المحتويات

المقدمة

المشكلة

تحليل

تسجيل وفاة كافة النظراء

فحوصات SMF

غرافانا شيكات

شيكات Nexus

الحل

المقدمة

يوضح هذا المستند كيفية أستكشاف أخطاء سجل وظيفة إدارة الجلسة (SMF) وإصلاحها All Peers are Dead, Setting status code to 0.

المشكلة

تم الإبلاغ عن تأثير الجلسة على SMF.

تحليل

تسجيل وفاة كافة النظراء

يشير السجل إلى أن كافة النظراء داخل SelectedProfileName:CHF-Off قد ماتوا.

يغطي السجل جميع نقاط النهاية المكونة على SMF، وفي أي وقت ترى فيه كل الأقران معطوب داخل ملف التعريف يؤدي هذا دائما إلى تأثير الجلسة.

master-1 b26897bce81a[2516]:

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: ***********************************************

master-1 c77834f772f7[2516]: ***********************************************

استنادا إلى التكوين، يحاول SMF الوصول إلى الخادم الأساسي بأولوية أعلى في حالة وجود نظام HTTP code 504 (المهلة)، ثم يحاول SMF الوصول إلى الخادم الثانوي. إن يفشل ذلك، أيضا في تلك الحالة نظام أيضا يثبت جلسة في حالة إستمرار أسلوب.

في المثال، وظيفة الشحن الثانوية (CHF) ل Offline هي 10.10.10.2. تلقى SMF الخطأ 504 والإجراء هو FailureContinueAction.

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [RestClient.go:175] [infra.rest_client.core] Error in rest call err Post "http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2/chargingdata": context deadline exceeded

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [Config.go:1721] [nrfClient.Discovery.nrf] Send to NF rpcName[CHF], method:[DataRequest] EndPoint[http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2] failed

master-2 42013075464a[2621]: ************* TRANSACTION: 2252879781 *************

master-2 42013075464a[2621]: TRANSACTION SUCCESS:

master-2 42013075464a[2621]: GR Instance ID : 1

master-2 42013075464a[2621]: Txn Type : N40ChargingDataReq(3521)

master-2 42013075464a[2621]: Priority : 1

master-2 42013075464a[2621]: Session Namespace : smf(1)

master-2 42013075464a[2621]: CDL Slice Name : smf

master-2 42013075464a[2621]: LOG MESSAGES:

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [rest_ep.app.ChargingIntf] {imsi-1234567891011121:21} Received Charging Data Response error with timediff 10001557123 - Request message {{"invocationSequenceNumber":1,"invocationTimeStamp":"2025-11-10T14:29:29Z","nfConsumerIdentification":{"nFIPv4Address":"10.10.10.12","nFName":"dce0c1d7-aa37-4f2c-870b-6f7c1be10af1","nFPLMNID":{"mcc":"123","mnc":"456"},"nodeFunctionality":"SMF"},"notifyUri":"http://10.10.10.12:8195/callbacks/v2/notifyUri/1909959397/chargingNotification","pDUSessionChargingInformation":{"chargingId":1909959397,"pduSessionInformation":{"authorizedQoSInformation":{"5qi":1,"arp":{"preemptCap":"NOT_PREEMPT","preemptVuln":"PREEMPTABLE","priorityLevel":1}},"authorizedSessionAMBR":{"downlink":"2048000 bps","uplink":"2048000 bps"},"chargingCharacteristicsSelectionMode":"VISITING_DEFAULT","dnnId":"data","hPlmnId":{"mcc":"123","mnc":"456"},"networkSlicingInfo":{"sNSSAI":{"sst":1}},"pduAddress":{"iPv6dynamicPrefixFlag":true,"pduIPv6AddresswithPrefix":"x:x:x:x::"},"pduSessionID":21,"pduType":"IPV6","ratType":"WLAN","servingCNPlmnId":{"mcc":"123","mnc":"456"},"sscMode":"SSC_MODE_1","startTime":"2025-11-10T14:29:29Z"},"userInformation":{"roamerInOut":"IN_BOUND","servedGPSI":"msisdn-12345678901"},"userLocationinfo":{"n3gaLocation":{"portNumber":4505,"ueIpv4Addr":"x.x.x.x"}}},"subscriberIdentifier":{"subscriberIdentityType":"SUPI","supi":"imsi-1234567891011121"}}}

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.SendMesg.NRF] FHI status 504 timediff 1000332537, Uri: http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2, retryCount = 0 loopMaxRetry = 0, maxRetry = 0

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF Http2_Status:504 FailAction:FailureContinueAction MsgType:3587 ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-2 42013075464a[2621]: ***********************************************

فحوصات SMF

في SMF، تحقق من الأقران والوقت المتصل بهم فيما يتعلق بنقطة النهاية التي أبلغت عن المشكلة.

smf# show peers

GR                                                                                POD              CONNECTED              ADDITIONAL

INSTANCE  ENDPOINT        LOCAL ADDRESS         PEER ADDRESS           DIRECTION  INSTANCE   TYPE  TIME           RPC     DETAILS     INTERFACE NAME     VRF

--------------------------------------------------------------------------------------------------------------------------------------------------------------

1         <none>          192.168.1.1        10.10.10.2:1090      Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.2:1090      Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.1:1090     Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.2:1090      Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.1:1090     Outbound   rest-ep-3  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.1:1090     Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.2:1090      Outbound   rest-ep-3  Rest  2 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.1        10.10.10.1:1090     Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

// CHF related profiles

profile network-element chf CHF-OFFLINE

nf-client-profile        CHF-OFF

failure-handling-profile Fail-H-CHF-OFF

discovery local

exit

// Here is configuration for CHF profile where all peers are dead

profile nf-client nf-type chf

chf-profile CHF-OFF

locality LOC1

priority 1

service name type nchf-convergedcharging

responsetimeout 1000

endpoint-profile epprof

capacity   10

api-root   OFFLINE

uri-scheme http

version

uri-version v2

exit

exit

endpoint-name ep1

priority 1

capacity 10

primary ip-address ipv4 10.10.10.1

primary ip-address port 1090

exit

endpoint-name ep2

priority 2

capacity 10

primary ip-address ipv4 10.10.10.2

primary ip-address port 1090

exit

exit

exit

exit

exit

// Failure handling that in case of timeout (HTTP code 504) then try secondary server one time and then proceed with continuing the session

profile nf-client-failure nf-type chf

profile failure-handling Fail-H-CHF-OFF

service name type nchf-convergedcharging

responsetimeout 1000

message type ChfConvergedchargingCreate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingUpdate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingDelete

status-code httpv2 504

retry  1

action continue

exit

exit

exit

شيكات غرافانا

تمت ملاحظة الارتباط المباشر بين مهلة HTTP 504 ووقت الإصدار.

query: sum(increase(smf_restep_http_msg_total{nf_type="chf", namespace=~"$namespace"}[15m])) by (api_name, response_cause, response_status)

شيكات Nexus

تحقق من وجود أي قفزات.

Nexus# show logging last 500 | include BFD

الحل

يختلف حل هذه المشكلة في هذه الحالة لأن SMF هو العميل و CHF هو الخادم.

لم يكن فقدان الاتصال بسبب SMF.