المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

إجراء إيقاف بطاقة SF/CF في عقدة Virtual Packet Core

معلومات إضافية

المقدمة

يصف هذا المستند الخطوات اللازمة لإيقاف بطاقات وظيفة الخدمة (SF)/وظيفة التحكم (CF) على StarOS.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بمكونات حلول Virtual Packet Core.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى بوابة شبكة بيانات الحزم الظاهرية (VPGW) من Cisco.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

يؤدي إيقاف البطاقة إلى تقييد وظائف التشغيل. قبل إزالة أي بطاقة نشطة من النظام، يوصى بجعلها في وضع الاستعداد أو الإيقاف. تؤدي إزالة أي بطاقة نشطة بشكل مفاجئ إلى حدوث تأثير ضار على النظام. يؤدي إيقاف البطاقة إلى عدم الاتصال ثم يمكن إزالته من النظام بسهولة.

إجراء إيقاف بطاقة SF/CF في عقدة Virtual Packet Core

1. أستخدم الأمر show card table لتحديد البطاقة التي سيتم إيقافها.

على سبيل المثال:

[ABCD]XYZ# show card table

Tuesday July 14 05:17:03 UTC 2020

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         Yes

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Active         No

6: FC       2-Port Service Function Virtual Card    Standby        -

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

2. بطاقة الإيقاف رقم 5.

[ABCD]XYZ# card halt 5

Thursday August 05 05:44:35 UTC 2021

Are you sure? [Yes|No]: yes

Thursday August 05 05:44:39 UTC 2021

3. تأكد من أن ترحيل البطاقة بدأ من بطاقة متوقفة إلى بطاقة إحتياطية.

[ABCD]XYZ# show card table

Thursday August 05 05:44:46 UTC 2021

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         No

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         Yes

4: FC       2-Port Service Function Virtual Card    Active         Yes

5: FC       2-Port Service Function Virtual Card    Migrate From   -

6: FC       2-Port Service Function Virtual Card    Migrate To     -

7: FC       2-Port Service Function Virtual Card    Active         Yes

8: FC       2-Port Service Function Virtual Card    Active         Yes

4. تصبح البطاقة التي تم إيقافها غير متصلة.

[ABCD]XYZ# show card table

Thursday August 05 05:45:08 UTC 2021

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         No

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         Yes

4: FC       2-Port Service Function Virtual Card    Active         Yes

5: FC       2-Port Service Function Virtual Card    Offline        -

6: FC       2-Port Service Function Virtual Card    Active         Yes

7: FC       2-Port Service Function Virtual Card    Active         Yes

8: FC       2-Port Service Function Virtual Card    Active         Yes

5. إذا كنت ترغب في إعادة هذه البطاقة إلى النظام، فأنت بحاجة إلى إعادة تمهيد النظام.

[ABCD]XYZ# card reboot 5

Thursday August 05 05:45:27 UTC 2021

6. بعد إعادة التشغيل، يتم نقله إلى حالة الاستعداد.

[ABCD]XYZ# show card table

Thursday August 05 05:47:48 UTC 2021

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         No

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Standby        -

6: FC       2-Port Service Function Virtual Card    Active         No

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

معلومات إضافية

1. لا يتوفر للنظام خيار إيقاف بطاقة "وظيفة التحكم".

[ABCD]XYZ# card halt

3..8

>> System gives options from card 3, as card 1 & 2 is reserved for CF cards

2. إذا حاولت إيقاف بطاقة وظيفة التحكم بالقوة، يمكن رؤية رسالة الخطأ هذه.

[ABCD]XYZ# card halt 2

Unknown command - "2?", card not present or unrecognized keyword