Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Hinzufügen eines Switches zur VTP-Domäne

Überprüfung

Fehlerbehebung

Zugehörige Informationen

Einleitung

Dieses Dokument enthält eine Beispielkonfiguration zur Migration eines Campus-Netzwerks aller VTP-Switches (VLAN Trunking Protocol) in ein Netzwerk mit VTP-Servern und -Clients. Dieses Dokument kann auch verwendet werden, um die vorhandenen VTP-Domänen neu zu strukturieren.

Voraussetzungen

Anforderungen

Stellen Sie sicher, dass Sie diese Anforderungen erfüllen, bevor Sie versuchen, diese Konfiguration durchzuführen:

- Grundkenntnisse der Catalyst Switch Administration

- VTP-Kenntnisse

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf der Cisco IOS® Software-Version 12.2(25)SEC2 und Catalyst OS (CatOS) Version 8.1(2).

Die Informationen in diesem Dokument gelten für alle Cisco Geräte, die VLAN Trunk Protocol Version 2 unterstützen.

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Wenn Ihr Netz Live ist, überprüfen Sie, ob Sie die mögliche Auswirkung jedes möglichen Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps von Cisco zu Konventionen).

Hintergrundinformationen

VTP reduziert die Administration in einem Switch-Netzwerk. Wenn Sie ein neues VLAN auf einem VTP-Server konfigurieren, wird das VLAN über alle Switches in der Domäne verteilt. Auf diese Weise muss nicht überall dasselbe VLAN konfiguriert werden. VTP ist ein proprietäres Protokoll von Cisco, das für die meisten Produkte der Cisco Catalyst-Serie verfügbar ist.

Hinweis: VTP-Version 3 wird in diesem Dokument nicht behandelt. VTP Version 3 unterscheidet sich von VTP Version 1 (v1) und Version 2 (v2). Sie ist nur auf CatOS 8.1(1) oder höher verfügbar. VTP-Version 3 enthält viele Änderungen von VTP v1 und v2. Vergewissern Sie sich, dass Sie die Unterschiede zwischen VTP-Version 3 und früheren Versionen verstehen, bevor Sie die Netzwerkkonfiguration ändern. Weitere Informationen zur VTP-Konfiguration finden Sie in einem der folgenden Abschnitte:

- Funktionsweise von VTP Version 3

- Interaktion mit VTP Version 1 und VTP Version 2

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zur Migration Ihres Campus-Netzwerks von der gesamten VTP-transparenten Konfiguration zur VTP-Server-Client-Konfiguration. In diesem Abschnitt werden auch die schnellen Schritte beschrieben, mit denen ein neuer Switch in die vorhandene VTP-Domäne eingeführt wird.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Das Netzwerk umfasst:

- Zwei Distribution-Layer-Switches - DistributionA und DistributionB, auf denen Cisco IOS Software ausgeführt wird.

- Zwei Access-Layer-Switches - AccessA führt die Cisco IOS-Software aus und AccessB führt CatOS-Software aus.

Die erste VLAN-Datenbank verfügt über folgende Ethernet-VLANs:

- DistributionA - VLANs 1, 10 und 11

- DistributionB - VLANs 1, 20 und 21

- AccessA - VLANs 1, 30 und 31

- AccessB - VLANs 1, 40 und 41

Konfigurationen

Dieser Abschnitt besteht aus drei Unterabschnitten:

- Prüfungen vor der Migration

- Migrationsplanung

- Migrationsverfahren

Prüfungen vor der Migration

In diesem Abschnitt finden Sie eine Checkliste, mit der Sie sicherstellen können, dass das Netzwerk für den Migrationsprozess bereit ist. Um den aktuellen Status der VTP-Konfiguration im Switch zu erhalten, geben Sie den Befehl show vtp status für Cisco IOS und den Befehl show vtp domain for CatOS ein.

Cisco IOS

DistributionA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xE5 0x9F 0x80 0x70 0x73 0x62 0xC0 0x54

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

DistributionA#

Catalyst-Betriebssystem

AccessB> (enable) show vtp domain

Version      : running VTP1 (VTP3 capable)

Domain Name  : migration                        Password  : not configured

Notifications: disabled                         Updater ID: 0.0.0.0

Feature        Mode           Revision

-------------- -------------- -----------

VLAN           Client         0

Pruning             : disabled

VLANs prune eligible: 2-1000

AccessB> (enable)

1. Überprüfen Sie, ob sich alle Switches im VTP-Modus "Transparent" befinden. Führen Sie die folgenden Befehle aus, um den VTP-Modus zu ändern:

Cisco IOS

AccessA#conf t

AccessA(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode

AccessA(config)#exit

AccessA#

Catalyst-Betriebssystem

AccessB> (enable) set vtp mode transparent

Changing VTP mode for all features

VTP domain migration modified

AccessB> (enable)

2. Überprüfen Sie, ob alle Switches den gleichen VTP-Domänennamen haben. Führen Sie die folgenden Befehle aus, um den VTP-Domänennamen zu ändern:

Cisco IOS

DistributionB(config)#vtp domain migration

Changing VTP domain name from aaaa to migration

DistributionB(config)#

Catalyst-Betriebssystem

AccessB> (enable) set vtp domain migration

VTP domain migration modified

AccessB> (enable)

3. Überprüfen Sie, ob alle Switches dieselbe VTP-Version ausführen. Führen Sie die folgenden Befehle aus, um die VTP-Version zu ändern:

Cisco IOS

vtp version 2

Catalyst-Betriebssystem

set vtp v2 enable

Oder

set vtp version 2

4. Überprüfen Sie, ob alle Switches dasselbe VTP-Kennwort verwenden (falls konfiguriert). Führen Sie die folgenden Befehle aus, um das VTP-Kennwort zu ändern:

Cisco IOS

vtp password vtp_password

Catalyst-Betriebssystem

AccessB> (enable) set vtp passwd ?

<passwd>                   Password (0 to clear)

AccessB> (enable) set vtp passwd vtp_password

Generating the secret associated to the password.

VTP domain migration modified

5. Überprüfen Sie, ob alle Switches über Trunk-Links verbunden sind.

Cisco IOS

DistributionA#show interfaces trunk

Port        Mode         Encapsulation  Status        Native vlan

Gi2/0/1     auto         n-isl          trunking      1

Gi2/0/5     auto         n-802.1q       trunking      1

Gi2/0/9     desirable    n-isl          trunking      1

Gi2/0/10    desirable    n-isl          trunking      1

Port      Vlans allowed on trunk

Gi2/0/1     1-4094

Gi2/0/5     1-4094

Gi2/0/9     1-4094

Gi2/0/10    1-4094

Port        Vlans allowed and active in management domain

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

Gi2/0/10    1,10-11

Port        Vlans in spanning tree forwarding state and not pruned

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

!--- Rest of output elided.

Catalyst-Betriebssystem

AccessB> (enable) show trunk

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/25     desirable    n-isl          trunking      1

3/26     desirable    n-isl          trunking      1

6/1      nonegotiate  dot1q          trunking      1

6/2      nonegotiate  dot1q          trunking      1

6/3      nonegotiate  dot1q          trunking      1

6/4      nonegotiate  dot1q          trunking      1

16/1      nonegotiate  isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/25     1-1005,1025-4094

3/26     1-1005,1025-4094

6/1

6/2

6/3

6/4

16/1      1-1005,1025-4094

Port      Vlans allowed and active in management domain

!--- Rest of output elided.

Migrationsplanung

- Bestimmen Sie die Anzahl der für das Netzwerk erforderlichen VLANs. Die maximale Anzahl von aktiven VLANs, die von Catalyst Switches unterstützt werden, variiert je nach Modell.

AccessA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 250

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xC8 0xB7 0x36 0xC3 0xBD 0xC6 0x56 0xB2

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

AccessA#

- Bestimmen Sie die Switches, z. B. DistributionA und DistributionB, die VTP-Server sind. Ein oder mehrere Switches können VTP-Server in einer Domäne sein. Wählen Sie einen Switch, z. B. DistributionA, um die Migration zu starten.

Migrationsverfahren

Gehen Sie wie folgt vor, um das Campus-Netzwerk mit einem VTP-Modusserver und -Client zu konfigurieren:

1. Ändern Sie den VTP-Modus der DistributionA to Server.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vtp mode server

Setting device to VTP SERVER mode

DistributionA(config)#exit

DistributionA#

2. Erstellen Sie die VLANs, die in der Domäne erforderlich sind.

!--- Before creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

11   enet  100011     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    srb      0      0

!--- Rest of output elided.

!--- Creating required VLANs

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 20-21,30-31,40-41

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

!--- After creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

20   VLAN0020                         active

21   VLAN0021                         active

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

!--- Rest of output elided.

Wenn keine neuen VLANs konfiguriert werden sollen, erstellen Sie ein Dummy-VLAN.

Dadurch wird die Konfigurationsübersicht auf '1' erhöht, wodurch die VLAN-Datenbank im gesamten Netzwerk verbreitet werden kann.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 100

DistributionA(config-vlan)#name dummy

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

3. Ändern Sie den VTP-Modus für DistributionB auf Client, gefolgt von AccessA und AccessB.

Cisco IOS

DistributionB#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionB(config)#vtp mode client

Setting device to VTP CLIENT mode.

DistributionB(config)#exit

DistributionB#

DistributionB#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 13

VTP Operating Mode              : Client

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xBD 0xA4 0x94 0xE6 0xE3 0xC7 0xA7 0x86

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

Catalyst-Betriebssystem

AccessB> (enable) set vtp mode client

Changing VTP mode for all features

VTP domain migration modified

4. Überprüfen Sie, ob alle VLANs über die Domäne verteilt werden.

Cisco IOS

DistributionB#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa1/0/1, Fa1/0/3, Fa1/0/4

Fa1/0/5, Fa1/0/7, Fa1/0/8

Fa1/0/11, Fa1/0/12, Fa1/0/13

Fa1/0/14, Fa1/0/15, Fa1/0/16

Fa1/0/17, Fa1/0/18, Fa1/0/19

Fa1/0/20, Fa1/0/21, Fa1/0/22

Fa1/0/23, Fa1/0/24

10   VLAN0010                         active

11   VLAN0011                         active

20   VLAN0020                         active    Gi1/0/1

21   VLAN0021                         active    Gi1/0/2

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

!--- Rest of output elided.

Catalyst-Betriebssystem

AccessB> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    64      2/1-2

3/1-24,3/27-46

4/1-8

10   VLAN0010                         active    107

11   VLAN0011                         active    108

20   VLAN0020                         active    105

21   VLAN0021                         active    106

30   VLAN0030                         active    109

31   VLAN0031                         active    110

40   VLAN0040                         active    111     3/47

41   VLAN0041                         active    112     3/48

1002 fddi-default                     active    65

1003 token-ring-default               active    68

1004 fddinet-default                  active    66

1005 trnet-default                    active    67

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

!--- Rest of output elided.

5. Überprüfen Sie, ob sich ein Switch-Port im inaktiven Zustand befindet.

Ein Switch-Port kann in den Status Inaktiv wechseln, wenn das für diesen Switch-Port konfigurierte VLAN im Switch nicht vorhanden ist. Erstellen Sie ggf. die entsprechenden VLAN(s) im VTP-Server-Switch.

Cisco IOS

In der Ausgabe des Befehls show interfaces switchport können Sie bestimmen, ob sich ein Switch-Port im Inaktiven Modus befindet, wenn er das Inaktive Schlüsselwort für das Zugriffsmodus-VLAN-Attribut besitzt.

DistributionB#show interfaces switchport

Name: Fa1/0/1

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Part of output elided.

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Inactive)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Unknown unicast blocked: disabled

!--- Rest of output elided.

Erstellen Sie das VLAN 50 im VTP-Server-Switch (DistributionA).

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 50

DistributionA(config-vlan)#name Vlan50

DistributionA(config-vlan)#end

DistributionA#

!--- Verify the switchport status in the DistributionB switch.

DistributionB#show interfaces fa1/0/24 switchport

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Vlan50)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Rest of output elided.

6. Ändern Sie den VTP-Modus des DistributionB-Switches auf Server.

Der/die VTP-Server-Switch(e) muss/müssen die gleiche Konfigurationsrevisionsnummer aufweisen und der höchste Wert in der VTP-Domäne sein.

Hinzufügen eines Switches zur VTP-Domäne

Ein kürzlich hinzugefügter Switch kann Probleme im Netzwerk verursachen. Dabei kann es sich um einen Switch handeln, der zuvor im Labor verwendet wurde, und es wurde ein guter VTP-Domänenname eingegeben. Der Switch wurde als VTP-Client konfiguriert und mit dem übrigen Netzwerk verbunden. Dann haben Sie den Trunk-Link in den Rest des Netzwerks gebracht. In wenigen Sekunden kann das gesamte Netzwerk ausfallen.

Wenn die Konfigurationsrevisionsnummer des eingelegten Switches höher ist als die Konfigurationsrevisionsnummer der VTP-Domäne, wird die VLAN-Datenbank über die VTP-Domäne weitergeleitet.

Dies geschieht unabhängig davon, ob der Switch ein VTP-Client oder ein VTP-Server ist. Ein VTP-Client kann VLAN-Informationen auf einem VTP-Server löschen. Sie können feststellen, dass dies geschehen ist, wenn viele Ports im Netzwerk in den Status Inaktiv wechseln, aber weiterhin einem nicht vorhandenen VLAN zuweisen.

Hinweis: Weitere Informationen finden Sie unter Flash Animation: VTP zur Demonstration dieses Problems.

Gehen Sie wie folgt vor, um dieses Problem zu vermeiden, wenn Sie einen Switch zum Netzwerk hinzufügen:

1. Bevor Sie den neuen Switch mit dem Netzwerk verbinden, ändern Sie den VTP-Modus des Switches in Transparent.

Damit wird die Konfigurationsänderungsnummer auf null ('0') zurückgesetzt.

2. Verbinden Sie den Switch mit dem Netzwerk, und konfigurieren Sie die entsprechenden Trunk-Verbindungen.

3. Konfigurieren Sie die VTP-Attribute:

1. Konfigurieren Sie den VTP-Domänennamen so, dass er mit dem VTP-Domänennamen des Netzwerks übereinstimmt.

2. Konfigurieren Sie die VTP-Version und das Kennwort (falls erforderlich).

4. Ändern Sie den VTP-Modus in Client.

Die Konfigurationsrevisionsnummer lautet immer noch 0 ('0'). VLANs werden von den im Netzwerk vorhandenen VTP-Servern propagiert.

5. Überprüfen Sie, ob alle erforderlichen VLANs auf dem neuen Switch und in den VTP-Servern des Netzwerks verfügbar sind.

6. Wenn ein VLAN fehlt, können Sie es schnell von einem der VTP-Server hinzufügen.

Weitere Informationen dazu, wie ein kürzlich eingesetzter Switch Netzwerkprobleme verursachen kann, finden Sie unter .

Überprüfung

Für diese Konfiguration ist kein separates Überprüfungsverfahren verfügbar. Verwenden Sie die im Konfigurationsbeispiel bereitgestellten Überprüfungsschritte.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- show vtp status [Cisco IOS]: Zeigt den aktuellen Status der VTP-Domäne an.

- show vtp domain [Catalyst OS]: Zeigt den aktuellen Status der VTP-Domäne an.

- show vlan: Zeigt die VLAN-Informationen an.

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Informationen zu häufigen Problemen mit dem VTP finden Sie unter VTP Troubleshooting and Caveats (VTP-Fehlerbehebung und Hinweise).

Zugehörige Informationen

- VLAN Trunk Protocol (VTP)

- LAN-Produkt-Support

- Support für LAN-Switching-Technologie

- Technischer Support und Dokumentation für Cisco Systeme