Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Befehle zur Fehlerbehebung

Zugehörige Informationen

Einführung

In diesem Dokument wird erläutert, wie ein Point-to-Point Protocol over Ethernet (PPPoE)-Client auf Cisco IOS®-Routern unterstützt wird, die über eine Ethernet-Schnittstelle mit einem DSL-Modem oder den DSL-Geräten eines anderen Anbieters (Customer Premises Equipment, CPE) verbunden sind.

ISPs stellen ihren Kunden häufig ein DSL-Modem zur Verfügung, das über eine Ethernet-Schnittstelle für die Verbindung mit dem Ethernet-Segment des Kunden und über eine weitere Schnittstelle für die DSL-Leitungsverbindung verfügt. In diesem Fall fungiert das DSL-Modem nur dann als Bridge, wenn das CPE nicht für eine IP-Verbindung oder erweiterte Funktionen über DSL konfiguriert werden kann. Dadurch wird die Verbindung auf nur einen PPPoE-Client-PC beschränkt. Wenn ein Cisco IOS-Router an das Ethernet des DSL-Modems angeschlossen wird, können Sie die PPPoE Client IOS-Funktion auf dem Cisco Router ausführen. Dadurch können mehrere PCs im Ethernet-Segment verbunden werden, die mit dem Cisco IOS-Router verbunden sind. Mit dem Cisco IOS-Router können Sie Ihre DSL-Verbindungen und alle IOS-Funktionen, wie Sicherheit, Network Address Translation (NAT) und Dynamic Host Configuration Protocol (DHCP), auf interne Hosts erweitern.

Mit der PPPoE-Funktion können Sie eine PPP-Sitzung auf einem einfachen Bridging-Ethernet-verbundenen Client starten. Die Sitzung wird über die ATM-Verbindung über gekapselte Ethernet-Bridge-Frames übertragen. Sie können die Sitzung entweder in der Zentrale eines lokalen Exchange Carriers oder an einem ISP-Point beenden.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco 827-4V CPE IOS Software, Version 12.1(1)XB

- Cisco 2611-Router, auf dem ein Image der Cisco IOS-Software, Version 12.2(2)T1, ausgeführt wird

- Cisco 6400 Universal Access Concentrator (UAC) mit Cisco IOS Software Release 12.1(5)DC1-Image

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions .

Konfigurieren

In diesem Abschnitt werden die Informationen angezeigt, die Sie zum Konfigurieren der in diesem Dokument beschriebenen Funktionen verwenden können.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Netzwerkdiagramm

In diesem Dokument wird die in diesem Diagramm dargestellte Netzwerkeinrichtung verwendet.

Hinweis: In diesem Dokument wird die PPPoE-Client-Verbindung vom Cisco Router initiiert. Dies ist der Cisco 2611-Router in dieser Konfiguration. Der Cisco 827 Router im Diagramm stellt die nicht von Cisco stammende DSL CPE dar.

Konfigurationen

In diesem Dokument werden diese Konfigurationen verwendet.

- Router 2611

- Cisco DSL-Router 827

- Cisco Router der Serie 6400

Router 2611

!

hostname pooh

ip host rund 172.17.247.195

!

ip subnet-zero

no ip domain-lookup

!

vpdn enable

no vpdn logging

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

interface Ethernet0/0

ip address 10.200.56.22 255.255.255.0

ip nat inside

no ip mroute-cache

!

!

!

!

interface Ethernet0/1

no ip address

pppoe enable

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

ip nat outside

ip mtu 1492

encapsulation ppp

no ip mroute-cache

dialer pool 1

dialer-group 1

ppp authentication pap

ppp pap sent-username cisco password cisco1

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

ip nat inside source list 1 interface Dialer1 overload

ip route 0.0.0.0 0.0.0.0 dialer1

access-list 1 permit 10.200.56.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

login

password ww

!

end

Cisco DSL-Router 827

Building configuration...

Current configuration : 821 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Chansey

!

!

ip subnet-zero

no ip domain-lookup

!

!

!

interface Ethernet0

no ip address

bridge-group 1

!

interface ATM0

no ip address

no atm ilmi-keepalive

bundle-enable

bridge-group 1

dsl operating-mode auto

!

interface ATM0.1 point-to-point

pvc 53/53

!--- vpi/vci given by the ISP

!

!

ip classless

ip http server

!

bridge 1 protocol ieee

!

line con 0

exec-timeout 0 0

stopbits 1

line vty 0 4

exec-timeout 0 0

password ww

login local

!

scheduler max-task-time 5000

end

Cisco Router der Serie 6400

Current configuration : 3231 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname alyssa_nrp1

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication ppp default local

enable password ww

!

username cisco password  cisco1

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

vpdn enable

no vpdn logging

!

vpdn-group cisco

accept-dialin

protocol pppoe

virtual-template 2

!

!

!

!

!

!

!

interface Loopback5

ip address 212.93.195.100 255.255.255.0

!

!

interface ATM0/0/0

no ip address

no ip mroute-cache

load-interval 30

atm pvc 16 0 16 ilmi

no atm ilmi-keepalive

pvc 10/100

!

hold-queue 1000 in

!

interface ATM0/0/0.60 multipoint

pvc 6/60

encapsulation aal5snap

protocol pppoe

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 10.200.56.8 255.255.255.0

!

interface FastEthernet0/0/0

no ip address

full-duplex

!

!

interface Virtual-Template2

ip unnumbered Loopback5

ip mtu 1492

no ip route-cache cef

peer default ip address pool nrp1

ppp authentication pap

!

ip local pool nrp1 212.93.198.1

ip classless

!

!

line con 0

exec-timeout 0 0

password ww

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

!

!

end

Überprüfen

Dieser Abschnitt enthält Informationen, die Sie verwenden können, um zu überprüfen, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

- show vpdn session all: Zeigt VPDN-Sitzungsinformationen an. Diese Informationen umfassen Statistiken zu Schnittstelle, Tunnel, Benutzernamen, Paketen, Status und Fenstern.

- show interface ethernet 0/1: Zeigt Informationen über die Ethernet-Schnittstelle des Routers an.

- show interfaces dialer 1: Zeigt Informationen über den Dialer auf dem Router an.

- show ip local pool nrp1: Zeigt Informationen über den lokalen IP-Pool an.

- show ip route: Zeigt Informationen über die IP-Route auf dem Router an.

Dies ist die Befehlsausgabe show vpdn session all auf dem Cisco 2611.

pooh#show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

!--- Local MAC address.

local MAC address: 0030.9424.af21,

remote MAC address: 0050.736f.4c37

virtual access interface: Vi1, outgoing interface: Et0/1

599 packets sent, 599 received

9202 bytes sent, 8154 received

!--- Verify that the outgoing interface for the PPPoE session !--- is Ethernet0/1 and the local MAC address that displays is the !--- MAC address of Ethernet0/1. The remote MAC address that displays !--- is the MAC address of the Aggregator device (6400). !--- You can see it on the 6400 as the local MAC address in the !--- show vpdn session on the 6400.

Dies ist die Ausgabe des Befehls show interface ethernet 0/1 auf dem Cisco 2611.

pooh#show interface ethernet 0/1

Ethernet0/1 is up, line protocol is up

Hardware is AmdP2, address is 0030.9424.af21 (bia 0030.9424.af21

MTU 1500 bytes, BW 10000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:40, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

739 packets input, 64127 bytes, 0 no buffer

Received 57 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1153 packets output, 89766 bytes, 0 underruns(1/0/0)

0 output errors, 1 collisions, 1 interface resets

0 babbles, 0 late collision, 2 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Dies ist die Ausgabe des Befehls show interfaces dialer 1 auf dem Cisco 2611.

pooh#show interfaces dialer 1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 212.93.198.1/32

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to Vi1

Last input never, output never, output hang never

Last clearing of "show interface" counters 01:38:43

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/0/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

403 packets input, 6082 bytes

403 packets output, 6978 bytes

Bound to:

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Listen: CDPCP

Open: IPCP

Last input 00:00:09, output never, output hang never

Last clearing of "show interface" counters 00:35:16

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

430 packets input, 6453 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

430 packets output, 7400 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Dies ist die Befehlsausgabe show vpdn session all auf dem Cisco 6400.

alyssa_nrp1#show vpdn session  all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0050.736f.4c37, remote MAC address: 0030.9424.af21

virtual access interface: Vi3, outgoing interface: AT0/0/0, vc: 6/60

495 packets sent, 494 received

7369 bytes sent, 7346 received

Dies ist die Ausgabe des Befehls show ip local pool nrp1 auf dem Cisco 6400.

alyssa_nrp1#show ip local pool nrp1

Pool                     Begin           End             Free  In use

nrp1                    212.93.198.1    212.93.198.1       0       1

Available addresses:

None

Inuse addresses:

212.93.198.1       Vi3                         nrp1

Dies ist die Ausgabe des Befehls show ip route auf dem Cisco 6400.

alyssa_nrp1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

212.93.198.0/32 is subnetted, 1 subnets

C       212.93.198.1 is directly connected, Virtual-Access3

!--- You have to see the installed route for the remote PPPoE session.

C    212.93.195.0/24 is directly connected, Loopback5

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

C       10.200.56.0/24 is directly connected, Ethernet0/0/0

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Befehle zur Fehlerbehebung

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

Hinweis: Bevor Sie Debugbefehle ausgeben, lesen Sie die Informationen Wichtige Informationen über Debug-Befehle.

- show debugging: Zeigt Debuginformationen auf dem Router an.

Dies ist die Ausgabe des Befehls show debugging auf dem Cisco 2611.

pooh#show debugging

PPP:

PPP protocol negotiation debugging is on

VPN:

PPPoE protocol events debugging is on

PPPoE control packets debugging is on

01:54:21:  Sending PADI: Interface = Ethernet0/1

01:54:21: pppoe_send_padi:

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

01:54:21: PPPoE 0: I PADO L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23:  PPPOE: we've got our pado and the pado timer went off

01:54:23: OUT PADR from PPPoE tunnel

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: PPPoE 1: I PADS L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65

00 01 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: IN PADS from PPPoE tunnel

01:54:23: Vi1 Debug: Condition 1, interface Di1 triggered, count 1

01:54:23: %DIALER-6-BIND: Interface Vi1 bound to profile Di1

01:54:23: PPPoE: Virtual Access interface obtained.

01:54:23: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:54:23: Vi1 PPP: Treating connection as a callout

01:54:23: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:54:23: Vi1 PPP: No remote authentication for call-out

01:54:23: Vi1 LCP: O CONFREQ [Closed] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:23: Vi1 LCP: I CONFACK [REQsent] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [ACKrcvd] id 2 len 18

01:54:25: Vi1 LCP:    MRU 1492 (0x010405D4)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFNAK [ACKrcvd] id 2 len 8

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP: TIMEout: State ACKrcvd

01:54:25: Vi1 LCP: O CONFREQ [ACKrcvd] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFACK [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: State is Open

01:54:25: Vi1 PPP: Phase is AUTHENTICATING, by the peer [0 sess, 0 load]

01:54:25: Vi1 PAP: O AUTH-REQ id 4 len 18 from "cisco"

01:54:25: Vi1 PAP: I AUTH-ACK id 4 len 5

01:54:25: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:54:25: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:54:25: Vi1 IPCP:    Address 0.0.0.0 (0x030600000000)

01:54:25: Vi1 CDPCP: O CONFREQ [Closed] id 1 len 4

01:54:25: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: I CONFNAK [ACKsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: O CONFREQ [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 LCP: I PROTREJ [Open] id 4 len 10 protocol CDPCP

(0x820701010004)

01:54:25: Vi1 CDPCP: State is Closed

01:54:25: Vi1 IPCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: State is Open

01:54:25: Di1 IPCP: Install negotiated IP interface address 212.93.198.1

01:54:25: Di1 IPCP: Install route to 212.93.195.100

01:54:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

Dies ist die Ausgabe des Befehls show debugging auf dem Cisco 6400.

*Aug 16 15:58:51.346: PPPoE: IN PADI discovery packet

*Aug 16 15:58:51.346:   PPPoE: LMAC:ffff.ffff.ffff RMAC:0030.9424.af21 6/60

AT0/0/0.60

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

*Aug 16 15:58:51.346: PPPoE: PADO OUT from PPPoE tunnel

*Aug 16 15:58:51.346:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07 00 00

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

*Aug 16 15:58:53.390: PPPoE: IN PADR discovery packet

*Aug 16 15:58:53.390:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

*Aug 16 15:58:53.394: Vi3 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Aug 16 15:58:53.418: PPPoE: Create session: 1

*Aug 16 15:58:53.418: PPPoE:  1: Created

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

*Aug 16 15:58:53.418: PPPoE: PADS OUT from PPPoE tunnel

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65 00 01

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

2d08h: %LINK-3-UPDOWN: Interface Virtual-Access3, changed state to up

*Aug 16 15:58:53.426: Vi3 PPP: Treating connection as a dedicated line

*Aug 16 15:58:53.426: Vi3 PPP: Phase is ESTABLISHING, Active Open [0 sess,

0 load]

*Aug 16 15:58:53.426: Vi3 LCP: O CONFREQ [Closed] id 1 len 18

*Aug 16 15:58:53.426: Vi3 LCP:    MRU 1492 (0x010405D4)

*Aug 16 15:58:53.426: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.426: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.466: Vi3 LCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.466: Vi3 LCP: O CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.470: Vi3 LCP: I CONFNAK [ACKsent] id 1 len 8

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP: O CONFREQ [ACKsent] id 2 len 18

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.470: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: I CONFACK [ACKsent] id 2 len 18

*Aug 16 15:58:53.510: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.510: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.510: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: State is Open

*Aug 16 15:58:53.510: Vi3 PPP: Phase is AUTHENTICATING, by this end [0

sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: I AUTH-REQ id 5 len 18 from "cisco"

*Aug 16 15:58:53.514: Vi3 PPP: Phase is FORWARDING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PPP: Phase is AUTHENTICATING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: Authenticating peer cisco

*Aug 16 15:58:53.514: Vi3 PAP: O AUTH-ACK id 5 len 5

*Aug 16 15:58:53.514: Vi3 PPP: Phase is UP [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 IPCP: O CONFREQ [Closed] id 1 len 10

*Aug 16 15:58:53.514: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 0.0.0.0 (0x030600000000)

*Aug 16 15:58:53.574: Vi3 IPCP: Pool returned 212.93.198.1

*Aug 16 15:58:53.574: Vi3 IPCP: O CONFNAK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.574: Vi3 CDPCP: I CONFREQ [Not negotiated] id 1 len 4

*Aug 16 15:58:53.574: Vi3 LCP: O PROTREJ [Open] id 3 len 10 protocol CDPCP

(0x820701010004)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.618: Vi3 IPCP: I CONFREQ [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: O CONFACK [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: State is Open

*Aug 16 15:58:53.622: Vi3 IPCP: Install route to 212.93.198.1

2d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Zugehörige Informationen

- Konfigurieren des Cisco 827 Routers

- Support-Informationen zur Cisco DSL-Technologie

- Technischer Support - Cisco Systems