Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

FED-CPU-Paketerfassung konfigurieren

Einfaches Konfigurationsbeispiel

Ändern der Paketerfassung

Lineare Paketerfassung

Zirkuläre Paketerfassung

Anzeige- und Erfassungsfilterung

Anzeigefilterung

Erfassungsfilterung

Sortieren nach Top Talker (17.6.X)

Zugehörige Informationen

Einleitung

In diesem Dokument wird die Verwendung des FED-Tools (Forwarding Engine Driver) zur CPU-Erfassung beschrieben.

Voraussetzungen

Anforderungen

Es gibt keine spezifischen Anforderungen für dieses Dokument.

Verwendete Komponenten

Dieses Dokument ist auf Catalyst Switching-Plattformen mit Cisco IOS 16.X und höher beschränkt.

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle verstehen.

Hintergrundinformationen

Das FED-Tool zur CPU-Paketerfassung hilft bei der Identifizierung von Daten, die die Kontrollebene passieren, und liefert Informationen über unterbrochenen Datenverkehr (Pakete von ASIC zu CPU) oder injizierten (Pakete von CPU zu ASIC).

- Dieses Tool ist beispielsweise hilfreich, um Datenverkehr zu identifizieren, der die Aktivierung von CoPP (Control-Plane Policer) ausgelöst hat, sodass gültiger Datenverkehr verworfen wird, um die CPU zu schützen.

Terminologie

- Forwarding Engine Driver (FED): Verantwortlich für die Übernahme von Befehlen aus Cisco IOS-XE und die Programmierung von Hardware-ASICs. Dient als Brücke zwischen Software- und Hardwarekomponenten eines Catalyst Switches.

- Kontrollebene (CP):Sammlung von Funktionen und Datenverkehr, die die CPU des Catalyst Switches betreffen. Dies kann Datenverkehr wie Spanning Tree Protocol (STP), Hot Standby Router Protocol (HSRP) und Routing-Protokolle einschließen, die für den Switch bestimmt sind oder vom Switch gesendet werden.

- Datenebene (DP): Umfasst die ASICs und den Datenverkehr, der nicht über Software, sondern über Hardware weitergeleitet wird.

- Punt: Aktion eines Pakets, das von der Datenebene an die CPU gesendet wird.

- Inject (Einschleusen): Aktion eines Pakets, das von der CPU nach unten an die CPU gesendet wird

FED-CPU-Paketerfassung konfigurieren

Diese Tabelle für Konfigurationsoptionen verwenden

Definition

Konfiguration

Standardeinstellung der Paketerfassung für Punt oder Inject

debug plattform software fed switch active | inject> Paketerfassung <start | Stopp>

Erfasste Pakete anzeigen

show platform software fed switch active | inject> Paketerfassung <Kurzbeschreibung | Detail>

Definition der Puffergröße und des Erfassungstyps

debug plattform software fed switch active | inject> Paketerfassungspuffer [Zirkular] Grenze <#packets>

Erfassungsfilterung für angezeigte Pakete definieren

show platform software fed switch active | inject> Packet-Capture Display-Filter <filter>

- Filter können mit logischen && kombiniert werden. || und Klammern. Beispiel: "cdp || (ipv.src== 10.1.1.11 && tcp.port == 179) | | stp"

- Zusätzlich zur standardmäßigen, auf Netzwerk-Headern basierenden Filterung wurden einige plattformspezifische Filter hinzugefügt. Sie können auch mit Standardmischungen gemischt werden. Beispiel: ARP-Pakete, die von der physischen Schnittstelle mit der ID 0x44 empfangen wurden.

- Dies ist nicht Wireshark, daher werden nicht alle Wireshark-Filter unterstützt. Es steht ein Befehl display-filter-help zur Verfügung, um unterstützte Filter zu überprüfen.

Erfassungsstatus anzeigen

show platform software fed switch active | inject> Status der Paketerfassung

Einfaches Konfigurationsbeispiel

Dieses Tool erstellt einen Puffer für die Erfassung von bis zu 4096 (Standardeinstellung) gelochten oder injizierten Paketen, da es aktiviert wurde.

Cat9k#debug platform software fed switch active punt packet-capture start

Punt packet capturing started.

Cat9k#debug platform software fed switch active punt packet-capture stop

Punt packet capturing stopped. Captured 263 packet(s)

Cat9k#show platform software fed switch active punt packet-capture brief

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 263 packets. Capture capacity : 4096 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 18:15:53.499 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 2, Timestamp: 2020/04/10 18:15:53.574 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

Cat9k#show platform software fed switch active punt packet-capture detailed

F340.04.11-9300-1#$e fed switch active punt packet-capture detailed

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 263 packets. Capture capacity : 4096 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 18:15:53.499 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

Packet Data Hex-Dump (length: 68 bytes) :

084FA940FA56380E  4D774F668100C014  080045C00028CC8E  0000FF11DA5A0A0B

00030A0B0003C000  0EC90014B6BE0000  0000000000010009  6618000000000000

D54ADEEB

Doppler Frame Descriptor :

fdFormat                  = 0x4            systemTtl                 = 0xc

loadBalHash1              = 0x10           loadBalHash2              = 0x2

spanSessionMap            = 0              forwardingMode            = 0

destModIndex              = 0x1            skipIdIndex               = 0x38

srcGpn                    = 0x1            qosLabel                  = 0

srcCos                    = 0x4            ingressTranslatedVlan     = 0x5

bpdu                      = 0              spanHistory               = 0

sgt                       = 0              fpeFirstHeaderType        = 0

srcVlan                   = 0x14           rcpServiceId              = 0x3

wccpSkip                  = 0              srcPortLeIndex            = 0

cryptoProtocol            = 0              debugTagId                = 0

vrfId                     = 0              saIndex                   = 0

pendingAfdLabel           = 0              destClient                = 0xb

appId                     = 0              finalStationIndex         = 0

decryptSuccess            = 0              encryptSuccess            = 0

rcpMiscResults            = 0              stackedFdPresent          = 0

spanDirection             = 0              egressRedirect            = 0x1

redirectIndex             = 0              exceptionLabel            = 0x20

destGpn                   = 0x1            inlineFd                  = 0x1

suppressRefPtrUpdate      = 0              suppressRewriteSideEfects = 0

cmi2                      = 0x320          currentRi                 = 0x1

currentDi                 = 0              dropIpUnreachable         = 0

srcZoneId                 = 0              srcAsicId                 = 0

originalDi                = 0x5338         originalRi                = 0

srcL3IfIndex              = 0x2f           dstL3IfIndex              = 0x2f

dstVlan                   = 0              frameLength               = 0x44

fdCrc                     = 0x4c           tunnelSpokeId             = 0

isPtp                     = 0              ieee1588TimeStampValid    = 0

ieee1588TimeStamp55_48    = 0              lvxSourceRlocIpAddress    = 0

sgtCachingNeeded          = 0

Doppler Frame Descriptor Hex-Dump :

0000010044004C02  8004424C00000100  0000000040000100  0000230514000000

0000000000000030  0020000000000B00  380000532F000100  0000002F00000000

Um den aktuellen Status für die Erfassung zu validieren, können Sie den nächsten Befehl verwenden.

Cat9k#show platform software fed switch active punt packet-capture status

Punt packet capturing: enabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 110 packets. Capture capacity : 6000 packets

Ändern der Paketerfassung

Das Punt/Inject FED-Paketerfassungstool wurde verbessert, um eine Anpassung der Paketpuffergröße und des Pakettyps zu ermöglichen und lineare oder zirkuläre Paketerfassungen zu erstellen.

Cat9k#debug platform software fed switch active punt packet-capture buffer ?

circular  Circular capture

limit     Number of packets to capture

Lineare Paketerfassung

Die erste Option für die Pufferkonfiguration besteht darin, die Anzahl der Pakete zu begrenzen (die Standardgröße beträgt 4096 Pakete), die an den Puffer gesendet werden. Sobald die Puffergrößenbeschränkung erreicht ist, werden keine weiteren Pakete gesammelt (kein Buffer-Wrapping).

Cat9k#debug platform software fed switch active punt packet-capture buffer limit ?

<256-16384>  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer limit 5000

Punt PCAP buffer configure: one-time with buffer size 5000...done

Zirkuläre Paketerfassung

Die zweite Pufferkonfigurationsoption dient zum Festlegen eines zirkulären Puffers für Pakete (die Standardpuffergröße beträgt 4096 Pakete). Sobald die Grenze der zirkulären Puffergröße erreicht ist, werden alte Daten durch neue Daten im Puffer ersetzt (Buffer-Wrapping).

Cat9k#debug platform software fed switch active punt packet-capture buffer circular ?

limit  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer circular limit ?

<256-16384>  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer circular limit 6000

Punt PCAP buffer configure: circular with buffer size 6000...done

Die Paketerfassung kann dann mit den gleichen Parametern erneut ausgeführt werden.

Cat9k#debug platform software fed switch active punt packet-capture start

Punt packet capturing started.

Cat9k#show platform software fed switch active punt packet-capture status

Punt packet capturing: enabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 110 packets. Capture capacity : 6000 packets

Cat9k#debug platform software fed switch active punt packet-capture stop

Punt packet capturing stopped. Captured 426 packet(s)

Cat9k#show platform software fed switch active punt packet-capture brief

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 426 packets. Capture capacity : 6000 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 23:37:14.884 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 2, Timestamp: 2020/04/10 23:37:14.899 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

--snip--

Anzeige- und Erfassungsfilterung

Das Punt/Inject FED-Paketerfassungstool wurde erweitert, um Paketanzeige- und Filteroptionen zu ermöglichen.

Anzeigefilterung

Sobald eine Erfassung ohne Filter abgeschlossen wurde, kann sie überprüft werden, um nur die Informationen anzuzeigen, an denen Sie interessiert sind.

Cat9k#show platform software fed switch active punt packet-capture display-filter "ip.src== 10.11.0.0/24" brief

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 426 packets. Capture capacity : 6000 packets

------ Punt Packet Number: 2, Timestamp: 2020/04/10 23:37:14.899 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 4, Timestamp: 2020/04/10 23:37:15.023 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

Da es sich nicht um Wireshark handelt, werden nicht alle Wireshark-Filter unterstützt. Verwenden Sie den Befehl display-filter-help, um die verschiedenen verfügbaren Filteroptionen anzuzeigen.

Cat9k#show platform software fed switch active punt packet-capture display-filter-help

FED Punject specific filters :

1. fed.cause              FED punt or inject cause

2. fed.linktype           FED linktype

3. fed.pal_if_id          FED platform interface ID

4. fed.phy_if_id          FED physical interface ID

5. fed.queue              FED Doppler hardware queue

6. fed.subcause           FED punt or inject sub cause

Generic filters supported :

7. arp                    Is this an ARP packet

8. bootp                  DHCP packets [Macro]

9. cdp                    Is this a CDP packet

10. eth                    Does the packet have an Ethernet header

11. eth.addr               Ethernet source or destination MAC address

12. eth.dst                Ethernet destination MAC address

13. eth.ig                 IG bit of ethernet destination address (broadcast/multicast)

14. eth.src                Ethernet source MAC address

15. eth.type               Ethernet type

16. gre                    Is this a GRE packet

17. icmp                   Is this a ICMP packet

18. icmp.code              ICMP code

19. icmp.type              ICMP type

20. icmpv6                 Is this a ICMPv6 packet

21. icmpv6.code            ICMPv6 code

22. icmpv6.type            ICMPv6 type

23. ip                     Does the packet have an IPv4 header

24. ip.addr                IPv4 source or destination IP address

25. ip.dst                 IPv4 destination IP address

26. ip.flags.df            IPv4 dont fragment flag

27. ip.flags.mf            IPv4 more fragments flag

28. ip.frag_offset         IPv4 fragment offset

29. ip.proto               Protocol used in datagram

30. ip.src                 IPv4 source IP address

31. ip.ttl                 IPv4 time to live

32. ipv6                   Does the packet have an IPv4 header

33. ipv6.addr              IPv6 source or destination IP address

34. ipv6.dst               IPv6 destination IP address

35. ipv6.hlim              IPv6 hot limit

36. ipv6.nxt               IPv6 next header

37. ipv6.plen              IPv6 payload length

38. ipv6.src               IPv6 source IP address

39. stp                    Is this a STP packet

40. tcp                    Does the packet have a TCP header

41. tcp.dstport            TCP destination port

42. tcp.port               TCP source OR destination port

43. tcp.srcport            TCP source port

44. udp                    Does the packet have a UDP header

45. udp.dstport            UDP destination port

46. udp.port               UDP source OR destination port

47. udp.srcport            UDP source port

48. vlan.id                Vlan ID (dot1q or qinq only)

49. vxlan                  Is this a VXLAN packet

Erfassungsfilterung

Vor Beginn der Paketerfassung können Sie einen Filter definieren, der nur bestimmten Datenverkehr erfasst.

C9300#debug platform software fed switch active punt packet-capture set-filter "ip.src== 10.1.1.0/24 && tcp.port == 179"

Filter setup successful. Captured packets will be cleared

C9300#show platform software fed switch active punt packet-capture status

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 0 packets. Capture capacity : 6000 packets

Capture filter : "ip.src== 10.1.1.0/24 && tcp.port == 179"

C9300#debug platform software fed switch active punt packet-capture clear-filter

Filter cleared. Captured packets will be cleared

C9300#show platform software fed switch active punt packet-capture status

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 0 packets. Capture capacity : 6000 packets

Sortieren nach Top Talker (17.6.X)

Ab Version 17.6.1 können Sie die von Top Talkers erfassten Pakete anhand eines festgelegten Felds sortieren.

Switch#show platform software fed switch active punt packet-capture cpu-top-talker ?

cause-code          occurences of cause-code

dst_ipv4            occurrences on dst_ipv4

dst_ipv6            occurrences on dst_ipv4

dst_l4              occurences of L4 destination

dst_mac             Occurrences of dst_mac

eth_type            Occurrences of eth_type

incoming-interface  occurences of incoming-interface

ipv6_hoplt          occurences of hoplt

protocol            occurences of layer4 protocol

src_dst_port        occurences of layer4 src_dst_port

src_ipv4            occurrences on src_ipv4

src_ipv6            occurrences on src_ipv6

src_l4              occurences of L4 source

src_mac             Occurrences of src_mac

summary             occurences of all in summary

ttl                 occurrences on ttl

vlan                Occurrences of vlan

Switch#show platform software fed switch active punt packet-capture cpu-top-talker dst_mac

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 224 packets. Capture capacity : 4096 packets

Sr.no.  Value/Key       Occurrence

1       01:80:c2:00:00:00       203

2       01:00:0c:cc:cc:cc       21

Switch#show platform software fed switch active punt packet-capture cpu-top-talker summary

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 224 packets. Capture capacity : 4096 packets

L2 Top Talkers:

224     Source mac      00:27:90:be:20:84

203     Dest mac        01:80:c2:00:00:00

L3 Top Talkers:

L4 Top Talkers:

Internal Top Talkers:

224     Interface       FortyGigabitEthernet2/1/2

224     CPU Queue       Layer2 control protocols

Zugehörige Informationen

Weitere Informationen zur CPU-Fehlerbehebung in Cat9K-Plattformen finden Sie unter:

Fehlerbehebung bei hoher CPU-Auslastung auf Catalyst Switch-Plattformen mit Cisco IOS-XE 16.x

Zusätzliche Lektüre

- Cisco IOS-XE 16 - Informationen auf einen Blick

- Catalyst Switches der 3850-Serie – Fehlerbehebung bei hoher CPU-Auslastung

- Integrierte Paketerfassung für Cisco IOS und Cisco IOS-XE - Konfigurationsbeispiel

- Technischer Support und Dokumentation für Cisco Systeme