Inhalt

Einführung

Voraussetzungen

Hardware- und Softwareversionen

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Befehle anzeigen

Zugehörige Informationen

Einführung

In diesem Dokument wird beschrieben, wie Failover mit EIGRP (Enhanced Interior Gateway Routing Protocol) mithilfe von VRF (Virtual Routing and Forwarding) konfiguriert wird. VRF ist eine Erweiterung von IP-Routing, die mehrere Routing-Instanzen bereitstellt. Internet Service Provider (ISPs) nutzen diese VRF-Instanz, um separate Virtual Private Networks (VPNs) für Kunden zu erstellen, da es ermöglicht, dass mehrere Instanzen der Routing-Tabelle in einem Router vorhanden sind.

Voraussetzungen

- Grundkenntnisse des EIGRP

- Grundkenntnisse der VRF-Instanzen

Hardware- und Softwareversionen

Die Konfigurationen in diesem Dokument basieren auf dem Cisco Router der Serie 3700 in der Cisco IOS® Softwareversion 12.4 (15)T 13.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Beispiel wird Router R1 als PE-Router betrachtet. Router R2 und R3 gelten als CE-Router. Die Router kommunizieren über EIGRP miteinander. Wenn R2 die Verbindung mit R1 verliert (d. h. bei einem Failover), können die Routen R1 bis R3 erreichen. Die Router R2 und R3 haben eine MPLS-Verbindung.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Router R1

- Router R2

- Router R3

Router R1

!

version 12.4

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.2 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip address 57.35.169.2 255.255.255.0

duplex auto

speed auto

!

router eigrp 220

network 2.2.2.2 0.0.0.0

network 57.35.169.2 0.0.0.0

network 192.168.1.0

no auto-summary

!--- Configured EIGRP and advertised the networks.

!

end

Router R2

!

version 12.4

!

hostname R2

!

ip cef

!

ip vrf A

!--- Configures VRF routing table!

rd 1.1.1.1:111

!---Configuring a route distinguisher RD creates routing and forwarding table for a VRF. The RD can be used in either of these formats: - 16-bit AS number: Your 32-bit number (for example, 1:100) - 32-bit IP address: Your 16-bit number (In our case, 1.1.1.1:111)

route-target export 1.1.1.1:111

route-target import 1.1.1.1:111

!--- Creates a list of import and/or export route target communities for the specified VRF.

!

ip vrf B

rd 2.2.2.2:222

import ipv4 unicast map vrfA-to-vrfB

!--- Associates the specified route map with the VRF.

route-target export 2.2.2.2:222

route-target import 2.2.2.2:222

!

mpls label protocol ldp

!

interface Loopback1

ip vrf forwarding B

!--- Associates a VRF instance with an interface.

ip address 172.16.2.1 255.255.255.255

!

interface FastEthernet0/0

ip vrf forwarding A

ip address 192.168.1.1 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip vrf forwarding A

ip address 10.0.0.1 255.255.255.0

duplex auto

speed auto

mpls ip

!

interface FastEthernet1/0

ip vrf forwarding B

ip address 203.197.194.1 255.255.255.0

duplex auto

speed auto

!

router eigrp 1

no auto-summary

!

address-family ipv4 vrf B

!--- Enter address family configuration mode for configuring EIGRP routing sessions.

network 172.16.2.0 0.0.0.255

network 203.197.194.0

no auto-summary

autonomous-system 330

!--- Defines the autonomous system number for this specific instance of EIGRP.

exit-address-family

!

address-family ipv4 vrf A

network 10.0.0.1 0.0.0.0

network 192.168.1.0

no auto-summary

autonomous-system 220

exit-address-family

!

access-list 99 permit 172.16.1.0 0.0.0.255

access-list 99 permit 192.168.1.0 0.0.0.255

access-list 101 permit udp host 192.168.1.1 eq bootps host 1.1.1.1 eq bootps

!--- Create access list in order to permit the host addresses.

!

route-map vrfA-to-vrfB permit 10

match ip address 99

!--- Created a route map and distributed the routes permitted by access list 99.

!

end

Router R3

!

version 12.4

!

hostname R3

!

ip cef

!

!

!

!

ip vrf A

rd 1.1.1.1:111

!

mpls label protocol ldp

!

interface Loopback1

ip address 1.1.1.1 255.255.255.255

!

interface FastEthernet0/0

ip vrf forwarding A

ip address 10.0.0.2 255.255.255.0

duplex auto

speed auto

mpls ip

!

interface FastEthernet0/1

ip vrf forwarding A

ip address 57.35.169.1 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet1/0

ip address 203.197.194.2 255.255.255.0

duplex auto

speed auto

!

router eigrp 330

network 1.1.1.1 0.0.0.0

network 10.0.0.2 0.0.0.0

network 57.35.169.1 0.0.0.0

network 203.197.194.0

no auto-summary

!

address-family ipv4 vrf A

network 10.0.0.2 0.0.0.0

network 57.35.169.1 0.0.0.0

no auto-summary

autonomous-system 220

exit-address-family

!

end

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Befehle anzeigen

Um zu überprüfen, ob EIGRP korrekt konfiguriert ist, verwenden Sie den Befehl show ip route vrf.

show ip route vrf

In Router R2
R2#show ip route vrf A

Routing Table: A

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

2.0.0.0/32 is subnetted, 1 subnets

D       2.2.2.2 [90/409600] via 192.168.1.2, 00:15:47, FastEthernet0/0

57.0.0.0/24 is subnetted, 1 subnets

D       57.35.169.0 [90/307200] via 192.168.1.2, 00:15:47, FastEthernet0/0

[90/307200] via 10.0.0.2, 00:15:47, FastEthernet0/1

10.0.0.0/24 is subnetted, 1 subnets

C       10.0.0.0 is directly connected, FastEthernet0/1

C    192.168.1.0/24 is directly connected, FastEthernet0/0

In Router R3

R3#show ip route vrf A

Routing Table: A

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

2.0.0.0/32 is subnetted, 1 subnets

D       2.2.2.2 [90/409600] via 57.35.169.2, 00:16:59, FastEthernet0/1

57.0.0.0/24 is subnetted, 1 subnets

C       57.35.169.0 is directly connected, FastEthernet0/1

10.0.0.0/24 is subnetted, 1 subnets

C       10.0.0.0 is directly connected, FastEthernet0/0

D    192.168.1.0/24 [90/307200] via 57.35.169.2, 00:17:02, FastEthernet0/1

[90/307200] via 10.0.0.1, 00:17:02, FastEthernet0/0

!--- Displays the routing table associated with VRF instance A.

Wenn R2 die Verbindung zu R1 verliert, erreichen die Routen von R2 den Router R1 bis R3.

Bei Failover

Wenn R2 seine Verbindung zu R1 verliert, versuchen Sie, die Ausgabe herunterzufahren auf Fa0/0 des R2. In Router R2
R2#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

R2(config)#int fa0/0

R2(config-if)#shut down

R2(config-if)#

*Mar  1 00:01:01.539: %TDP-5-INFO: VRF A: TDP ID removed

*Mar  1 00:01:01.675: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 57.35.169.1:0 (1) is

DOWN (LDP Router ID changed)

*Mar  1 00:01:01.679: %DUAL-5-NBRCHANGE: IP-EIGRP(1) 220: Neighbor 192.168.1.2

(FastEthernet0/0) is down: interface down

R2(config-if)#

*Mar  1 00:01:03.519: %LINK-5-CHANGED: Interface FastEthernet0/0, changed state

to administratively down

*Mar  1 00:01:04.519: %LINEPROTO-5-UPDOWN: Line protocol on Interface

FastEthernet0/0, changed state to down

Bei derselben Instanz im Router R3 wird die Failover-Verbindung aktiviert.
R3#

*Mar  1 00:00:52.527: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 192.168.1.1:0 (1) is

DOWN (TCP connection closed by peer)

R3#

*Mar  1 00:00:59.591: %LDP-5-NBRCHG: LDP Neighbor (vrf A) 10.0.0.1:0 (1) is UP

Um zu überprüfen, ob der Router R2 immer noch R1 erreichen kann, führen Sie den Befehl ping vrf aus, um R1 vom Router R2 zu pingen.

Ping

In Router R2
R2#ping vrf A 192.168.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/51/96 ms

!--- R2 can still reach R1 through R3.

Zugehörige Informationen

- VRF-kompatible Services

- EIGRP-Support-Seite

- Technischer Support und Dokumentation - Cisco Systems