Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument enthält eine Beispielkonfiguration für statische Layer-2-Tunneling-Protokoll Version 3 (L2TPv3) und Hairpinning-Methoden.

In dieser Tabelle wird die Unterstützung von L2TPv3-Softwareversionsänderungen für Cisco IOS® beschrieben:

Cisco IOS Softwareversion

Beschreibung der L2TPv3-Unterstützung

12,0(21)S

Die anfängliche Datenebenenunterstützung für L2TPv3 wurde auf den Plattformen der Cisco Serien 7200, 7500, 10720 und 12000 eingeführt.

12,0(23)S

L2TPv3-Unterstützung auf Kontrollebene wurde für die Plattformen der Cisco Serien 7200, 7500, 10720 und 12000 eingeführt.

12,3(2)T

Diese Funktion wurde in Cisco IOS Software Release 12.3(2)T integriert.

Sie müssen Cisco Express Forwarding (CEF) aktivieren, um die L2TPv3-Funktion zu verwenden. Der Xconnect-Konfigurations-Submodus wird blockiert, bis CEF aktiviert ist. Auf verteilten Plattformen wie der Cisco 7500-Serie wird die Sitzung abgebrochen, wenn CEF deaktiviert ist, während eine Sitzung eingerichtet wurde. Die Sitzung wird unterbrochen und unterbrochen, bis CEF erneut aktiviert wird. Verwenden Sie den Befehl ip cef oder ip cef distributed, um CEF zu aktivieren.

Die Angabe einer Quell-IP-Adresse zum Konfigurieren einer Loopback-Schnittstelle wird dringend empfohlen. Wenn Sie keine Loopback-Schnittstelle konfigurieren, wählt der Router die beste verfügbare lokale Adresse aus. Dabei kann es sich um eine beliebige IP-Adresse handeln, die für eine Core-seitige Schnittstelle konfiguriert wurde. Diese Konfiguration kann die Einrichtung eines Steuerungskanals verhindern. Die Loopback-Adresse muss von den Kernnetzwerken aus erreichbar sein.

Voraussetzungen

Anforderungen

Stellen Sie vor dem Versuch mit dieser Konfiguration sicher, dass Sie mit folgenden Aspekten vertraut sind:

- L2TPv3: Layer-2-Tunnelprotokoll Version 3

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Hinweis: Router R2 und R3 werden vom Anbieter verwendet. Die Router R1, R4, R5 und R6 sind Endkunden. Bei Verwendung von L2TPv3 scheint der Router R4 eine direkte Verbindung zu R5 zu haben. Dies gilt auch für die Verbindung zwischen Router R1 und Router R6.

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Statische Pseudo-Wire über eine IP-Cloud. Entsprechender Teil der Konfiguration ist in R2 und R3 zu finden, wo zwei unidirektionale Tunnel konfiguriert sind.

- Hairpin Pseudowire- oder Local-Switching (von einem Port zu einem anderen Port im gleichen Router). Die Konfiguration erfolgt nur auf R2 und besteht aus der Konfiguration von zwei unidirektionalen Tunneln, die auf zwei Loopbacks verweisen, die beide auf Router R2 angeordnet sind.

R2

R2# show running-config

Building configuration...

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R2

!

!

clock timezone EST 10

ip subnet-zero

ip cef

no ip domain-lookup

l2tp-class R2signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR5R4

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback0

ip dfbit set

!

pseudowire-class wireR6R1

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback1

ip dfbit set

!

pseudowire-class wireR1R6

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback2

ip dfbit set

!

interface Loopback0

description Used by wireR5R4 for Static Connection

ip address 2.2.2.2 255.255.255.255

no ip directed-broadcast

!

interface Loopback1

description Used by wireR6R1 for Hair Pinning Connection

ip address 2.2.2.6 255.255.255.255

no ip directed-broadcast

!

interface Loopback2

description Used by wireR1R6 for Hair Pinning Connection

ip address 2.2.2.1 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

description Connection to R1

no ip address

no ip directed-broadcast

xconnect 2.2.2.6 16 encapsulation l2tpv3 pw-class wireR1R6

!

interface Ethernet1/0

description Connection to Pretend Cloud.

ip address 20.20.20.2 255.255.255.0

no ip directed-broadcast

no cdp enable

!

interface Ethernet2/0

description Connection to R5

no ip address

no ip directed-broadcast

no cdp enable

xconnect 3.3.3.3 12 encapsulation l2tpv3 pw-class wireR5R4

!

interface Ethernet3/0

description Connection to R6

no ip address

no ip directed-broadcast

xconnect 2.2.2.1 16 encapsulation l2tpv3 pw-class wireR6R1

!

ip classless

ip route 3.3.3.3 255.255.255.255 20.20.20.3

!--- The other end of wireR5R4 loopback (3.3.3.3) must be

!--- reachable from this router. Hair Pinning loopbacks

!--- are reachable—there is no need for additional routes.

!

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R3

R3# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R3

!

!

clock timezone EST 10

ip subnet-zero

ip cef

!

l2tp-class R3signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR4R5

encapsulation l2tpv3

protocol l2tpv3 R3signal

ip local interface Loopback0

ip dfbit set

!

interface Loopback0

description Use by wireR4R5 for static connection

ip address 3.3.3.3 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

ip address 20.20.20.3 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1/0

no ip address

no ip directed-broadcast

no cdp enable

xconnect 2.2.2.2 12 encapsulation l2tpv3 pw-class wireR4R5

!

ip classless

ip route 2.2.2.2 255.255.255.255 Ethernet0/0

!--- The other end of wireR4R5 loopback (3.3.3.3) must be

!--- reachable from this router.

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

Konfiguration des R1R6-Tunnels (Pseudo Wire) des Endrouters des Kunden:

R1

R1# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R1

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R6

R6# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R6

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.6 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

Konfiguration des R4R5-Tunnels (Pseudo Wire) des Endrouters:

R4

R4# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R5

R5# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R5

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.5 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

Überprüfen

Dieser Abschnitt enthält Informationen, mit denen Sie überprüfen können, ob Ihre Konfiguration ordnungsgemäß funktioniert.

R4# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.5    1   FULL/DR   00:00:39    30.30.30.5  Ethernet0/0

R5# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.4    1   FULL/BDR  00:00:38    30.30.30.4  Ethernet0/0

R1# show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID   Local Intrfce  Holdtme Capability Platform  Port ID

R6           Eth 0/0       158        R       7206VXR   Eth 0/0

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

- show l2tun tunnel all - Um den aktuellen Status einer L2TPv3-Sitzung anzuzeigen und Informationen über aktuell konfigurierte Sitzungen anzuzeigen, einschließlich lokaler und Remote-L2TP-Hostnamen, aggregierte Paketanzahl und L2TP-Steuerungskanäle, verwenden Sie den Befehl show l2tun tunnel all im EXEC-Modus.

R2# show l2tun tunnel all

Tunnel Information Total tunnels 3 sessions 3

Tunnel id 54217 is up, remote id is 44186, 1 active sessions

Tunnel state is established, time since change 00:12:07

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.6, port 0

Local tunnel name is R2

Internet Address 2.2.2.1, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

88 packets sent, 87 received

10086 bytes sent, 11092 received

Control Ns 76, Nr 74

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 0, ZLB ACKs sent 72

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 44186 is up, remote id is 54217, 1 active sessions

Tunnel state is established, time since change 00:12:08

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.1, port 0

Local tunnel name is R2

Internet Address 2.2.2.6, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

87 packets sent, 88 received

11092 bytes sent, 10086 received

Control Ns 74, Nr 76

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs sent 74

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 24124 is up, remote id is 48735, 1 active sessions

Tunnel state is established, time since change 00:11:00

Tunnel transport is IP (115)

Remote tunnel name is R3

Internet Address 3.3.3.3, port 0

Local tunnel name is R2

Internet Address 2.2.2.2, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

155 packets sent, 158 received

15230 bytes sent, 17586 received

Control Ns 69, Nr 67

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 1, ZLB ACKs sent 65

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

R3# show l2tun tunnel all

Tunnel Information Total tunnels 1 sessions 1

Tunnel id 48735 is up, remote id is 24124, 1 active sessions

Tunnel state is established, time since change 00:12:36

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.2, port 0

Local tunnel name is R3

Internet Address 3.3.3.3, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R3signal

180 packets sent, 176 received

19766 bytes sent, 17316 received

Control Ns 77, Nr 79

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 1, ZLB ACKs sent 78

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

- show l2tun session all - Um den aktuellen Status einer Layer-2-Sitzung anzuzeigen und Protokollinformationen über einen L2TPv3-Steuerkanal anzuzeigen, verwenden Sie den Befehl show l2tun session all im EXEC-Modus.

R2# show l2tun session all

Session Information Total tunnels 3 sessions 3

Session id 19996 is up, tunnel id 54217

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.6

Session is L2TP signalled

Session state is established, time since change 00:15:37

112 Packets sent, 111 received

12309 Bytes sent, 13312 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet0/0

Circuit state is UP

Remote session id is 19999, remote tunnel id 44186

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

remote cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 19999 is up, tunnel id 44186

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.1

Session is L2TP signalled

Session state is established, time since change 00:15:38

111 Packets sent, 112 received

13312 Bytes sent, 12309 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet3/0

Circuit state is UP

Remote session id is 19996, remote tunnel id 54217

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

remote cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 20005 is up, tunnel id 24124

Call serial number is 1492400002

Remote tunnel name is R3

Internet address is 3.3.3.3

Session is L2TP signalled

Session state is established, time since change 00:14:29

200 Packets sent, 204 received

19650 Bytes sent, 22100 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet2/0

Circuit state is UP

Remote session id is 17834, remote tunnel id 48735

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

remote cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

R3# show l2tun session all

Session Information Total tunnels 1 sessions 1

Session id 17834 is up, tunnel id 48735

Call serial number is 1492400002

Remote tunnel name is R2

Internet address is 2.2.2.2

Session is L2TP signalled

Session state is established, time since change 00:23:53

327 Packets sent, 322 received

33758 Bytes sent, 31248 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet1/0

Circuit state is UP

Remote session id is 20005, remote tunnel id 24124

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

remote cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Sie können das Bug Tool Kit (nur registrierte Kunden) für weitere Informationen zu diesen L2TPv3 Feature-Bugs verwenden:

- CSCdz01467 (nur registrierte Kunden) —Behoben (R) L2TPv3: Der Tunnelpaketzähler zeigt eine ungenaue Anzahl an.

- CSCeb56061 (nur registrierte Kunden) - Behoben (R) L2TPv3: L2TPv3oETH generiert Zombie-Tunnel.

- CSCeb35497 (nur registrierte Kunden) - Auflösende (R) L2TPv3-Sequenzierung: Tx Seqnum wird nach 16777215 nicht in 1 umbrochen.

- CSCdz48481 (nur registrierte Kunden) - Die aufgelöste (R) L2TPv3-Hairpinning-Konfiguration wird nicht mehr unterstützt.

- CSCec00463 (nur registrierte Kunden) —Behoben (R) L2TPv3: Deaktivierungsfehler im Gig-Ethernet-Port-Modus

- CSCec44356 (nur registrierte Kunden) —Resolved (R) C10720: Die 802.1P-Übereinstimmung in L2TPv3-Hairpinning ist beschädigt.

Zugehörige Informationen

- Support-Seite für IP Routed Protocols

- Support-Seite für IP-Routing

- Technischer Support - Cisco Systems