Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konfigurieren

Netzwerkdiagramm

Konfiguration

R1

R2

R3

Methode 1. Standard-Routing und -Neuverteilung verwenden

Überprüfen

Methode 2. Summary-Adresse verwenden

Überprüfen

Fehlerbehebung

Einführung

In diesen Dokumenten wird beschrieben, wie Standardrouten im Enhanced Interior Gateway Routing Protocol (EIGRP) konfiguriert werden.

Voraussetzungen

Anforderungen

Cisco empfiehlt, EIGRP kennen zu lernen.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konfigurieren

Diese Methoden sind verfügbar, um die Standardroute in EIGRP anzukündigen, die in diesem Artikel erläutert wird:

1. Standard-Routing und Neuverteilung verwenden

2. Summary-Adresse verwenden

Netzwerkdiagramm

Konfiguration

Hier werden die Router R1, R2 und R3 mit EIGRP konfiguriert, und zwischen R3 und R4 wird kein EIGRP ausgeführt.

R1

!

router eigrp 1

network 192.168.12.0

!

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.12.0/24 is directly connected, FastEthernet0/0

D 192.168.23.0/24 [90/30720] via 192.168.12.2, 00:10:27, FastEthernet0/0

R2

!

router eigrp 1

network 192.168.12.0

network 192.168.23.0

!

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.12.0/24 is directly connected, FastEthernet0/0

C 192.168.23.0/24 is directly connected, FastEthernet0/1

R3

!

router eigrp 1

network 192.168.23.0

!

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

D 192.168.12.0/24

[90/28416] via 192.168.23.2, 00:05:16, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L 192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.34.0/24 is directly connected, Serial0/2/0

L 192.168.34.3/32 is directly connected, Serial0/2/0

Methode 1. Standard-Routing und -Neuverteilung verwenden

Diese Methode beschreibt, wie die Standardroute in EIGRP mithilfe der statischen Standardroute angekündigt wird:

R3(config)#ip route 0.0.0.0 0.0.0.0 192.168.34.4

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is 192.168.34.4 to network 0.0.0.0

S*    0.0.0.0/0 [1/0] via 192.168.34.4

D     192.168.12.0/24

[90/28416] via 192.168.23.2, 00:59:18, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L        192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.34.0/24 is directly connected, Serial0/2/0

L        192.168.34.3/32 is directly connected, Serial0/2/0

Hinweis: In dieser Situation kann eine Netzwerk-Anweisung nicht innerhalb von EIGRP verwendet werden, um 0.0.0.0 anzukündigen, da sie nicht direkt verbunden ist.

Die Neuverteilung der statischen Route erfolgt unter EIGRP, wie hier gezeigt:

R3(config)#router eigrp 1

R3(config-router)#redistribute static metric 100000 1000 255 1 1500

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.12.2 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

D    192.168.23.0/24 [90/30720] via 192.168.12.2, 00:14:01, FastEthernet0/0

D*EX 0.0.0.0/0 [170/286720] via 192.168.12.2, 00:00:39, FastEthernet0/0

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.23.3 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

C    192.168.23.0/24 is directly connected, FastEthernet0/1

D*EX 0.0.0.0/0 [170/284160] via 192.168.23.3, 00:04:44, FastEthernet0/1

Methode 2. Summary-Adresse verwenden

Diese Methode verwendet die Summierungsregel für EIGRP, wie im Bild gezeigt.

!

R3(config)#interface gigabitEthernet 0/0/1

R3(config-if)#ip summary-address eigrp 1 0.0.0.0 0.0.0.0

!

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

D*    0.0.0.0/0 is a summary, 00:00:06, Null0

D     192.168.12.0/24

[90/28416] via 192.168.23.2, 00:15:54, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L        192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.34.0/24 is directly connected, Serial0/2/0

L        192.168.34.3/32 is directly connected, Serial0/2/0

Die Routing-Tabelle R1 und R2 zeigt nun eine vom EIGRP erhaltene Standardroute:

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.12.2 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

D    192.168.23.0/24 [90/30720] via 192.168.12.2, 00:17:50, FastEthernet0/0

D*   0.0.0.0/0 [90/30976] via 192.168.12.2, 00:01:30, FastEthernet0/0

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.23.3 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

C    192.168.23.0/24 is directly connected, FastEthernet0/1

D*   0.0.0.0/0 [90/28416] via 192.168.23.3, 00:03:50, FastEthernet0/1

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.