Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Hintergrundinformationen

Topologie

Überprüfung

Fehlerbehebung

Zugehörige Informationen

Einleitung

In diesem Dokument werden die Schritte zur Fehlerbehebung bei Virtual Router Redundancy Protocol Version 3 (VRRPv3) mit IPv6 auf dem Nexus 9000 beschrieben.

Voraussetzungen

Anforderungen

Cisco NX-OS® empfiehlt, dass Sie über Kenntnisse in den folgenden Bereichen verfügen:

- VRRP

- Ethanalyzer

- IPv6

- First Hop Redundancy Protocol (FHRP)

Verwendete Komponenten

Dieses Dokument ist auf bestimmte Hardware wie den Nexus 9000 beschränkt.

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle kennen.

Hintergrundinformationen

Die VRRP-Version 2 unterstützt nur die IPv4-Adressfamilie, die VRRP-Version 3 (VRRP3) hingegen sowohl IPv4- als auch IPv6-Adressfamilien. Unter NX-OS können VRRP und VRRPv3 nicht auf demselben Gerät aktiviert werden. Wenn die VRRP-Funktion auf dem Nexus-Switch bereits aktiviert ist, wird bei Aktivierung der VRRPv3-Funktion eine Fehlermeldung angezeigt, die besagt, dass VRRPv2 bereits aktiviert ist. Aus diesem Grund muss eine Migration von VRRP zu VRRPv3 durchgeführt werden, was sich nur minimal auf die Services auswirkt.

Topologie

Hinweis: Keine Virtual Port-Channel (VPC)-Umgebung.

Überprüfung

1) Überprüfen der Übereinstimmung der Konfiguration auf beiden Seiten

Switch 1:

Switch1# show run interface vlan 209

interface Vlan209

no shutdown

no ip redirects

ipv6 address X:X:X:X::70a/125

vrrpv3 1 address-family ipv6

priority 200

address X::X:X:X:297 primary

Switch1#

Switch 2:

Switch2# show run interface vlan 209

interface Vlan209

no shutdown

no ip redirects

ipv6 address X:X:X:X::70c/125

no ipv6 redirects

vrrpv3 1 address-family ipv6

address X::X:X:X:297 primary

Switch2#

2) Überprüfen Sie, ob die MAC-Adresstabelle richtig ausgefüllt wurde.

Switch 1:

Switch1# show mac address-table vlan 209

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link,

(T) - True, (F) - False, C - ControlPlane MAC, ~ - vsan

VLAN MAC Address Type age Secure NTFY Ports

---------+-----------------+--------+---------+------+----+------------------

G 209 0000.5e00.0201 static - F F sup-eth1(R)

G 209 689e.0baa.dea7 static - F F sup-eth1(R)

Switch1#

module-1# show hardware internal tah rmac

Instance : 0

====================================

Mac-Address Vlan Flag

------------------------------------

68:9e:0b:aa:de:a7 0 SYSTEM

00:00:5e:00:02:01 209 VRMAC

module-1#

Switch 2:

Switch2# show mac address-table vlan 209

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link,

(T) - True, (F) - False, C - ControlPlane MAC, ~ - vsan

VLAN MAC Address Type age Secure NTFY Ports

---------+-----------------+--------+---------+------+----+------------------

* 209 0000.5e00.0201 dynamic 0 F F Eth1/51

G 209 689e.0baa.de07 static - F F sup-eth1(R)

Switch2#

Switch2# show hardware mac address-table 1 address 0000.5e00.0201

FE | VLAN | MAC | Dynamic | Port |Location Index|

| | | | | |

---+------+---------------+---------+---------+--------------+

0 209 0000.5e00.0201 dynamic Eth1/51

Switch2#

module-1# show hardware internal tah rmac

Instance : 0

====================================

Mac-Address Vlan Flag

------------------------------------

68:9e:0b:aa:de:07 0 SYSTEM

module-1#

3) Überprüfen Sie den Status der Geräte, die der Gruppe angehören.

Switch 1:

Switch1# show vrrpv3 vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 15 hours 43 mins 44 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 813 msec)

Primary Down interval is unknown

Switch1#

Switch 2:

Switch2# show vrrpv3 vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is BACKUP

State duration 3 mins 57.928 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:dea7, priority is 200

Primary Advertisement interval is 1000 msec (learned)

Primary Down interval is 3609 msec (expires in 3422 msec)

Switch2#

Fehlerbehebung

Zerbrochenes Szenario.

1) Mit der Befehlsoption show vrpv3 brief werden die kurzen Informationen zur Gruppe angezeigt, z. B. Gruppennummer, Adressfamilie, Priorität, Freischaltung, Status, primäre Adresse und Gruppenadresse (die virtuelle Gruppen-IP). In diesem Beispiel und wie oben beschrieben, sind beide Switches primär, was nicht richtig ist.

Switch 1:

Switch1# show vrrpv3 brief

Interface Grp A-F Pri Time Own Pre State Primary addr/Group addr

Vlan209 1 IPv6 200 0 N Y Primary X::X:X:X:dea7(local) X::X:X:X:297

Switch1#

Switch 2:

Switch2# show vrrpv3 brief

Interface Grp A-F Pri Time Own Pre State Primary addr/Group addr

Vlan209 1 IPv6 100 0 N Y Primary X::X:X:X:de07(local) X::X:X:X:297

Switch2#

2) Der Befehl show vrpv3 detail zeigt zusätzliche Informationen an, z. B. gesendete und empfangene Meldungen für VRRPv3, virtuelle MAC-Adressen und andere Statistiken zu Fehlern und Übergangszuständen. So werden beispielsweise empfangene VRRPv3-Ankündigungen nicht inkrementiert.

Switch 1:

Switch1# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 47 mins 40 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 284 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 57138 (errors 2) - rcvd 177       <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 4 (Last change Thu Apr 11 01:01:46.418 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 01:01:49.637 UTC)

Primary to backup: 0

Primary to init: 3 (Last change Thu Apr 11 00:57:37.107 UTC)

Backup to init: 0

Switch1#

Switch1# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 51 mins 29 secs

Virtual IP address is fX::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 667 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 57393 (errors 2) - rcvd 177         <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 4 (Last change Thu Apr 11 01:01:46.418 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 01:01:49.637 UTC)

Primary to backup: 0

Primary to init: 3 (Last change Thu Apr 11 00:57:37.107 UTC)

Backup to init: 0

Switch1#

Switch 2:

Switch2# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 51 mins 49 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:de07 (local), priority is 100

Primary Advertisement interval is 1000 msec (expires in 412 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 51764 (errors 0) - rcvd 6032          <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 1 (Last change Wed Apr 10 23:21:09.604 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 00:57:40.229 UTC)

Primary to backup: 3 (Last change Thu Apr 11 00:54:11.758 UTC)

Primary to init: 0

Backup to init: 0

Switch2#

Switch2# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 55 mins 38 secs

Virtual IP address is fX::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:de07 (local), priority is 100

Primary Advertisement interval is 1000 msec (expires in 479 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 52019 (errors 0) - rcvd 6032       <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 1 (Last change Wed Apr 10 23:21:09.604 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 00:57:40.229 UTC)

Primary to backup: 3 (Last change Thu Apr 11 00:54:11.758 UTC)

Primary to init: 0

Backup to init: 0

Switch2#

3) Der Befehl show vrrpv3 internal event-history debugs zeigt Informationen zu den verschiedenen Phasen an, die der VRRPv3-Teilnehmer durchlaufen hat.

Switch 1:

Switch1# show vrrpv3 internal event-history debugs

2024 Apr 11 01:01:49.642985: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Active Wait', NewState='Active'

2024 Apr 11 01:01:49.642974: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Ack Active, CurrentState=Active Wait

2024 Apr 11 01:01:49.642963: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:49.642952: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Notifying Pathway MAC Of Async Event: Event='Ack Active', ErrStr='SUCCESS'

2024 Apr 11 01:01:49.642941: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: L2fm Alloc Response For MAC: MAC=0000.5e00.0201, Status=0x0, ErrStr='SUCCESS'

2024 Apr 11 01:01:49.642898: E_DEBUG vrrpv3 [23795]: VRRP-MTS: L2fm Alloc Response: RRToken=0x2f9a22, NumMessages=1, OverallStatus=0x0

2024 Apr 11 01:01:49.637478: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Installing ICMPv6 Entry For: VIP=X::X:X:X:297, Flag=0x3

2024 Apr 11 01:01:49.637453: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Activating VIP6, That Was In State: VIP=X::X:X:X:297, State='Inactive'

2024 Apr 11 01:01:49.637367: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Standby', NewState='Active Wait'

2024 Apr 11 01:01:49.637306: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Request Active, CurrentState=Standby

2024 Apr 11 01:01:49.637295: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:47.421619: E_DEBUG vrrpv3 [23795]: VRRP-MTS: Handling IPv6 Change 7: Ifindex=0x90100d1, OldIP=0::/0, NewIP=X:X:X:X::70a/125

2024 Apr 11 01:01:46.421957: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='', NewState='Standby'

2024 Apr 11 01:01:46.421950: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Ack Standby, CurrentState=

2024 Apr 11 01:01:46.421944: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:46.421938: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Notifying Pathway MAC Of Async Event: Event='Ack Standby', ErrStr='SUCCESS'

2024 Apr 11 01:01:46.421932: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: L2fm Alloc Response For MAC: MAC=0000.5e00.0201, Status=0x0, ErrStr='SUCCESS'

2024 Apr 11 01:01:46.421911: E_DEBUG vrrpv3 [23795]: VRRP-MTS: L2fm Alloc Response: RRToken=0x2f99cd, NumMessages=1, OverallStatus=0x0

2024 Apr 11 01:01:46.419597: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Installing ICMPv6 Entry For: VIP=X::X:X:X:297, Flag=0x3

2024 Apr 11 01:01:46.419574: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Deactivating VIP6, That Was In State: VIP=X::X:X:X:297, State='Shutdown'

2024 Apr 11 01:01:46.419515: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Reserved', NewState=''

2024 Apr 11 01:01:46.419463: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Request Standby, CurrentState=Reserved

2024 Apr 11 01:01:46.419454: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

Switch1#

Switch 2:

Switch2# show vrrpv3 internal event-history debugs

2024 Apr 11 00:57:40.234767: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active Wait -> Active

2024 Apr 11 00:57:40.234752: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Active, Current state Active Wait

2024 Apr 11 00:57:40.234744: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:57:40.234736: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Active, status SUCCESS

2024 Apr 11 00:57:40.234728: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:57:40.234694: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3ba768, msgs 1, overall status 0

2024 Apr 11 00:57:40.229355: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:57:40.229329: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] activating vip6 X::X:X:X:297, that was in 'Inactive' state

2024 Apr 11 00:57:40.229251: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Standby -> Active Wait

2024 Apr 11 00:57:40.229195: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Active, Current state Standby

2024 Apr 11 00:57:40.229184: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:57:36.813093: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(down) for 0x1a006400

2024 Apr 11 00:54:11.763596: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: -> Standby

2024 Apr 11 00:54:11.763587: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Standby, Current state

2024 Apr 11 00:54:11.763580: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:54:11.763572: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Standby, status SUCCESS

2024 Apr 11 00:54:11.763564: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:54:11.763533: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3b791e, msgs 1, overall status 0

2024 Apr 11 00:54:11.758782: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:54:11.758757: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] de-activating vip6 X::X:X:X:297, that was in 'Active' state

2024 Apr 11 00:54:11.758685: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active ->

2024 Apr 11 00:54:11.758637: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Standby, Current state Active

2024 Apr 11 00:54:11.758626: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:54:06.643584: E_DEBUG VRRP-MTS: L2_PROTO_CHANGE: intf 0x1a006400 entering L2

2024 Apr 11 00:54:06.616851: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(up) for 0x1a006400

2024 Apr 11 00:52:11.216190: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active Wait -> Active

2024 Apr 11 00:52:11.216182: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Active, Current state Active Wait

2024 Apr 11 00:52:11.216174: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:52:11.216167: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Active, status SUCCESS

2024 Apr 11 00:52:11.216159: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:52:11.216125: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3b3bc5, msgs 1, overall status 0

2024 Apr 11 00:52:11.210932: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:52:11.210906: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] activating vip6 X::X:X:X:297, that was in 'Inactive' state

2024 Apr 11 00:52:11.210828: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Standby -> Active Wait

2024 Apr 11 00:52:11.210773: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Active, Current state Standby

2024 Apr 11 00:52:11.210762: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:52:08.025681: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(down) for 0x1a006400

Switch2#

4) Ethanalyzer zeigt die VRRP Ankündigungen. VRRP-Ankündigungen werden nur vom Primärswitch durchgeführt. Die Multicast-Adresse für VRRPv3 lautet ff02::12.

Switch 1:

Switch1# ethanalyzer local interface inband display-filter "vrrp.adver_int" limit-captured-frames 0

Capturing on inband

2024-04-11 14:07:50.050745 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:50.967333 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:51.861690 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:52.809845 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:53.700778 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:54.693008 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch1#

Switch 2:

Switch2# ethanalyzer local interface inband display-filter "vrrp.adver_int" limit-captured-frames 0

Capturing on inband

2024-04-11 14:07:49.946663 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:50.829985 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:51.728800 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:52.720034 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:53.571038 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:54.386109 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch2#

Aus der obigen Ausgabe senden beide Switches ihre eigenen Anzeigen (dea7 und de07). Dies ist ein Hinweis darauf, dass keine Verbindung zwischen den beiden Switches besteht, die zur gleichen VRRPv3-Gruppe gehören.

Detailliertere Informationen zu den von VRRPv3 generierten Paketen bezüglich MAC-Adresse, Priorität, Version und IP finden Sie.

Switch 1:

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Frame 206: 82 bytes on wire (656 bits), 82 bytes captured (656 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Internet Protocol Version 6, Src: X::X:X:X:dea7, Dst: ff02::12

Virtual Router Redundancy Protocol

Version 3, Packet type 1 (Advertisement)

Virtual Rtr ID: 1

Priority: 200 (Default priority for a backup VRRP router)

Addr Count: 1

0000 .... = Reserved: 0

.... 0000 0110 0100 = Adver Int: 100

Checksum: 0xb912 [correct]

[Checksum Status: Good]

IPv6 Address: X::X:X:X:297

Switch 2:

Frame 82: 78 bytes on wire (624 bits), 78 bytes captured (624 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Frame 82: 78 bytes on wire (624 bits), 78 bytes captured (624 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Internet Protocol Version 6, Src: X::X:X:X:de07, Dst: ff02::12

Virtual Router Redundancy Protocol

Version 3, Packet type 1 (Advertisement)

Virtual Rtr ID: 1

Priority: 100 (Default priority for a backup VRRP router)

Addr Count: 1

0000 .... = Reserved: 0

.... 0000 0110 0100 = Adver Int: 100

Checksum: 0xb912 [correct]

[Checksum Status: Good]

IPv6 Address: X::X:X:X:297

5) Nachdem das Verbindungsproblem behoben wurde, das in diesem Fall darin bestand, dass sich die Layer-2-Schnittstelle im heruntergefahrenen Zustand befand, obwohl sich die SVI im eingeschalteten Zustand befand, müssen die Switches nun den richtigen Zustand anzeigen (primär bzw. Backup), und die Meldungen werden nur vom primären Switch gesendet.

Switch 1:

Switch1# show vrrpv3

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 13 hours 42 mins 46 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 118 msec)

Primary Down interval is unknown

Switch1#

Switch1#

Switch1# ethanalyzer local interface inband display-filter "vrrp" limit-captured-frames 0

Capturing on inband

2024-04-11 14:48:48.125754 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:48.125794 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.002998 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.003035 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.983749 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.983782 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch1#

Ein ELAM wird im Primärswitch ausgelöst, der die richtigen MAC-Adressen anzeigt, wenn er auf die Multicast-Adresse für VRRPv3 verweist:

Switch1(TAH-elam-insel6)# set outer ipv6 src_ip fe80::6a9e:bff:feaa:dea7 dst_ip ff02::12

Switch1(TAH-elam-insel6)# start

Switch1(TAH-elam-insel6)# report

HOMEWOOD ELAM REPORT SUMMARY

slot - 1, asic - 0, slice - 0

============================

Incoming Interface: sup-eth

Src Idx : 0x0, Src BD : 209

Outgoing Interface Info: met_ptr 0

Packet Type: IPv6

Dst MAC address: 33:33:00:00:00:12

Src MAC address: 00:00:5E:00:02:01

Dst IPv6 address: FF02:0000:0000:0000:0000:0000:0000:0012

Src IPv6 address: FE80:0000:0000:0000:6A9E:0BFF:FEAA:DEA7

Ver = 6, Pkt len = 40, Payload_length = 4

L4 Protocol : 112

Drop Info:

----------

LUA:

LUB:

LUC:

LUD:

Final Drops:

vntag:

vntag_valid : 0

vntag_vir : 0

vntag_svif : 0

Switch1(TAH-elam-insel6)#

Switch 2:

Switch2# show vrrpv3

Vlan209 - Group 1 - Address-Family IPv6

State is BACKUP

State duration 1.538 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:dea7, priority is 200

Primary Advertisement interval is 1000 msec (learned)

Primary Down interval is 3609 msec (expires in 2886 msec)

Switch2#

Switch2# ethanalyzer local interface inband display-filter "vrrp" limit-captured-frames 0

Capturing on inband

2024-04-11 14:48:48.082516 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:48.959735 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.940504 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

3 packets captured

Switch2#

Die Ankündigung ist auf dem Backup-Gerät zu sehen, wenn ein ELAM ausgeführt wird. Die Ankündigung kommt vom primären Switch (X::X:X:X:X:dea7) und wird über die richtige eingehende Schnittstelle empfangen, die Ethernet 1/51 ist.

Switch2# show hardware internal tah interface e1/51

#########################################

IfIndex: 0x1a006400

DstIndex: 5944

IfType: 26

Asic: 0

Asic: 0

AsicPort: 60

SrcId: 120

Slice: 0

PortOnSlice: 60

Table entries for interface Ethernet1/51

Switch2(TAH-elam)# trigger init asic 0 slice 0 in-select 6 out-select 0 use-src-id 120

Switch2(TAH-elam-insel6)# set outer ipv6 src_ip X::X:X:X:dea7

Switch2(TAH-elam-insel6)# start

Switch2(TAH-elam-insel6)# report

HOMEWOOD ELAM REPORT SUMMARY

slot - 1, asic - 0, slice - 0

============================

Incoming Interface: Eth1/51

Src Idx : 0xc9, Src BD : 209

Outgoing Interface Info: met_ptr 0

Packet Type: IPv6

Dst MAC address: 33:33:00:00:00:12

Src MAC address: 00:00:5E:00:02:01

.1q Tag0 VLAN: 209, cos = 0x6

Sup hit: 1, Sup Idx: 3344

Dst IPv6 address: FF02:0000:0000:0000:0000:0000:0000:0012

Src IPv6 address: X:X:X:X:X:X:X:DEA7

Ver = 6, Pkt len = 24, Payload_length = 4

L4 Protocol : 112

Drop Info:

----------

LUA:

LUB:

LUC:

LUD:

Final Drops:

vntag:

vntag_valid : 0

vntag_vir : 0

vntag_svif : 0

Switch2(TAH-elam-insel6)#

Zugehörige Informationen

Konfigurieren von VRRPv3

Ethanalyzer