Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Zugehörige Informationen

Einführung

Ziel dieses Dokuments ist es, eine ISDN Basic Rate Interface (BRI) zu konfigurieren, um im Falle eines logischen Ausfalls der Frame Relay Circuit den Datenverkehr zu einem Remote-Standort zu wählen und zu übertragen.

Das Enhanced Interior Gateway Routing Protocol (EIGRP) wird auf den BRIs nicht ausgeführt. Stattdessen wird in diesem Dokument für die Umleitung des Datenverkehrs über die BRI Floating-Schnittstelle nur dann empfohlen, wenn die über die Frame-Relay-Schaltung über EIGRP empfangenen normalen Routen verloren gehen.

Stellen Sie bei allen Routern sicher, dass ip class aktiviert ist.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions.

Konfigurieren

Diese Konfigurationen sind Ausschnitte der vollständigen Konfigurationen.

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Abbildung 1: Netzwerkdiagramm

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- Distribution Layer-Router 1

- Distribution Layer-2-Router

- Access-Layer-Router

- Remote-Standort-Router

Router C194u ist einer der beiden Distribution-Layer-Router. In diesem Beispiel verfügt der Router C194u über eine BRI für den Remote-Standort. Der andere Distribution Layer-Router, C194n, verfügt über die serielle Schnittstelle zur Remote-Site.

Distribution Layer-Router 1

hostname c194u

!

!--- Create a username for the router at the remote site.

username c194s password 7 XXXXXXXX

!

ip subnet-zero

isdn switch-type basic-dms100

!

interface Loopback0

ip address 192.168.11.141 255.255.255.252

!

interface Ethernet0

ip address 163.241.222.93 255.255.255.0

media-type 10BaseT

!

interface BRI0

description to Remote Site c194s, (this end 08358662 08358664)

ip address 192.168.11.138 255.255.255.252

no ip mroute-cache

encapsulation ppp

no ip route-cache

isdn spid1 0835866201

isdn spid2 0835866401

dialer idle-timeout 600

dialer wait-for-carrier-time 10

dialer map ip 192.168.11.137 name c194s broadcast 8358661

dialer map ip 192.168.11.137 name c194s broadcast 8358663

dialer hold-queue 5

dialer load-threshold 128  outbound

dialer-group 1

no fair-queue

ppp authentication chap

ppp multilink

!

router eigrp 65535

!--- We redistribute the static routes listed below, so if the Frame Relay !--- network fails, the other routers in this autonomous system (AS) will !--- begin to see the remote networks advertised from this router. !--- Normally these routes are learned through EIGRP across the Frame Relay link. !--- Make the BRI interfaces passive. An alternative is to use a dialer-list !--- to identify EIGRP packets as "uninteresting" packets.

redistribute static

passive-interface BRI0

network 192.168.11.0

network 163.241.0.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!--- Both distribution layer routers have a default route to their Null !--- interfaces so that they advertise the 0/0 network to all other routers !--- in the AS.

ip route 0.0.0.0 0.0.0.0 Null0

!--- There must be a static route for each network behind the C194s !--- router at the remote site. Use the IP address of the BRI interface !--- of router C194s, and ensure that the administrative distance is 240. !--- Note: Summarize these routes if your addressing scheme lends itself !--- to summarization. If the Frame Relay network fails, this will force !--- packets destined to the remote site out the BRI interface, and will cause !--- it to dial and restore connectivity.

ip route 192.168.11.0 255.255.255.224 192.168.11.137 240

ip route 192.168.11.32 255.255.255.224 192.168.11.137 240

ip route 192.168.11.64 255.255.255.224 192.168.11.137 240

ip route 192.168.11.132 255.255.255.252 192.168.11.137 240

!

access-list 100 deny   icmp any any

access-list 100 permit ip any any

dialer-list 1 protocol ip list 100

!

end

Im Folgenden finden Sie eine Beispiel-Ausgabe des Befehls show dialer für Router C194u:

Distribution Layer-Router 1

c194u#show dialer

BRI0 - dialer type = ISDN

Dial String      Successes   Failures    Last called   Last status

8358663                  4       1311    01:32:08           failed

8358661               1874       1315    00:02:07       successful

0 incoming call(s) have been screened.

BRI0:1 - dialer type = ISDN

Idle timer (600 secs), Fast idle timer (20 secs)

Wait for carrier (5 secs), Re-enable (15 secs)

Dialer state is physical layer up

Dial reason: ip (s=192.168.11.138, d=192.168.11.137)

Der nächste Router, C194n, ist aus diesem Grund der zweite Distribution Layer-Router. In dieser Abbildung ist dies der Frame-Link-Router. Es verfügt über keine spezielle Konfiguration. Es wird nur die Standardroute auf EIGRP neu verteilt.

Distribution Layer-2-Router

hostname c194n

!

!

interface Ethernet0

ip address 163.241.222.98 255.255.255.0

!

interface Serial1

no ip address

bandwidth 1544

no ip mroute-cache

encapsulation frame-relay

no fair-queue

!

interface Serial1.301 point-to-point

ip address 192.168.11.130 255.255.255.252

bandwidth 32

frame-relay interface-dlci 301

!

router eigrp 65535

redistribute static

network 192.168.11.0

network 163.241.0.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

ip route 0.0.0.0 0.0.0.0 Null0

!

Der nächste Router, C194, ist der Router am Remote-Standort, der Access-Layer-Router. Es verbindet das Remote-Netzwerk über den Distribution Layer-Router mit dem Backbone.

Access-Layer-Router

!

hostname c194s

!

!--- Create a username for the distribution layer router.

username c194u password 7 XXXXXXXXX

!

isdn switch-type basic-dms100

!

interface Loopback0

ip address 192.168.11.133 255.255.255.252

!

interface Ethernet0

ip address 192.168.11.2 255.255.255.224

!

interface Serial0

no ip address

bandwidth 64

encapsulation frame-relay

!

interface Serial0.300 point-to-point

ip address 192.168.11.129 255.255.255.252

bandwidth 32

frame-relay interface-dlci 300

!

interface BRI0

description to Hub Site c194u, (this end 08358661 08358663)

ip address 192.168.11.137 255.255.255.252

no ip mroute-cache

encapsulation ppp

no ip route-cache

isdn spid1 0835866101

isdn spid2 0835866301

dialer idle-timeout 600

dialer wait-for-carrier-time 10

dialer map ip 192.168.11.138 name c194u broadcast 8358662

dialer map ip 192.168.11.138 name c194u broadcast 8358664

dialer hold-queue 5

dialer load-threshold 128

dialer-group 1

no fair-queue

ppp multilink

ppp authentication chap

!

router eigrp 65535

!--- Redistribute the static route, so any routers which you could have attached !--- to the Ethernet network 192.168.11.0/27 will see this router as their way !--- out to the remainder of the network. However, do not allow this default !--- route back into your distribution layer routers. Use a distribute list !--- to block the advertisement.

redistribute static

passive-interface BRI0

network 192.168.11.0

default-metric 64 200 255 1 1500

distribute-list 2 out Serial0.300

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!--- Use the IP address of the BRI interface of the distribution layer router to !--- Add a default route. When the frame network goes down, this will !--- push your traffic out the BRI interface, and cause it to dial and !--- restore connectivity.

ip route 0.0.0.0 0.0.0.0 192.168.11.138 240

!

access-list 1 permit any

!

access-list 2 deny   0.0.0.0

access-list 2 permit any

!

dialer-list 1 protocol ip list 1

!

end

!

Der nächste Router repräsentiert das Netzwerk des Remote-Standorts. Hier sind keine besonderen Anforderungen zu stellen, außer an der Teilnahme am dynamischen IGP-Routing-Protokoll EIGRP des Access-Layer-Routers.

Remote-Standort-Router

hostname c194ec

!

!

interface Loopback0

ip address 192.168.11.65 255.255.255.224

!

interface Ethernet0

ip address 192.168.11.1 255.255.255.224

!

interface Ethernet1

ip address 192.168.11.33 255.255.255.224

!

!

router eigrp 65535

network 192.168.11.0

default-metric 64 200 255 1 1500

no auto-summary

eigrp log-neighbor-changes

!

ip classless

!

end

Überprüfen

Dieser Abschnitt enthält Informationen, mit denen Sie überprüfen können, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

Wenn das Frame Relay-Netzwerk ausgefallen ist, versuchen Sie eine Traceroute vom Netzwerk am Remote-Standort. Basierend auf dem Netzwerkdiagramm (siehe Abbildung 1) ist die Ziel-IP-Adresse die Loopback-Schnittstelle des Hub-Standort-Routers.

c194ec#trace

Target IP address: 192.168.11.141

Source address: 192.168.11.65

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2  *  *  *

3  *  *

192.168.11.138 24 msec

Beachten Sie, dass mehrere Pakete erforderlich sind, um die BRI-Schnittstelle zu aktivieren. Führen Sie den Befehl traceroute erneut aus, bevor der BRI inaktiv wird und Pakete verloren gehen:

c194ec#traceroute 192.168.11.141

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2 192.168.11.138 20 msec *  20 msec

Stellen Sie den Frame-Switch wieder hoch. Wenn das Frame Relay-Netzwerk jetzt betriebsbereit ist, verwenden Sie ISDN nicht:

c194ec#traceroute 192.168.11.141

Tracing the route to 192.168.11.141

1 192.168.11.2 4 msec 4 msec 4 msec

2 192.168.11.130 36 msec 36 msec 32 msec

3 163.241.222.93 36 msec *  32 msec

Die Routing-Tabellen für das operative Frame-Relay-Netzwerk sind unten aufgeführt. Beachten Sie, wie einzelne Routen über EIGRP für Netzwerke am Hub-Standort erfasst werden. Es gibt auch eine Standardroute, die über EIGRP gelernt wurde.

c194ec#show ip route

Gateway of last resort is 192.168.11.2 to network 0.0.0.0

163.241.0.0 255.255.255.0 is subnetted, 1 subnets

D       163.241.222.0 [90/2221056] via 192.168.11.2, 00:02:09, Ethernet0

192.168.11.0 is variably subnetted, 7 subnets, 2 masks

C       192.168.11.64 255.255.255.224 is directly connected, Loopback0

C       192.168.11.32 255.255.255.224 is directly connected, Ethernet1

C       192.168.11.0 255.255.255.224 is directly connected, Ethernet0

D       192.168.11.128 255.255.255.252

[90/2195456] via 192.168.11.2, 00:02:13, Ethernet0

D       192.168.11.132 255.255.255.252

[90/409600] via 192.168.11.2, 01:23:14, Ethernet0

D       192.168.11.136 255.255.255.252

[90/40537600] via 192.168.11.2, 01:23:14, Ethernet0

D       192.168.11.140 255.255.255.252

[90/2349056] via 192.168.11.2, 00:02:10, Ethernet0

D*EX 0.0.0.0 0.0.0.0 [170/40614400] via 192.168.11.2, 00:02:10, Ethernet

Die Routing-Tabellen für den Fall, dass das Frame-Relay-Netzwerk ausgefallen ist, sind unten aufgeführt. Es gibt immer noch eine Standardroute, aber einige einzelne Routen von Netzwerken zurück am Hub-Standort gehen verloren. Da IP-Klassenlos aktiviert ist und Sie eine Standardroute haben, können Sie trotzdem überall im Netzwerk zugreifen.

c194ec#show ip route

Gateway of last resort is 192.168.11.2 to network 0.0.0.0

192.168.11.0 is variably subnetted, 5 subnets, 2 masks

C       192.168.11.64 255.255.255.224 is directly connected, Loopback0

C       192.168.11.32 255.255.255.224 is directly connected, Ethernet1

C       192.168.11.0 255.255.255.224 is directly connected, Ethernet0

D       192.168.11.132 255.255.255.252

[90/409600] via 192.168.11.2, 01:25:27, Ethernet0

D       192.168.11.136 255.255.255.252

[90/40537600] via 192.168.11.2, 01:25:27, Ethernet0

D*EX 0.0.0.0 0.0.0.0 [170/40076800] via 192.168.11.2, 00:00:15, Ethernet

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- Technischer Support - Cisco Systems