Inhalt

Einführung

Remote Node-Anmeldung vom lokalen Knoten über TL1-Befehle

Einführung

In diesem Dokument wird die Methode beschrieben, mit der über TL1 erreichbare Remote-Knoten vom lokalen Knoten aus angemeldet werden können.

Remote Node-Anmeldung vom lokalen Knoten über TL1-Befehle

Bei der Suche nach der Anmeldung bei einem Remotecnoten von einem benachbarten erreichbaren Knoten bleibt die TL1-Methode erhalten, wenn der Cisco Transport Controller (CTC) nicht funktioniert.

Diese Methode beschreibt, wie Sie den Remote-Knoten vom lokalen angemeldeten Knoten aus anmelden und wie folgt vorgehen:

Schritt 1: Melden Sie sich beim Knoten an, und prüfen Sie, ob der Remote-Knoten über einen beliebigen Kanal erreichbar ist, z. B. (DCC/GCC/OSI) oder direkt über Ping erreichbar sind.

-> acNodes

========================== AlrmC Nodes =================================

ind Val NodeName          IP Addr      Cri Maj Min N-A N-R Vwire ProdField VirtWrProdNm VirtWireProdEnum MsgVer

--- --- -------------------- ----------------  --- --- --- --- --- -----

0 Yes 206                  10.105.142.206      3   0   2   8   1  xxxx ONS15454  1 400

1 Yes WXC-207              10.105.142.207      0   1   5   6   0  xxxx ONS15454  1 400

2 Yes 197                  10.105.142.197      3   2  11  11   5  xxxx ONS15454  1 400

Schritt 2: Melden Sie sich mithilfe dieser Syntax über TL1 im lokalen Knoten an.

Syntax:

ACT-USER:[<TID>]:<uid>:<CTAG>::<pid>;

ACT-USER::CISCO15:123::******;

206 2000-12-15 23:43:21

M  123 COMPLD

"CISCO15:2000-12-15 23-42-43,2000-12-15 23-15-04,0"

;

206 2000-12-15 23:43:21

A  0 REPT EVT SESSION

"206:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 64.103.228.115 */

;

User CISCO15 logged in from 10.105.142.206 */

;RTRV-ALM-ALL:::123;

206 2000-12-15 23:47:04

M  123 COMPLD

"SLOT-11,EQPT:MN,EQPT,NSA,12-04,03-26-24,NEND,NA:\"Equipment Failure\",TCC"

"LINEWL-17-4-RX-1530.33,OCH:CR,LOS-P,SA,12-09,02-55-16,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINEWL-17-4-RX-1531.90,OCH:CR,LOS-P,SA,12-09,02-57-20,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINE-17-5-TX,OTS:CR,OPWR-LFAIL,SA,12-09,02-55-19,NEND,NA:\"Optical Power Failure Low\",40-SMR1-C"

"LINE-17-1-TX,OTS:MN,APC-OUT-OF-RANGE,NSA,12-15,22-55-33,NEND,NA:\"APC Cannot Set Value Due To Range Limits\",40-SMR1-C"

Schritt 3: Ändern Sie von der Syntax aus die TID und die ACT-USER-Anmeldung für den Remote-Knoten, bei dem Sie sich anmelden möchten. Auch für andere Befehle müssen Sie den TID-Wert verwenden, d. h. den Namen des Remotecnoten.

> ACT-USER:WXC-207:CISCO15:123::******;

WXC-207 2004-06-03 18:50:20

M  123 COMPLD

"CISCO15:2004-06-03 18-23-24,2004-06-03 16-35-48,0"

;

>

WXC-207 2004-06-03 18:50:20

A  0 REPT EVT SESSION

"WXC-207:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 10.105.142.206 */

Für andere Befehle, wie im Beispiel gezeigt, müssen Sie die entsprechenden TID-Werte eingeben, d. h. den Knotennamen als WXC-207:

> RTRV-ALM-ALL:WXC-207::123;

WXC-207 2004-06-03 18:50:54

M  123 COMPLD

"SLOT-11,EQPT:MN,PROTNA,NSA,05-21,21-55-10,NEND,NA:\"Protection Unit Not Available\",TCC"

"BITS-1,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"BITS-2,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"SYNC-NE,SYNCN:MJ,SYNCPRI,SA,05-21,21-55-25,NEND,NA:\"Primary Synchronization Reference Failure\","

"SYNC-NE,SYNCN:MN,SYNCSEC,NSA,05-21,21-55-25,NEND,NA:\"Secondary Synchronization Reference Failure\","

"PWR-A,EQPT:MN,BAT-FAIL,NSA,05-21,21-55-18,NEND,NA:\"Battery Failure\","

;

Selbst wenn Sie am Remote-Knoten angemeldet sind, können Sie in einem anderen verbundenen Knoten navigieren und die TID für Remote-Knoten ändern. Diese Einstellung bleibt für lokale Knoten leer wie die TID.