Inhalt

Einführung

Voraussetzungen

Voraussetzungen

Hardware- und Softwareversionen

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Überprüfen der OSPFv3-Konfiguration

BGP-Konfiguration überprüfen

Zugehörige Informationen

Einführung

Dieses Dokument enthält ein Beispiel für die Neuverteilung von OSPFv3-Routen (Open Shortest Path First Version 3) in Multiprotocol BGP für IPv6. OSPFv3 wird auf OSPF-Version 2 erweitert, um IPv6-Routing-Präfixe und IPv6-Adressen mit größerer Größe zu unterstützen. Multiprotocol BGP ist ein erweitertes BGP, das Routing-Informationen für mehrere Protokoll-Adressfamilien der Netzwerkschicht wie die IPv6-Adressfamilie und für IP-Multicast-Routen überträgt.

Voraussetzungen

Voraussetzungen

Stellen Sie sicher, dass Sie diese Anforderungen erfüllen, bevor Sie versuchen, diese Konfiguration durchzuführen:

- Beispielkonfiguration für OSPFv3

- Konfigurationsbeispiel für Multiprotocol BGP für IPv6

- Weiterverteilen von Routing-Protokollen

Hardware- und Softwareversionen

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Konfigurationen in diesem Dokument basieren auf dem Cisco Router der Serie 3700 mit Cisco IOS® Softwareversion 12.4 (15)T1.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Beispiel werden die Router R2 und R3 über eine serielle Schnittstelle angeschlossen und mit Multiprotocol BGP konfiguriert. Router R2 und R3 kommunizieren mit ihren lokalen Routern R1 und R4 mithilfe von OSPFv3. Loopback-Adressen werden in den Routern zum Generieren von Netzwerken erstellt. Die Router R2 und R3, die sowohl BGP als auch OSPFv3 ausführen, verwenden den Befehl redistribute, um OSPFv3-Routen in das BGP umzuverteilen. Alle Router sind mit IPv6-Adressen konfiguriert.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Router R1

- Router R2

- Router R3

- Router R4

Router R1

!

version 12.4

!

hostname R1

!

ip cef

!

ipv6 unicast-routing

!--- Enables the forwarding of IPv6 packets.

!

interface Loopback0

no ip address

ipv6 address 2222::1/128

ipv6 ospf 1 area 0

!--- Enables OSPFv3 on the interface and associates !--- the interface loopback0 to area 0.

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::1/64

ipv6 ospf 1 area 0

!--- Associates the Interface Fa0/0 to area 0.

!

ipv6 router ospf 1

router-id 1.1.1.1

!--- Router R1 uses 1.1.1.1 as router ID.

log-adjacency-changes

!

end

Router R2

!

version 12.4

!

hostname R2

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 2010::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 2011::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 5050:55:55:55::55/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::10/64

clock rate 2000000

!

router bgp 65000

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

!--- Without configuring "no bgp default ipv4-unicast" only !--- IPv4 will be advertised.

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 65000

neighbor 3030:1:1:1::11 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::11 activate

network 5050:55:55:55::55/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

!--- This redistributes all OSPF routes into BGP.

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 2.2.2.2

log-adjacency-changes

!

end

Router R3

!

version 12.4

!

hostname R3

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1111::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 1112::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 6060:66:66:66::66/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::11/64

clock rate 2000000

!

router bgp 65000

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 65000

neighbor 3030:1:1:1::10 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::10 activate

network 6060:66:66:66::66/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 3.3.3.3

log-adjacency-changes

!

end

Router R4

!

version 12.4

!

hostname R4

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 3333::1/128

ipv6 ospf 1 area 0

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::1/64

ipv6 ospf 1 area 0

!

ipv6 router ospf 1

router-id 5.5.5.5

log-adjacency-changes

!

end

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Die folgenden Befehle werden zum Überprüfen der Konfiguration verwendet:

- show ipv6 route ospf

- show ipv6 route bgp

Überprüfen der OSPFv3-Konfiguration

Um zu überprüfen, ob OSPFv3 ordnungsgemäß konfiguriert ist, verwenden Sie den Befehl show ipv6 route ospf in den Routern R1 und R4.

show ipv6 route ospf

In Router R1

R1#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  2010::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

OI  2011::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

In Router R4

R4#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  1111::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

OI  1112::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

BGP-Konfiguration überprüfen

Um zu überprüfen, ob die OSPFv3-Routen in das BGP umverteilt werden, verwenden Sie den Befehl show ipv6 route bgp in den Routern R2 und R3.

show ipv6 route bgp

In Router R2
R2#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1111::1/128 [200/0]

via 3030:1:1:1::11

B   1112::1/128 [200/0]

via 3030:1:1:1::11

B   2020:1:1:1::/64 [200/0]

via 3030:1:1:1::11

B   3333::1/128 [200/10]

via 3030:1:1:1::11

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   6060:66:66:66::66/128 [200/0]

via 3030:1:1:1::11

In Router R3

R3#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1010:1:1:1::/64 [200/0]

via 3030:1:1:1::10

B   2010::1/128 [200/0]

via 3030:1:1:1::10

B   2011::1/128 [200/0]

via 3030:1:1:1::10

B   2222::1/128 [200/10]

via 3030:1:1:1::10

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   5050:55:55:55::55/128 [200/0]

via 3030:1:1:1::10

Zugehörige Informationen

- IPv6-Support-Seite

- OSPF-Support-Seite

- BGP-Support-Seite

- Technischer Support und Dokumentation - Cisco Systems