/0/RP0/CPU0:PE-1#show cef 10.3.3.3/32

Fri Jan 27 21:32:42.813 UTC

10.3.3.3/32, version 43, labeled SR, internal 0x1000001 0x8110 (ptr 0xe3f6a00) [1], 0x600 (0xe593918), 0xa20 (0xee6e4b8)

Updated Jan 26 23:21:30.314

remote adjacency to GigabitEthernet0/0/0/1

Prefix Len 32, traffic index 0, precedence n/a, priority 1

gateway array (0xe3fbda8) reference count 3, flags 0x68, source rib (7), 0 backups

[3 type 4 flags 0x8401 (0xeeb1648) ext 0x0 (0x0)]

LW-LDI[type=1, refc=1, ptr=0xe593918, sh-ldi=0xeeb1648]

gateway array update type-time 1 Jan 26 23:21:30.314

LDI Update time Jan 26 23:21:30.315

LW-LDI-TS Jan 26 23:21:30.315

via 172.16.30.2/32, GigabitEthernet0/0/0/1, 8 dependencies, weight 0, class 0 [flags 0x0]

path-idx 0 NHID 0x0 [0xf427148 0xf4271e0]

next hop 172.16.30.2/32

remote adjacency

local label 16016      labels imposed {ImplNull}

Load distribution: 0 (refcount 3)

Hash  OK  Interface                 Address

0     Y   GigabitEthernet0/0/0/1    remote

RP/0/RP0/CPU0:PE-1#show cef 10.4.4.4/32

Fri Jan 27 21:29:36.990 UTC

10.4.4.4/32, version 45, labeled SR, internal 0x1000001 0x8110 (ptr 0xe3f65c0) [1], 0x600 (0xe593e70), 0xa28 (0xee6e508)

Updated Jan 26 23:21:47.181

remote adjacency to GigabitEthernet0/0/0/1

Prefix Len 32, traffic index 0, precedence n/a, priority 1

gateway array (0xe3fbe90) reference count 3, flags 0x68, source rib (7), 0 backups

[2 type 5 flags 0x8401 (0xeeb16a8) ext 0x0 (0x0)]

LW-LDI[type=5, refc=3, ptr=0xe593e70, sh-ldi=0xeeb16a8]

gateway array update type-time 1 Jan 26 23:21:47.182

LDI Update time Jan 26 23:21:47.182

LW-LDI-TS Jan 26 23:21:47.182

via 172.16.30.2/32, GigabitEthernet0/0/0/1, 6 dependencies, weight 0, class 0 [flags 0x0]

path-idx 0 NHID 0x0 [0xf4271e0 0x0]

next hop 172.16.30.2/32

remote adjacency

local label 16017      labels imposed {16017}

Load distribution: 0 (refcount 2)

Hash  OK  Interface                 Address

0     Y   GigabitEthernet0/0/0/1    remote

Andererseits kann CE-2 auch den Loopback 55 auf dem CE-1-Router erreichen:

CE-2#ping 10.55.55.55 source loopback66

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.55.55.55, timeout is 2 seconds:

Packet sent with a source address of 10.66.66.66

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 11/12/15 ms

CE-2#traceroute 10.55.55.55 source loopback66

Type escape sequence to abort.

Tracing the route to 10.55.55.55

VRF info: (vrf in name/id, vrf out name/id)

1 172.16.50.1 6 msec 5 msec 4 msec

2 172.16.40.1 [MPLS: Labels 16015/24003 Exp 0] 9 msec 16 msec 10 msec

3 172.16.30.1 [MPLS: Label 24003 Exp 0] 10 msec 13 msec 8 msec

4 172.16.20.1 [AS 8181] 11 msec 7 msec *

MPLS-Labels

Auf der nächsten Ausgabe können wir bestätigen, dass Segment-Routing-Labels zum End-to-End-Switching des Datenverkehrs verwendet werden.

RP/0/RP0/CPU0:PE-1#show mpls forwarding

Fri Jan 27 20:32:13.697 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16016  Pop         SR Pfx (idx 16)    Gi0/0/0/1    172.16.30.2     126880

16017  16017       SR Pfx (idx 17)    Gi0/0/0/1    172.16.30.2     17292

24000  Pop         SR Adj (idx 0)     Gi0/0/0/1    172.16.30.2     0

24001  Aggregate   172.16.20.0/30[V]  Yellow                       11384

24002  Unlabelled  192.168.1.0/24[V]  Gi0/0/0/0    172.16.20.1     0

24003  Unlabelled  10.55.55.55/32[V]  Gi0/0/0/0    172.16.20.1     0

24004  Unlabelled  10.11.11.11/32[V]  Gi0/0/0/0    172.16.20.1     0

24005  Unlabelled  10.1.1.1/32[V]     Gi0/0/0/0    172.16.20.1     0

RP/0/RP0/CPU0:Provider#show mpls forwarding

Fri Jan 27 20:33:14.878 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16015  Pop         SR Pfx (idx 15)    Gi0/0/0/1    172.16.30.1     151687

16017  Pop         SR Pfx (idx 17)    Gi0/0/0/2    172.16.40.2     147701

24000  Pop         SR Adj (idx 0)     Gi0/0/0/1    172.16.30.1     0

24001  Pop         SR Adj (idx 0)     Gi0/0/0/2    172.16.40.2     0

RP/0/RP0/CPU0:PE-2#show mpls forwarding

Fri Jan 27 20:33:49.201 UTC

Local  Outgoing    Prefix             Outgoing     Next Hop        Bytes

Label  Label       or ID              Interface                    Switched

------ ----------- ------------------ ------------ --------------- ------------

16015  16015       SR Pfx (idx 15)    Gi0/0/0/2    172.16.40.1     25304

16016  Pop         SR Pfx (idx 16)    Gi0/0/0/2    172.16.40.1     128619

24000  Pop         SR Adj (idx 0)     Gi0/0/0/2    172.16.40.1     0

24001  Aggregate   172.16.50.0/30[V]  Yellow                       1200

24002  Unlabelled  192.168.4.0/24[V]  Gi0/0/0/3    172.16.50.2     0

24003  Unlabelled  10.66.66.66/32[V]  Gi0/0/0/3    172.16.50.2     0

24004  Unlabelled  10.5.5.5/32[V]     Gi0/0/0/3    172.16.50.2     0

24005  Unlabelled  10.22.22.22/32[V]  Gi0/0/0/3    172.16.50.2     0

CE-2#show ip bgp neighbors 172.16.50.1 advertised-routes

BGP table version is 5, local router ID is 5.5.5.5

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   5.5.5.5/32       0.0.0.0                  0         32768 ?

*>   22.22.22.22/32   192.168.4.1          10880         32768 ?

*>   172.16.50.0/30   0.0.0.0                  0         32768 ?

*>   192.168.4.0      0.0.0.0                  0         32768 ?

Total number of prefixes 4