Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Beispiel für die Ausgabe von Befehlen

Catalyst Switch 2900XL/3500XL

Catalyst 6506-Switch

Fehlerbehebung

Zugehörige Informationen

Einführung

In dieser Beispielkonfiguration wird ein EtherChannel zwischen einem Cisco Catalyst 6500 mit Catalyst OS (CatOS) und einem Catalyst 3500XL-Switch eingerichtet. EtherChannel kann auch als Fast EtherChannel (FEC) oder Gigabit EtherChannel (GEC) bezeichnet werden. Der Name hängt von der Geschwindigkeit der Schnittstellen oder Ports ab, die Sie zum Erstellen des EtherChannels verwenden. In diesem Szenario können Sie jeden dieser Switches verwenden, um die gleichen Ergebnisse zu erzielen:

- Jeder Catalyst Switch der Serien 4500/4000, 5500/5000 oder 6500/6000, der CatOS ausführt

- Alle Switches der Catalyst Layer-2 (L2)-Serie mit fester Konfiguration (2900XL oder 3500XL)

In diesem Dokument werden zwei Fast Ethernet-Ports von jedem Switch in einem FEC gebündelt. In diesem Dokument beziehen sich die Begriffe "FEC", "GEC", "Port-Channel", "Channel" und "Port-Gruppe" alle auf EtherChannel.

Voraussetzungen

Anforderungen

Stellen Sie sicher, dass Sie diese Anforderungen erfüllen, bevor Sie versuchen, diese Konfiguration durchzuführen:

- Vertrautheit mit den Befehlen, die zum Konfigurieren des EtherChannels auf einem Catalyst 2900XL- oder 3500XL-Switch verwendet werden sollen

Weitere Informationen zu den Befehlen finden Sie im Abschnitt Konfiguration der Switch-Ports im Dokument Catalyst 2900 XL und Catalyst 3500 XL Software Configuration Guide, 12.0(5)WC5, 12.0(5)WC6.

- Vertrautheit mit den Befehlen, die für die Konfiguration des EtherChannels auf einem Switch verwendet werden, auf dem CatOS ausgeführt wird

Weitere Informationen zu den Befehlen finden Sie im Abschnitt Konfigurieren von EtherChannel im Dokument Catalyst 6500 Software Configuration Guide, 8.7.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Catalyst 3500XL-Switch (Modell WS-C3524-PWR-XL-EN) mit Cisco IOS® Softwareversion 12.0(5)WC9

- Catalyst Switch der Serie 6500 (Modell 6506 mit Supervisor Engine II) mit CatOS-Software Version 8.2.1

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Hintergrundinformationen

Sie müssen EtherChannel manuell erstellen, da Catalyst Switches der Serien 2900XL/3500XL das Port Aggregation Protocol (PAgP) nicht unterstützen. CatOS-Switches unterstützen PAgP. PAgP erleichtert die automatische Erstellung von FEC und GEC. Weitere Informationen zu PAgP finden Sie im Abschnitt Konfigurieren von EtherChannel im Dokument Catalyst 6500 Software Configuration Guide, 8.7.

Erstellen Sie den Port-Channel in der Reihenfolge der folgenden Schritte:

Hinweis: Wenn Sie die Schritte in dieser Reihenfolge ausführen, vermeiden Sie mögliche Probleme mit dem Spanning Tree Protocol (STP), die während des Konfigurationsprozesses auftreten können. STP kann Ports mit dem errdisable-Status auf dem Catalyst 6500-Switch herunterfahren, wenn Sie den CatOS-Switch als Kanal konfigurieren, bevor Sie den XL-Switch als Kanal konfigurieren.

1. Geben Sie den Befehl set port disable module/port auf dem CatOS-Switch aus.

Mit dem Befehl wird festgelegt, dass die Ports für die Port-Channeling deaktiviert werden.

2. Erstellen Sie den Port-Channel (Portgruppe) auf dem XL-Switch.

3. Erstellen Sie den Port-Channel auf dem CatOS-Switch.

Hinweis: Stellen Sie sicher, dass der Kanalmodus auf "Ein" eingestellt ist. Diese Einstellung ist erforderlich, um PAgP an den Ports zu deaktivieren und die Ports zu einem Kanal zu zwingen.

4. Geben Sie den Befehl set port enable module/port auf dem CatOS-Switch ein.

Der Befehl aktiviert die Ports, die zuvor deaktiviert wurden, erneut.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Catalyst 3524XL

- Catalyst 6506

Catalyst 3524XL

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat3500

!

enable password mysecret

!--- This is the privileged mode password for the example.

!

!

!

!

!

ip subnet-zero

!

!

!

interface FastEthernet0/1

port group 1

!--- The port group

command !--- makes this interface a member of channel group 1.

!

interface FastEthernet0/2

port group 1

!--- This interface is also a member of channel group 1.

!

interface VLAN1

ip address 10.10.10.2 255.255.255.0

!--- This is the IP address for management.

no ip directed-broadcast

no ip route-cache

!

!

line con 0

transport input none

stopbits 1

line vty 0 4

password mysecret

!--- This is the Telnet password for the example.

login

line vty 5 15

login

!

end

cat3500#

Catalyst 6506

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Sun Feb 1 2004, 14:03:48

!

#version 8.2(1)

!

!--- Output suppressed.

!

#ip

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!--- This is the IP address for management.

!

!--- Output suppressed.

!

#port channel

set port channel 2/1-2 15

!--- The set port channel

command !--- creates an EtherChannel on switches that run CatOS. !--- The admin group (15, in this case) is not configured, !--- but is a number that the system assigns randomly.

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 48-port 10/100BaseTX Ethernet

set port channel 2/1-2 mode on

!--- The set port channel

mode on

command disables PAgP. !--- The disablement forces the ports to form a channel with the XL switch !--- that does not support PAgP.

!

#module 3 empty

!

#module 4 empty

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 empty

end

cat6506> (enable)

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- Überprüfen Sie den Port-Channel im Catalyst 2900XL/3500XL-Switch:

- Portgruppe anzeigen

- Portgruppen-Gruppennummer anzeigen

- Überprüfen Sie den Spanning Tree-Status des Catalyst 2900XL/3500XL-Switches:

- show spanning-tree

- Überprüfen Sie den Port-Channel im CatOS-Switch:

- Portfähigkeitsmodul anzeigen

- Port-Channel anzeigen

- Port-Channel-Modul/Port anzeigen

- Anzeige von Port-Channel-Informationen

- Überprüfen Sie den Spanning Tree-Status auf dem CatOS-Switch:

- Schauspanel

- show spantree vlan

- SpanTree-Modul/Port anzeigen

Beispiel für die Ausgabe von Befehlen

Catalyst Switch 2900XL/3500XL

- Portgruppe anzeigen

cat3500# show port group

Group       Interface           Transmit Distribution

-----   ---------------------   ---------------------

1       FastEthernet0/1         source address

1       FastEthernet0/2         source address

cat3500#

- show spanning-tree

cat3500# show spanning-tree

Spanning tree 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.5868.f180

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 00d0.020e.2c00

Root port is 1, cost of root path is 12

Topology change flag not set, detected flag not set, changes 10

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

Interface Fa0/1 (port 1) in Spanning tree 1 is FORWARDING

Port path cost 12, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.020e.2c00

Designated port is 33, path cost 0

Timers: message age 2, forward delay 0, hold 0

BPDU: sent 4, received 633

Interface Fa0/3 (port 15) in Spanning tree 1 is down

Port path cost 100, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.5868.f180

!--- Output suppressed.

Hinweis: Diese Ausgabe zeigt die Schnittstelle Fa0/2 nicht an, da die Schnittstelle im Port-Channel mit Fa0/1 gebündelt ist. Siehe (Port 1) in der Ausgabe.

Catalyst 6506-Switch

- show port functions module (Portfunktionen anzeigen) - Verwenden Sie diesen Befehl, um zu überprüfen, ob das Modul EtherChannel unterstützt.

cat6506> (enable) show port capabilities 2

Model                    WS-X6348-RJ-45

Port                     2/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

Model                    WS-X6348-RJ-45

Port                     2/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),TX(2q2t)

COs rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

!--- Output suppressed.

- Port-Channel anzeigen

cat6506> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      15  1762

2/2  connected  on                      15  1762

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

cat6506> (enable)

- Anzeige von Port-Channel-Informationen

cat6506> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

2/1  connected  on                      15    1762 a-100 a-full    1

2/2  connected  on                      15    1762 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

2/1  67             241            ip both

2/2  67             241            ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

!--- Output suppressed.

- show spantree vlan

cat6506> (enable) show spantree 1

VLAN 1

Spanning tree mode          RAPID-PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-9b-bf-04-00

Designated Root Priority    32768

Designated Root Cost        0

Designated Root Port        1/0

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-04-9b-bf-04-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     State         Role Cost      Prio Type

------------------------ ------------- ---- --------- ---- --------------------

1/1                     not-connected  -           4   32

1/2                     not-connected  -           4   32

2/1-2                    forwarding    DESG        12   32 P2P, PEER(STP)

2/3                     not-connected  -         100   32

2/4                     not-connected  -         100   32

2/5                     not-connected  -         100   32

2/6                     not-connected  -         100   32

!--- Output suppressed.

- SpanTree-Modul/Port anzeigen

cat6506> (enable) show spantree 2/1

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

cat6506> (enable) show spantree 2/2

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

Hinweis: Die Ausgabe des Befehls show spantree module/port für die Ports 2/1 und 2/2 zeigt identische Ergebnisse an, da die Ports in einem Kanal gruppiert sind.

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- Konfigurieren von EtherChannel- und 802.1Q-Trunking zwischen Catalyst Switches der Serien 2900XL/3500XL und 2940, 2950/2955 und 2970

- Konfigurieren von Layer-2-EtherChannel und Trunking zwischen Switches der Serien 2900XL/3500XL/2950 und Catalyst Switches mit Cisco IOS Software

- Support-Seiten für LAN-Produkte

- Support-Seite für LAN-Switching

- Technischer Support und Dokumentation - Cisco Systems