Inhalt

Einführung

Bevor Sie beginnen

Konventionen

Voraussetzungen

Verwendete Komponenten

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Zugehörige Informationen

Einführung

Diese Beispielkonfiguration zeigt einen Cisco 6400 Universal Access Concentrator (UAC) mit einem Knoten Route Processor (NRP)-Adapter. Es sind Beispiele für Point-to-Point- und Multipoint-NRP-Konfigurationen aufgeführt. Zwei Cisco 827 Digital Subscriber Line Router (DSL), die mit Point-to-Point Protocol over Asynchronous Transfer Mode (PPPoA) (aal5mux ppp) konfiguriert sind, enden am Cisco 6400.

Konfigurationen für einen Cisco 6130 Digital Subscriber Line Access Multiplexer (DSLAM) NI2 und einen Cisco 6400 Node Switch Processor (NSP) werden ebenfalls bereitgestellt.

Bevor Sie beginnen

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Voraussetzungen

Für dieses Dokument bestehen keine besonderen Voraussetzungen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den unten stehenden Software- und Hardwareversionen.

- Cisco 827-4V Customer Premises Equipment (CPE) IOS® Softwareversion 12.1(1)XB

- Cisco 6400 UAC-NRP IOS Software, Version 12.0(7)DC

- Cisco 6400 UAC-NSP IOS Software, Version 12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS Software, Version 12.1(1)DA

Die in diesem Dokument enthaltenen Informationen wurden aus Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Sie in einem Live-Netzwerk arbeiten, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen, bevor Sie es verwenden.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Netzwerkdiagramm

In diesem Dokument wird die im Diagramm unten dargestellte Netzwerkeinrichtung verwendet.

Konfigurationen

In diesem Dokument werden die unten angegebenen Konfigurationen verwendet.

- Cisco Router 827 (R1)

- Cisco Router 827 (R2)

- Cisco 6130-NI2 DSLAM

- Cisco 6400 NSP

- Cisco 6400-NRP über eine Point-to-Point-Schnittstelle

- Cisco 6400 NRP mit einer Multipoint-Schnittstelle

Cisco Router 827 (R1)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 3/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.1 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname1>

ppp chap password <password1>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

no ip http server

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco Router 827 (R2)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R2

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

PVC 4/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.2 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname2>

ppp chap password <password2>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6130-NI2 DSLAM

ni2#

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname ni2

!

slot 1 ATUC-1-4DMT

slot 2 ATUC-4FLEXIDMT

slot 13 ATUC-4FLEXIDMT

!

dsl-profile default

dmt training-mode quick

ip subnet-zero

!

ATM address 47.0091.8100.0000.0075.2b3f.4d01.0075.2b3f.4d01.00

ATM router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute ATM-static

!

interface ATM0/0

no ip address

ATM cac service-category abr deny

ATM maxvp-number 0

ATM maxvc-number 4096

ATM maxvci-bits 12

!

interface Ethernet0/0

no ip route-cache

!

interface ATM0/1

no ip address

ATM ilmi-keepalive

!

interface ATM0/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/1

no ip address

no ATM ilmi-keepalive

!

interface ATM1/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/3

no ip address

no ATM ilmi-keepalive

ATM PVC 3 100  interface  ATM0/1 3 100

!

interface ATM1/4

no ip address

no ATM ilmi-keepalive

ATM PVC 4 100  interface  ATM0/1 4 100

!

ip classless

!

end

Cisco 6400 NSP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NSP

!

ip subnet-zero

!

atm address 47.0091.8100.0000.0030.8027.7501.0030.8027.7501.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface ATM1/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM2/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvc 3 100  interface  ATM1/0/0 3 100

atm pvc 4 100  interface  ATM1/0/0 4 100

!

ip classless

!

end

Cisco 6400-NRP über eine Point-to-Point-Schnittstelle

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.3 point-to-point

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM0/0/0.4 point-to-point

no ip directed-broadcast

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

end

Cisco 6400 NRP mit einer Multipoint-Schnittstelle

NRP#

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.9 multipoint

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

!

end

Überprüfen

Für diese Konfiguration ist derzeit kein Überprüfungsverfahren verfügbar.

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- Konfigurieren eines Cisco 827 Routers

- Cisco 6400 Software Setup Guide

- Support-Informationen zur Cisco DSL-Technologie

- Produktsupport - Cisco Systems

- Technischer Support - Cisco Systems