المحتويات

المقدمة

معلومات أساسية

المشكلة

الحل

مثال إخراج للحاويات

مثال إخراج الأجهزة الافتراضية

SSH إلى مضيف UCS

المقدمة

يوضح هذا المستند كيفية التعرف على نظام الحوسبة الموحدة (UCS) والتحقق من إدخالات الأخطاء الموجودة عليه في نظام النشر الأصلي للسحابة (CNDP).

معلومات أساسية

يتم الإبلاغ عن التنبيهات المتعلقة بالأجهزة في بيئة التنفيذ المشتركة (CEE) الخاصة بإدارة مجموعات الخدمات الدقيقة (SMI) للمشترك الأساسي في بنية الشبكة الفائقة (Ultra Cloud). Kubernetes (K8s)، docker، وهكذا معلومات ذات صلة يتم الإبلاغ عنها في ال CM فعلي عنوان (VIP).

تحذير: يرجى الرجوع إلى استبيان تصميم الشبكة ومعلومات العملاء (CIQ) للتحقق من عناوين IP.

المشكلة

تم الإبلاغ عن الخطأ "Equipment Alarm" في تنبيهات العرض.

- سجل الدخول إلى CM-CEE، وقم بتشغيل الأمر show alerts active detail، وإظهار ملخص محفوظات التنبيهات لعرض جميع تنبيهات المحفوظات النشطة.

- لاحظ IP الخاص بالخادم الذي تم الإبلاغ عنه في التنبيه.

[lab-deployer/labceec01] cee# show alerts active detail

alerts active detail server-alert 9c367ce5ee48

severity    major

type        "Equipment Alarm"

startsAt    2021-10-27T17:10:37.025Z

source      10.10.10.10

summary     "DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM"

labels      [ "alertname: server-alert" "cluster: cr-chr-deployer" "description: DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM" "fault_id: sys/rack-unit-1/board/memarray-1/mem-5/fault-F0185" "id: 134219020" "monitor: prometheus" "replica: cr-chr-deployer" "server: 10.10.10.10" "severity: major" ]

annotations [ "dn: cr-chr-deployer/10.10.10.10/sys/rack-unit-1/board/memarray-1/mem-5/fault-F0185/134219020" "summary: DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM" "type: Equipment Alarm" ]

[lab-deployer/labceec01] cee# show alerts history summary

NAME      UID           SEVERITY  STARTS AT       DURATION  SOURCE       SUMMARY

---------------------------------------------------------------------------------------------

vm-alive  f6a65030b593  minor     09-02T10:28:28  1m40s     10-192-0-13  labd0123 is alive.

vm-error  3a6d840e3eda  major     09-02T10:27:18  1m        10-192-0-13  labd0123 is down.

vm-alive  49b2c1941dc6  minor     09-02T10:25:38  1m40s     10-192-0-14  labd0123 is alive.

الحل

حدد الخدمات (الحاويات) و/أو الجهاز الظاهري (VM) أو الجهاز الظاهري (KVM) القائم على Kernel الذي تتم إستضافته على الخادم في SMI CM، وقم بتشغيل الأمر show running-config والعثور على تكوين IP للخادم.

1. سجل الدخول إلى CM VIP (username: cloud-user)

2. الحصول على IP من مركز OPS لمساحة الاسم smi-cm

3. قم بتسجيل الدخول إلى مركز OPS، ثم تحقق من تكوين نظام المجموعة

4. التعرف على العقد والأجهزة الافتراضية (VM) التي تعمل على الخادم

cloud-user@lab-deployer-cm-primary:~$ kubectl get svc -n smi-cm

NAME                                          TYPE        CLUSTER-IP       EXTERNAL-IP      PORT(S)                                                 AGE

cluster-files-offline-smi-cluster-deployer    ClusterIP   10.102.200.178   <none>           8080/TCP                                                98d

iso-host-cluster-files-smi-cluster-deployer   ClusterIP   10.102.100.208     192.168.1.102    80/TCP                                                  98d

iso-host-ops-center-smi-cluster-deployer      ClusterIP   10.102.200.73    192.168.1.102    3001/TCP                                                98d

netconf-ops-center-smi-cluster-deployer       ClusterIP   10.102.100.207   192.168.184.193   3022/TCP,22/TCP                                         98d

ops-center-smi-cluster-deployer               ClusterIP   10.10.20.20     <none>           8008/TCP,2024/TCP,2022/TCP,7681/TCP,3000/TCP,3001/TCP   98d

squid-proxy-node-port                         NodePort    10.102.60.114    <none>           3128:32261/TCP                                          98d

cloud-user@lab-deployer-cm-primary:~$ ssh -p 2024 admin@10.10.20.20

admin@10.10.20.20's password:

Welcome to the Cisco SMI Cluster Deployer on lab-deployer-cm-primary

Copyright © 2016-2020, Cisco Systems, Inc.

All rights reserved.

admin connected from 192.168.1.100 using ssh on ops-center-smi-cluster-deployer-7848c69844-xzdw6

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters

مثال إخراج للحاويات

في هذا المثال، يتم إستخدام الخادم بواسطة عقدة primary-1.

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters lab01-smf nodes primary-1

clusters lab01-smf

nodes primary-1

maintenance false

k8s node-type       primary

k8s ssh-ip          10.192.10.22

k8s sshd-bind-to-ssh-ip true

k8s node-ip         10.192.10.22

k8s node-labels smi.cisco.com/node-type oam

exit

k8s node-labels smi.cisco.com/node-type-1 proto

exit

ucs-server cimc user admin

ucs-server cimc ip-address 10.10.10.10

مثال إخراج الأجهزة الافتراضية

يمكن إستخدام الخادم ل KVM-based.

في هذا المثال، يحتوي الخادم على وظائف مستوى المستخدم (UPFs) - UPF1 و UPF2.

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters lab01-upf nodes labupf

clusters lab01-upf

nodes labupf

maintenance false

ssh-ip      10.192.30.7

type        kvm

vms upf1

upf software lab...

...

type upf

exit

vms upf2

upf software lab...

...

type upf

exit

ucs-server cimc user admin

...

ucs-server cimc ip-address 10.10.10.10

...

exit

SSH إلى مضيف UCS

قم بالاتصال بمضيف UCS والتحقق من إدخالات الأعطال باستخدام خطأ النطاق، وأبديت إدخالات الأعطال، وأبديت محفوظات الأعطال.

labucs111-cmp1-11 /fault # show fault-entries

Time Severity Description ------------------------- ------------- ---------------------------------------

2021-03-26T10:10:10 major "DDR4_P1_C1_ECC: DIMM 19 is inoperable : Check or replace DIMM"

LABCP0222-Server22-02 /fault # show fault-history

Time                Severity      Source          Cause                     Description

------------------- ------------- --------------- ------------------------- ----------------------------------------

2021 Dec 10 02:02:02 UTC info          %CIMC           EQUIPMENT_INOPERABLE      "[F0174][cleared][equipment-inoperable][sys/rack-unit-1/board] IERR: A catastrophic fault has occurred on one of the processors: Cleared "

2021 Dec 1 01:01:01 UTC critical      %CIMC           EQUIPMENT_INOPERABLE      "[F0174][critical][equipment-inoperable][sys/rack-unit-1/board] IERR: A catastrophic fault has occurred on one of the processors: Please check the processor's status. "