Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Wichtige Hinweise

EtherChannel

Trunking

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Catalyst 6500 - Befehle anzeigen

Cisco Router der Serie 7500 - Befehle anzeigen

Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument enthält Beispielkonfigurationen für Fast EtherChannel (FEC), Inter-Switch Link (ISL) und 802.1Q-Trunking zwischen einem Catalyst 6500-Switch, der CatalystOS (CatOS) ausführt, und einem Cisco 7500-Router. Die Ergebnisse der einzelnen Befehle werden während der Ausführung angezeigt. Obwohl in dieser Konfiguration ein Catalyst Switch der Serie 6000 verwendet wird, können Sie einen Catalyst Switch der Serie 4000 oder 5000 ersetzen, der CatOS ausführt.

Voraussetzungen

Anforderungen

Stellen Sie sicher, dass Sie diese Anforderungen erfüllen, bevor Sie versuchen, diese Konfiguration durchzuführen:

- Catalyst Switches der Serie 6000

- CatOS Version 5.1(1) CSX oder höher ist erforderlich, um EtherChannel zu unterstützen.

- Cisco Router der Serien 7000 oder 7500

- Router der Cisco 7000-Serie mit Route Switch Processor (RSP7000) oder Chassis Interface (RSP7000CI) oder Router der Cisco 7500-Serie mit Fast Ethernet Interface Processors (FEIP) oder VIP2-Port-Adaptern (Versatile Interface Processor)

- Wenn Sie den PA-2FEISL-Port-Adapter verwenden, müssen Sie die Hardware-Version 1.2 oder höher haben.

Siehe Problemhinweis: * Abgelaufen* FN - 8791_11301999 - PA-2FEISL 2-Port Fast Ethernet ISL-Ersatzempfehlung für weitere Informationen.

- Der native Befehl encapsulation dot1Q wurde in Cisco IOS® Software Release 12.1(3) T eingeführt. Mit diesem Befehl wird die Konfiguration geändert.

Weitere Informationen finden Sie im Abschnitt Cisco 7500 802.1Q-Konfiguration für Cisco IOS Software Releases vor 12.1(3)T dieses Dokuments.

- Cisco Express Forwarding ist auf Cisco Routern der Serie 7500 standardmäßig aktiviert. Die Unterstützung von Cisco Express Forwarding für IP-Routing zwischen IEEE 802.1Q-VLANs war jedoch erst ab der Cisco IOS-Softwareversion 12.2 und 12.2T verfügbar. Die 802.1Q-Kapselung kann in früheren Versionen noch konfiguriert werden. Sie müssen jedoch zuerst den globalen Befehl no ip cef ausgeben, um Cisco Express Forwarding zu deaktivieren.

- Wenn ein Router der 7500-Serie für Multiprotocol Label Switching (MPLS) und FEC konfiguriert ist, ist derzeit keine Unterstützung für Routing (MPLS" IP)-Pakete verfügbar, die von der MPLS-Schnittstelle zur FEC-Schnittstelle fließen. Daher wird nicht empfohlen, dass eine MPLS- und eine FEC-Konfiguration auf einem einzelnen Router gleichzeitig vorhanden sind.

- Zur Unterstützung von EtherChannel ist die Cisco IOS Software Release 11.1(14)CA oder höher erforderlich.

Zur Unterstützung von ISL-Trunking ist die Cisco IOS Software Release 11.3(1)T (alle zusätzlichen Funktionen) oder höher erforderlich.

Die Cisco IOS Software Release 12.0(1)T (alle plus Feature-Sets) oder höher ist für die Unterstützung von IEEE 802.1Q-Trunking erforderlich.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Catalyst 6500 mit CatOS 5.5.14

- Cisco 7500 mit Cisco IOS Software Release 12.2.7b

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Wichtige Hinweise

- Beachten Sie, dass Catalyst Switches der Serie 4000 kein ISL-Trunking unterstützen. Darüber hinaus sind einige Switching-Module auf Catalyst Switches der Serie 5000 nicht EtherChannel-fähig. Geben Sie den Befehl show port functions module (Portfunktionen anzeigen) ein, um festzustellen, ob ein bestimmtes Modul EtherChannel-fähig ist und welche Trunking-Kapselung es unterstützt.

- Es gibt bestimmte Richtlinien für die Konfiguration von EtherChannel und Trunking. Weitere Informationen finden Sie in der Softwaredokumentation Ihres Switches.

Wenn Sie beispielsweise die Softwareversion 5.5.x auf einem Catalyst 5000 ausführen, lesen Sie den Software Configuration Guide (5.5) und lesen Sie sorgfältig alle Konfigurationsrichtlinien und -beschränkungen im Abschnitt Configuring Fast EtherChannel and Gigabit EtherChannel.

EtherChannel

Die FEC- oder Gigabit EtherChannel (GEC)-Funktion ermöglicht die Bündelung mehrerer Point-to-Point-Links in einer logischen Verbindung. Der Catalyst 6000 unterstützt maximal acht Ports im Vollduplex-Modus, der einen Durchsatz von 1600 Mbit/s oder 1,6 Gbit/s für FEC und 16 Gbit/s für GEC bietet. Die Cisco Serie 7500 unterstützt maximal vier Ports pro FEC für 800 Mbit/s. Die EtherChannel-Funktionalität und -Leistung sind je nach Switch oder Router unterschiedlich. Weitere Informationen finden Sie unter Systemanforderungen zur Implementierung von EtherChannel auf Catalyst-Switches.

EtherChannel verteilt den Datenverkehr über alle Verbindungen und bietet Redundanz, wenn eine oder mehrere Verbindungen ausfallen. Weitere Informationen und Beispielkonfigurationen für den EtherChannel finden Sie unter Understanding EtherChannel Load Balancing and Redundancy on Catalyst Switches .

Weitere Informationen finden Sie auf der Seite EtherChannel der technischen Unterstützung und Dokumentation von Cisco.

Trunking

Trunking ist eine Möglichkeit, um Datenverkehr von mehreren VLANs über eine Point-to-Point-Verbindung oder ein EtherChannel-Paket zwischen zwei Geräten zu übertragen. Ethernet-Trunking kann auf zwei Arten implementiert werden:

- ISL (Cisco proprietäre Trunk-Kapselung)

- 802.1Q (IEEE-Standard-Trunk-Kapselung)

Weitere Informationen finden Sie auf der Seite VLAN Trunking Protocols (VLAN-Trunking-Protokolle) der technischen Unterstützung und Dokumentation von Cisco.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Diese Beispielkonfigurationen zeigen Ihnen, wie Sie folgende Aufgaben durchführen:

- Konfigurieren Sie zwei Zugriffsports für Workstation 1 in VLAN 1 und für Workstation 2 in VLAN 2 auf dem Catalyst 6500.

- Konfigurieren Sie das Standard-Gateway für Workstation 1 auf 10.10.10.1 /24, für Workstation 2 auf dem Cisco 7500 auf 10.10.11.1/24.

- Konfigurieren von ISL- und 802.1Q-Trunks über eine FEC mit zwei Ports zwischen einem Catalyst 6500-Switch und dem Cisco 7500-Router

- Konfigurieren Sie zwei Port-Channel-Subschnittstellen mit IP-Adressen für Inter-VLAN-Routing.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Trunking VLAN 1 und VLAN 2 über 2-Port FEC

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Catalyst 6500-Switch

- Cisco Router der Serie 7500

- Cisco 7500 802.1Q-Konfiguration für Cisco IOS Software-Versionen vor 12.1(3)T

Catalyst 6500-Switch

!--- Set the IP address and default gateway for VLAN 1 for management purposes.

Catalyst6500> (enable) set interface sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!--- Set the VTP mode. In this example, the mode is set to be transparent. Depending on your !--- network, set the VTP mode accordingly. !--- For details on VTP, refer to Understanding and Configuring VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

!--- Set the port speed to 100 and duplex to full. One of the requirements for EtherChannel !--- to work is for speed and duplex to be the same on both sides. To guarantee this, hard !--- code both speed and duplex on ports 3/1 and 3/2.

Catalyst6500> (enable) set port speed 3/1-2 100

Ports 3/1-2 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1-2 full

Ports 3/1-2 set to full-duplex.

!--- Enable FEC on ports 3/1 and 3/2. Because routers do not understand Port Aggregation !--- Protocol (PAgP), set the channel mode to one which causes ports to channel but which !--- does not generate PAgP frames.

Catalyst6500> (enable) set port channel 3/1-2 on

Port(s) 3/1-2 are assigned to admin group 105.

Port(s) 3/1-2 channel mode set to on.

!--- Enable trunking on ports 3/1 and 3/2. Because routers do not understand Dynamic !--- Trunking Protocol (DTP), set the trunking mode to nonegotiate, which causes ports to !--- trunk but which does not generate DTP frames. !--- Note: Because EtherChannel is configured first, any trunk settings that are applied !--- now to one port automatically apply to all other ports in the channel. !--- Enter the trunking encapsulation as either ISL…

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to isl.

!--- …or as dot1q. !--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0 10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

set port channel 3/1-2 105

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1-2  100

set port duplex     3/1-2  full

set trunk 3/1  nonegotiate isl 1-1005

set trunk 3/2  nonegotiate isl 1-1005

!--- If IEEE 802.1Q is configured, you will see this output instead: set trunk 3/1 nonegotiate dot1q 1-1005 set trunk 3/2 nonegotiate dot1q 1-1005

set port channel 3/1-2 mode on

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

Cisco Router der Serie 7500

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- If you are using ISL trunking, configure two port-channel sub-interfaces and issue the !--- encapsulation isl

command to enable ISL trunking. !--- Configure IP addresses for InterVLAN routing.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation isl 1

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation isl 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- If you are using 802.1Q trunking, issue the encapsulation dot1Q

native

!--- command to configure two port-channel sub-interfaces and enable 802.1Q trunking. !--- Configure the IP addresses for InterVLAN routing. !--- Note: The encapsulation dot1Q 1 native command was added in Cisco IOS Software !--- Release 12.1(3)T. If you are using an earlier version of Cisco IOS, see the !--- Cisco 7500 802.1Q Configuration for Cisco IOS Software Releases Earlier than 12.1(3)T !--- section of this document, to configure 802.1Q trunking on the router.

!--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation dot1Q 1 native

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command, to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: To make this setup work and to successfully ping between Workstation 1 and !--- Workstation 2, you must ensure that the default gateways on the workstations are setup !--- properly. For Workstation 1, the default gateway should be 10.10.10.1; and for !--- Workstation 2, the default gateway should be 10.10.11.1.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

interface Port-channel1

no ip address

full-duplex

hold-queue 300 in

!

interface Port-channel1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface Port-channel1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!--- If 802.1Q trunking is configured, you will see this output instead: interface Port-channel1.1 encapsulation dot1Q 1 native ip address 10.10.10.1 255.255.255.0 ! interface Port-channel1.2 encapsulation dot1Q 2 ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

Cisco 7500 802.1Q-Konfiguration für Cisco IOS Software-Versionen vor 12.1(3)T

In Cisco IOS-Versionen vor 12.1(3)T war der native Befehl encapsulation dot1Q1 unter der Subschnittstelle nicht verfügbar. Es ist jedoch weiterhin erforderlich, das native VLAN über die Verbindung hinweg wie oben beschrieben abzugleichen. Um 802.1Q-Trunking in Softwareversionen vor 12.1(3)T zu konfigurieren, konfigurieren Sie die IP-Adresse für VLAN 1 auf der Hauptschnittstelle von Port-Channel 1 und nicht auf der Subschnittstelle von Port-Channel.

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- Do not configure an interface port-channel 1.1 !--- Instead, create a port-channel 1 main interface and configure the IP address !--- for VLAN 1 here.

7500(config)# interface port-channel 1

7500(config-if)# full-duplex

7500(config-if)# ip address 10.10.10.1 255.255.255.0

7500(config-if)# exit

7500(config)#

!--- It is still necessary to create a subinterface for VLAN 2.

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: Remember also that—in any version of software previous to 12.2 or 12.2T for the !--- 7000/7500 series—you will have to issue the no ip cef command globally before you !--- configure 802.1Q trunking on a subinterface. Otherwise, you will see this error !--- message: 802.1q encapsulation not supported with CEF configured on the interface. !--- See the Components Used section of this document for more information.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface Port-channel1

ip address 10.10.10.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface Port-channel1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Catalyst 6500 - Befehle anzeigen

- show interface - Zeigt die IP-Adresse und das VLAN der sc0-Verwaltungsschnittstelle an. In diesem Beispiel wird das Standard-VLAN (VLAN 1) verwendet.

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

- show ip route - Zeigt das Standard-Gateway an. In diesem Beispiel ist 10.10.10.1 die IP-Adresse von Port-Channel 1 (für 802.1Q-Trunking) oder von Port-Channel 1.1 (für ISL-Trunking).

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

- show port functions mod/port (Portmodus anzeigen) - Zeigt einen kurzen Überblick über die Hardwarefunktionen von Switching-Modulen. In diesem Beispiel sehen Sie, dass Port 3/1 (und 3/2) EtherChannel-fähig ist, welche Trunking-Kapselungen unterstützt werden, und weitere Informationen.

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

- show port counters mod/port - Zeigt einen schnellen Überblick über mögliche Port-Fehler. In diesem Beispiel ist dieser Port fehlerfrei. Wenn Fehler am Port auftreten, finden Sie unter Fehlerbehebung bei Switch-Port- und Schnittstellenproblemen weitere Informationen.

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

- show port mod: Zeigt Informationen zu Portstatus, VLAN, Trunk sowie Geschwindigkeit und Duplex an. In diesem Beispiel ist der Access-Port für Workstation 1 3/3, der sich in VLAN 1 befindet. Der Zugriffsport für Workstation 2 ist 3/4, d. h. VLAN 2. Die Ports 3/1 und 3/2 sind die Trunking- und FEC-Ports.

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  trunk        full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!--- Output suppressed.

- show vlan: Zeigt an, welche Ports bestimmten VLANs zugewiesen sind. Beachten Sie, dass die Trunk-Ports in diesem Beispiel (3/1 und 3/2) in dieser Ausgabe nicht angezeigt werden, was normal ist.

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!--- Output suppressed.

- show trunk - Zeigt den Trunking-Modus, den Kapselungstyp, zulässige VLANs und aktive VLANs an. In diesem Beispiel sind VLAN 1 (immer zulässig und standardmäßig aktiv) und VLAN 2 die aktuell aktiven VLANs für den Trunk. Beachten Sie, dass sich beide Trunk-Ports in VLAN 1 befinden.

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

3/2      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Für 802.1Q-Trunking ändert sich die Ausgabe des vorherigen Befehls in Folgendes:

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

3/2      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Catalyst6500> (enable)

- show port channel - Zeigt den EtherChannel-Status an. In diesem Beispiel ist ein 2-Port-FEC (Ports 3/1 und 3/2) aktiviert, um die Übertragung von PAgP-Frames zu verhindern. Sie können auch die Remote-Port-Channel-Schnittstelle des 7500-Routers sehen.

Catalyst6500> (enable)  show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1  connected  on                     105   833

3/2  connected  on                     105   833

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1  7500                            Port-channel1.1           cisco RSP4

3/2

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

Bei einem FEC mit 802.1Q-Trunking ändert sich die Ausgabe des vorherigen Befehls wie folgt:

Catalyst6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1   connected  on                    257   769

3/2   connected  on                    257   769

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1       7500                            FastEthernet5/1/0         cisco RSP4

3/2       7500                            FastEthernet5/1/1         cisco RSP4

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

Wenn Sie die Ausgabe eines show-tech-Support-Befehls von Ihrem Cisco Gerät haben, können Sie das Output Interpreter Tool (nur registrierte Kunden) verwenden, um potenzielle Probleme und Bugfixes anzuzeigen.

Cisco Router der Serie 7500 - Befehle anzeigen

- show interface port-channel channel number: Gibt den Mitgliedsstatus für physische Schnittstellen an. In diesem Beispiel wird ein 2-Port-FEC zwischen den Ports 3/1 und 3/2 auf dem Catalyst 6000 und zwischen den Schnittstellen FastEthernet 5/1/0 und 5/1/1 auf dem 7500 konfiguriert. Port-Channel 1 wird als aktiv/aktiv angezeigt.

Es ist eine IP-Adresse konfiguriert, was in diesem Fall bedeutet, dass es sich um die native VLAN-IP-Adresse für 802.1Q-Trunking handelt. Weitere Informationen finden Sie im Abschnitt Cisco 7500 802.1Q-Konfiguration für Cisco IOS Software Releases vor 12.1(3)T dieses Dokuments. Die Ausgabe wird auch für die Subschnittstelle VLAN 2 802.1Q über den Befehl show interface port channel 1.2 angezeigt.

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:14, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

6720 packets input, 923310 bytes, 0 no buffer

Received 5010 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

1902 packets output, 573088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1q Virtual LAN, Vlan ID  2.

ARP type: ARPA, ARP Timeout 04:00:00

Dies ist die Ausgabe für ISL-Trunking und FEC:

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:01, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

113 packets input, 7278 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

13 packets output, 2264 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500# show interface port-channel 1.1

Port-channel1.1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

- show interfaces fastethernet slot/port-adapter/port - Zeigt den Status der physischen Schnittstellen des Routers und ob Fehler an den Schnittstellen vorhanden sind. In diesem Beispiel ist es fehlerfrei.

7500# show interface fastethernet 5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8

(bia 0001.6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- Support-Seiten für LAN-Produkte

- EtherChannel-Support-Seite

- Support-Seite für LAN-Switching

- Technischer Support und Dokumentation - Cisco Systems