Inhalt

Einführung

Voraussetzungen

Anforderungen

Komponenten

Konventionen

Hintergrund

Details der MIB-Variablen, einschließlich OIDs (Object Identifiers)

Hinzufügen eines VLANs zu einem Cisco Catalyst Switch mit SNMP

Schrittweise Anleitung

Hinzufügen eines VLANs zu einem Cisco Catalyst Switch mit SNMP

Anweisungen in einem Schritt

Löschen eines VLANs von einem Cisco Catalyst Switch mit SNMP

Schrittweise Anleitung

Hinzufügen eines Ports zu einem VLAN auf einem Cisco Catalyst Switch mit SNMP

Ändern eines Ports von einem VLAN in ein anderes VLAN

Zugehörige Informationen

Einführung

In diesem Dokument wird beschrieben, wie Sie VLANs auf einem Cisco Catalyst Switch erstellen und löschen, der das Simple Network Management Protocol (SNMP) verwendet. Außerdem wird beschrieben, wie einem VLAN mit SNMP Ports hinzugefügt werden.

Voraussetzungen

Anforderungen

Bevor Sie die Informationen in diesem Dokument verwenden, vergewissern Sie sich, dass Sie Folgendes verstehen:

- Funktionsweise von ifTable und ifIndexes

- Funktionsweise von VLANs auf Cisco Catalyst Switches

- Anzeigen von VLAN-Informationen auf Cisco Catalyst Switches

- Die allgemeine Verwendung von SNMP-Befehlen Get, Set und walk

Komponenten

Dieses Dokument gilt nur für Catalyst Switches mit regulärem Catalyst OS oder Catalyst IOS, die IF-MIB, CISCO-VTP-MIB und CISCO-VLAN-MEMBERSHIP-MIB unterstützen. Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Catalyst 3524XL mit CatIOS 12.0(5)WC5a

- NET-SNMP Version 5.0.6 verfügbar unter http://www.net-snmp.org/

Die in diesem Dokument enthaltenen Informationen wurden aus Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Sie in einem Live-Netzwerk arbeiten, vergewissern Sie sich vor der Verwendung eines Befehls, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Hintergrund

Details der MIB-Variablen, einschließlich OIDs (Object Identifiers)

1.3.6.1.4.1.9.9.46.1.3.1.1.2 (CISCO-VTP-MIB)

vtpVlanState  OBJECT-TYPE

SYNTAX     INTEGER { operational(1),

suspended(2),

mtuTooBigForDevice(3),

mtuTooBigForTrunk(4) }

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The state of this VLAN.

The state 'mtuTooBigForDevice' indicates that this device

cannot participate in this VLAN because the VLAN's MTU is

larger than the device can support.

The state 'mtuTooBigForTrunk' indicates that while this

VLAN's MTU is supported by this device, it is too large for

one or more of the device's trunk ports."

::= { vtpVlanEntry 2 }

1.3.6.1.4.1.9.9.46.1.4.1.1.1 (CISCO-VTP-MIB)

vtpVlanEditOperation OBJECT-TYPE

SYNTAX     INTEGER { none(1),

copy(2),

apply(3),

release(4),

restartTimer(5)

}

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "This object always has the value 'none' when read.  When

written, each value causes the appropriate action:

'copy' - causes the creation of rows in the

vtpVlanEditTable exactly corresponding to the current global

VLAN information for this management domain.  If the Edit

Buffer (for this management domain) is not currently empty,

a copy operation fails.  A successful copy operation starts

the deadman-timer.

'apply' - first performs a consistent check on the the

modified information contained in the Edit Buffer, and if

consistent, then tries to instanciate the modified

information as the new global VLAN information.  Note that

an empty Edit Buffer (for the management domain) would

always result in an inconsistency since the default VLANs

are required to be present.

'release' - flushes the Edit Buffer (for this management

domain), clears the Owner information, and aborts the

deadman-timer.  A release is generated automatically if the

deadman-timer ever expires.

'restartTimer' - restarts the deadman-timer.

'none' - no operation is performed."

::= { vtpEditControlEntry 1 }

1.3.6.1.4.1.9.9.46.1.4.1.1.3 (CISCO-VTP-MIB)

vtpVlanEditBufferOwner OBJECT-TYPE

SYNTAX     OwnerString

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The management station which is currently using the Edit

Buffer for this management domain.  When the Edit Buffer for

a management domain is not currently in use, the value of

this object is the zero-length string.  Note that it is also

the zero-length string if a manager fails to set this object

when invoking a copy operation."

::= { vtpEditControlEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.11 (CISCO-VTP-MIB)

vtpVlanEditRowStatus OBJECT-TYPE

SYNTAX     RowStatus

1:active

2:notInService

3:notReady

4:createAndGo

5:createAndWait

6:destroy

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The status of this row.  Any and all columnar objects in an

existing row can be modified irrespective of the status of

the row.

A row is not qualified for activation until instances of at

least its vtpVlanEditType, vtpVlanEditName and

vtpVlanEditDot10Said columns have appropriate values.

The management station should endeavor to make all rows

consistent in the table before 'apply'ing the buffer.  An

inconsistent entry in the table will cause the entire

buffer to be rejected with the vtpVlanApplyStatus object

set to the appropriate error value."

::= { vtpVlanEditEntry 11 }

1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.48 (CISCO-VTP-MIB)

vtpVlanEditType OBJECT-TYPE

SYNTAX     VlanType

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The type which this VLAN would have.

An implementation may restrict access to this object."

DEFVAL     { ethernet }

::= { vtpVlanEditEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.48 (CISCO-VTP-MIB)

vtpVlanEditName OBJECT-TYPE

SYNTAX     DisplayString (SIZE (1..32))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The name which this VLAN would have.  This name would be

used as the ELAN-name for an ATM LAN-Emulation segment of

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 4 }

1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.48 (CISCO-VTP-MIB)

vtpVlanEditDot10Said OBJECT-TYPE

SYNTAX     OCTET STRING (SIZE (4))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The value of the 802.10 SAID field which would be used for

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 6 }

1.3.6.1.4.1.9.9.46.1.4.1.1.2.1 (CISCO-VTP-MIB)

vtpVlanApplyStatus OBJECT-TYPE

SYNTAX     INTEGER { inProgress(1),

succeeded(2),

configNumberError(3),

inconsistentEdit(4),

tooBig(5),

localNVStoreFail(6),

remoteNVStoreFail(7),

editBufferEmpty(8),

someOtherError(9)

}

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The current status of an 'apply' operation to instanciate

the Edit Buffer as the new global VLAN information (for this

management domain).  If no apply is currently active, the

status represented is that of the most recently completed

apply.  The possible values are:

inProgress - 'apply' operation in progress;

succeeded - the 'apply' was successful (this value is

also used when no apply has been invoked since the

last time the local system restarted);

configNumberError - the apply failed because the value of

vtpVlanEditConfigRevNumber was less or equal to

the value of current value of

managementDomainConfigRevNumber;

inconsistentEdit - the apply failed because the modified

information was not self-consistent;

tooBig - the apply failed because the modified

information was too large to fit in this VTP

Server's non-volatile storage location;

localNVStoreFail - the apply failed in trying to store

the new information in a local non-volatile

storage location;

remoteNVStoreFail - the apply failed in trying to store

the new information in a remote non-volatile

storage location;

editBufferEmpty - the apply failed because the Edit

Buffer was empty (for this management domain).

someOtherError - the apply failed for some other reason

(e.g., insufficient memory)."

::= { vtpEditControlEntry 2 }

1.3.6.1.4.1.9.9.68.1.2.2.1.2 (CISCO-VLAN-MEMBERSHIP-MIB)

vmVlan  OBJECT-TYPE

SYNTAX     INTEGER(0..4095)

MAX-ACCESS read-write

STATUS     current

DESCRIPTION                "The VLAN id of the VLAN the port is assigned to

when vmVlanType is set to static or dynamic.

This object is not instantiated if not applicable.

The value may be 0 if the port is not assigned

to a VLAN.

If vmVlanType is static, the port is always

assigned to a VLAN and the object may not be

set to 0.

If vmVlanType is dynamic the object's value is

0 if the port is currently not assigned to a VLAN.

In addition, the object may be set to 0 only."

::= { vmMembershipEntry 2 }

Hinzufügen eines VLANs zu einem Cisco Catalyst Switch mit SNMP

Schrittweise Anleitung

Im Beispiel unten wird VLAN 11 zum Switch hinzugefügt:

1. Um zu überprüfen, welche VLANs derzeit auf dem Switch konfiguriert sind, führen Sie einen snmpwalk auf der vtpVlanState-OID aus:

Hinweis: Die letzte Nummer in der OID ist die VLAN-Nummer.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

2. Überprüfen Sie, ob die Edition von einer anderen NMS-Station oder einem anderen Gerät verwendet wird. Die Edition wird nicht verwendet, wenn die folgende Meldung angezeigt wird: Keine MIB-Objekte in Unterstruktur enthalten:

snmpwalk -c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

3. Die Edition ist nicht in Gebrauch, daher ist es sicher zu beginnen, zu bearbeiten. Legen Sie vtpVlanEditOperation auf den Kopierzustand (Ganzzahl 2) fest. Dadurch können Sie das VLAN erstellen.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

4. Um den aktuellen Besitzer der Bearbeitungsberechtigung sichtbar zu machen, können Sie beim Ausgeben des Befehls vtpVlanEditBufferOwner den Besitzer festlegen.

snmpset -c private crumpy vtpVlanEditBufferOwner.1 octetstring "Gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditBufferOwner.1 : OCTET STRING- (ascii):    Gerald

5. In diesem Beispiel wird veranschaulicht, wie überprüft wird, ob die Tabelle vorhanden ist:

snmpwalk -c public crumpy vtpVlanEditTable

vtpVlanEditState.1.1 : INTEGER: operational

vtpVlanEditState.1.2 : INTEGER: operational

vtpVlanEditState.1.3 : INTEGER: operational

..

6. In diesem Beispiel wird VLAN 11 veranschaulicht, wie Sie eine Zeile erstellen und Typ und Namen festlegen:

snmpset -c private crumpy vtpVlanEditRowStatus.1.11 integer 4

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.11 : INTEGER: createAndGo

snmpset -c private crumpy vtpVlanEditType.1.11 integer 1

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditType.1.11 : INTEGER: ethernet

snmpset -c private crumpy vtpVlanEditName.1.11 octetstring "test_11_gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditName.1.11 : DISPLAY STRING- (ascii):  test_11_gerald

7. Legen Sie vtpVlanEditDot10Said fest. Dies ist die VLAN-Nummer + 100000, die in hexadezimal übersetzt wurde. In diesem Beispiel wird VLAN 11 erstellt. Das vtpVlanEditDot10Said sollte daher wie folgt lauten: 11 + 100000 = 100011 -> Hex: 000186AB

snmpset -c private crumpy vtpVlanEditDot10Said.1.11 octetstringhex 000186AB

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEdi

ntry.vtpVlanEditDot10Said.1.11 : OCTET STRING-   (hex): length = 4

0:  00 01 86 ab -- -- -- -- -- -- -- -- -- -- -- --     ................

8. Wenn Sie VLAN 11 erstellt haben, müssen Sie die Änderungen übernehmen. Verwenden Sie die OID vtpVlanEditOperation erneut. Verwenden Sie dieses Mal Apply, um die Einstellungen zu bestätigen:

snmpset -c private crumpy vtpVlanEditOperation.1 integer 3

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: apply

9. Überprüfen Sie, ob das VLAN erfolgreich erstellt wurde. Verwenden Sie die OID vtpVlanApplyStatus. Überprüfen Sie den Vorgang, bis der Status lautet: erfolgreich:

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: succeeded

10. Die letzte Aktion besteht darin, die Änderungen zu bestätigen und die Berechtigungen freizugeben, damit andere Benutzer VLANs aus ihrem NMS hinzufügen, ändern oder löschen können.

snmpset  -c private crumpy vtpVlanEditOperation.1 integer 4

vtpVlanEditOperation.1 : INTEGER: release

11. Stellen Sie sicher, dass der Puffer leer ist:

snmpwalk –c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

12. Vergewissern Sie sich, dass VLAN 11 auf dem Switch mit dem CLI-Befehl show vlan oder mit snmpwalk erstellt wurde:

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Hinzufügen eines VLANs zu einem Cisco Catalyst Switch mit SNMP

Anweisungen in einem Schritt

Bei einem Schritt werden die OID-Nummern anstelle der OID-Namen wie im vorherigen Schritt verwendet. Die MIB-Details zur Übersetzung finden Sie hier. In diesem Beispiel wird VLAN 6 erstellt:

snmpset -c private crumpy 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 2 1.3.6.1.4.1.9.9.46.1.4.1.1.3.1 octetstring "gcober"

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.2.1.11.1.6 integer 4 1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.6 integer 1 1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.6 octetstring "vlan6" 1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.6 octetstringhex 000186A6 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 3

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 4

snmpwalk -c public crumpy 1.3.6.1.4.1.9.9.46.1.3.1.1.2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.6 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

Hinweis: Bei einigen SNMP-Versionen muss in den SNMP SET-Befehlen ein (.) vor der OID verwendet werden.

Löschen eines VLANs von einem Cisco Catalyst Switch mit SNMP

Schrittweise Anleitung

In diesem Beispiel wird VLAN 48 vom Switch gelöscht. Weitere Informationen finden Sie unter Hinzufügen eines VLAN zu einem Cisco Catalyst mit SNMP. Der Unterschied zwischen diesem Abschnitt, in dem Sie ein VLAN löschen, und dem VLAN, in dem Sie ein VLAN hinzufügen, besteht darin, dass Sie anstelle des CreateAndGo-Befehls für den VtpVlanEditRowStatus die Zerstörung verwenden:

1. Geben Sie den Befehl zum Löschen von VLAN 48 aus:

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

snmpset -c private crumpy vtpVlanEditRowStatus.1.48 integer 6

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.48 : INTEGER: destroy

2. Um zu überprüfen, ob VLAN 48 gelöscht wurde, verwenden Sie vtpVlanState oder show vlan in der CLI:

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Hinzufügen eines Ports zu einem VLAN auf einem Cisco Catalyst Switch mit SNMP

Dieses Beispiel zeigt, wie Sie einen Port Fast Ethernet 0/5 zu VLAN 48 hinzufügen.

1. Um zu überprüfen, welche Eigenschaft bei Index Fast Eth 0/5 vorhanden ist, führen Sie einen Snapwalk von ifDescr aus:

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.6 : DISPLAY STRING- (ascii):  FastEthernet0/5

…

2. Da Sie wissen, dass Port Fast Eth 0/5 einen ifIndex von 6 hat, fügen Sie den Port zu VLAN 48 hinzu:

snmpset -c private crumpy vmVlan.6 integer 48

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

3. Stellen Sie sicher, dass der Port korrekt hinzugefügt wurde, indem Sie erneut dieselbe OID abfragen.

snmpget -c public crumpy vmVlan.6

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

Sie können dies auch auf dem Switch überprüfen:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/5

Ändern eines Ports von einem VLAN in ein anderes VLAN

Dieses Beispiel veranschaulicht, wie Port Fast Eth 0/3 zu VLAN 48 gehört und in VLAN 1 (Standard-VLAN) verschoben wird:

1. Um zu überprüfen, welche Eigenschaft bei Index Fast Eth 0/3 vorhanden ist, führen Sie einen Snapwalk von ifDescr aus:

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.4 : DISPLAY STRING- (ascii):  FastEthernet0/3

…

2. Da Sie wissen, dass Port Fast Eth 0/3 einen ifIndex von 4 aufweist, können Sie überprüfen, zu welchem VLAN der Port derzeit gehört:

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 48

3. Der Port gehört zu VLAN 48.

snmpset -c private crumpy vmVlan.4 integer 1

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

4. Um den Port von VLAN 48 zu VLAN 1 zu verschieben, müssen Sie einen Satz vmVLAN eingeben.

5. Um zu überprüfen, ob der Port in das andere VLAN geändert wurde, stellen Sie vmVlan erneut ab:

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

Sie können dies auch auf dem Switch selbst überprüfen:

Vor der Änderung:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/4, Fa0/5,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/3

Nach der Änderung:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/5, Fa0/6, Fa0/7, Fa0/8,

Fa0/9, Fa0/10, Fa0/11, Fa0/12,

Fa0/13, Fa0/14, Fa0/15, Fa0/16,

Fa0/17, Fa0/18, Fa0/19, Fa0/20,

Fa0/21, Fa0/22, Fa0/23, Fa0/24,

Gi0/1, Gi0/2

48   VLAN0048                         active

Hinweis: Sie können weitere Änderungen vornehmen, z. B. den VLAN-Namen, den Besitzer und vieles mehr. Weitere Informationen zu OID finden Sie in der gesamten MIB.

Zugehörige Informationen

- Technischer Support - Cisco Systems