Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Topologie

Problem

Upgrade-Verfahren

Einleitung

Dieses Dokument beschreibt Schritt für Schritt, wie die CPLD-Version (Complex Programmable Logic Device) auf einer Catalyst 9400 StackWise Virtual Link (SVL)-Konfiguration aktualisiert wird.

Voraussetzungen

Anforderungen

Cisco empfiehlt, dass Sie über Grundkenntnisse der StackWise-Virtual-Einrichtung und -Konfiguration auf Catalyst 9400 verfügen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf der PID: C9404R-Software- und -Hardwareversionen.

Module:

C9400-SUP-1XL

C940-LC-24XS

SW-Version: 17.09.4a

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle kennen.

Topologie

Problem

Während eines Upgrades der Cisco IOS®-Version auf Catalyst 9400 wird in seltenen Fällen die CPLD-Version des Geräts nicht aktualisiert. Die CPLD- und die Rommon-Version für die jeweilige Version können Sie über den Link https://www.cisco.com/c/en/us/td/docs/switches/lan/catalyst9400/software/release/17-13/release_notes/ol-17-13-9400/rommon_versions.html überprüfen.

Verweisen Sie auf diesen Ausschnitt:

9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:05:00

1/0       C9400-LC-24XS       ok                    00:00:56

2         C9400-SUP-1XL       ok                    00:05:00

2/0       C9400-SUP-1XL       ok                    00:00:53

R0                            ok, active            00:05:00

P1        C9400-PWR-3200AC    ok                    00:04:38

P9        C9404-FAN           ok                    00:04:37

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:04:57

1/0       C9400-LC-24XS       ok                    00:00:08

2         C9400-SUP-1XL       ok                    00:04:57

2/0       C9400-SUP-1XL       ok                    00:00:07

R0                            ok, standby           00:04:57

P1        C9400-PWR-3200AC    ok                    00:04:35

P9        C9404-FAN           ok                    00:04:33

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

2         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

In diesem Fall wurde das CPLD des Standby-Geräts nach dem Upgrade nicht aktualisiert.

Upgrade-Verfahren

Schritt 1: Verwenden Sie show redundacny , um zu überprüfen, ob der SVL einwandfrei funktioniert.

9400-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = Switch 1

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Peer Processor Information :

----------------------------

Standby Location = Switch 2 >>>>>>>>>>Switch 2 is standby

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Schritt 2: Um die CPLD-Version zu aktualisieren, verwenden Sie den folgenden Befehl:

upgrade hw-programmable cpld filename bootflash: switch {1-2} RP active

9400-1#upgrade hw-programmable cpld filename bootflash: switch 2 R0

Firmware upgrade requires the SVL member to reload. Do you want to proceed?(y/n)y

Use cli 'redundancy reload peer' to upgrade the firmware on peer

9400-1#redundancy reload peer

Stack is in Half ring setup; Reloading a switch might cause stack split

Reload peer [confirm]

Preparing to reload peer

Schritt 3: Hier können Sie sehen, dass CPLD aktualisiert wird:

Chassis 2 reloading, reason - Admin reload CLI

May 4 01:34:23.829: %PMAN-5-EXITACTION: R0/0: pvp:

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Current ROMMON image : Primary

Last reset cause : SoftwareResetTrig

C9400-SUP-1XL platform with 16777216 Kbytes of main memory

Starting System FPGA Upgrade .....

Programming SPI Primary image is completed.

Authenticating SPI Primary image .....

IO FPGA image is authenticated successfully.

Programming Header .....

FPGA HDR file size: 12

Image page count: 1

Verifying programmed header .....

Verifying programmed header .....

Programmed header is verified successfully.

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Power Cycle is needed to complete System firmware upgrade.

It takes ~7 mins to upgrade firmwre after power cycle starts.

DO NOT DISRUPT AFTER POWER C

Initializing Hardware......

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Schritt 4: Vergewissern Sie sich, ob das CPLD im Standby-Modus aktualisiert wird:

F241.24.02-9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:38

1/0       C9400-LC-24XS       ok                    00:25:34

2         C9400-SUP-1XL       ok                    00:29:38

2/0       C9400-SUP-1XL       ok                    00:25:31

R0                            ok, active            00:29:38

P1        C9400-PWR-3200AC    ok                    00:29:16

P9        C9404-FAN           ok                    00:29:14

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:35

1/0       C9400-LC-24XS       ok                    00:00:11

2         C9400-SUP-1XL       ok                    00:29:35

2/0       C9400-SUP-1XL       ok                    00:00:10

R0                            ok, standby           00:29:35

P1        C9400-PWR-3200AC    ok                    00:29:13

P9        C9404-FAN           ok                    00:29:11

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

2 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

Schritt 5: Falls ein Upgrade der CPLD-Version des Active Switch erforderlich ist, müssen Sie die folgenden Schritte durchführen:

1. Do a switchover

9400-1#redundency force-switchover                             >>>>>>>>>>Initially Switch 1 is active and Switch 2 is standby.

After switchover it is vise-versa

2. Upgrade the CPLD version of previous active [now standby] with the command:

9400-1#upgrade hw-programmable cpld filename bootflash: switch 1 R0

3. Reload the the standby

9400-1#redundancy reload peer