المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

المشكلة

استكشاف الأخطاء وإصلاحها

الحل

المقدمة

يوضح هذا المستند كيفية أستكشاف المشكلة وإصلاحها التي تحدث عند حدوث انخفاض في مؤشر أداء مفتاح معدل نجاح GX (KPI) عند زيادة سبب قطع الاتصال "IMS-Authorization-Failed".

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- معرفة الأجهزة للطراز 5000/5500

- StarOS

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة.

بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

المختصرات:

PCRF

وظيفة قواعد الشحن والسياسة

PGW

بوابة شبكة بيانات الحزم

CCR

طلب التحكم في الائتمان

CCA

إجابة التحكم في الائتمان

الكلوروفلوروكربون

البطاقة الظاهرية لوظيفة التحكم

قناة ليفية

البطاقة الظاهرية لوظيفة الخدمة

KPI

مؤشر الأداء الرئيسي

المشكلة

قام موفر الخدمة بالإبلاغ عن انخفاض KPI لمعدل نجاح GX في PGW واحد وتبين أن عداد سبب قطع الاتصال 'ims-authorization-failed' في أزدياد.

يصف سبب قطع الاتصال "IMS-Authorization-failed" إجمالي عدد جلسات العمل التي تم قطع إتصالها بسبب حالات فشل تفويض IMS.

قام PGW بالإعلام بشكل مستمر عن عداد 'ims-authorization-failed'. وفقا لإحصائيات أسباب قطع الاتصال، فقد ساهم العداد 'ims-authorization-failed' في انخفاض معدل نجاح GX.

1st iteration-

[local]PGW# show session disconnect-reasons verbose | grep -i ims-authorization-failed

Thursday June 13 16:10:39 NZST 2019

..

Disconnect Reason                                       Num Disc    Percentage

-----------------------------------------------------  ----------  ----------

ims-authorization-failed                                    59034     1.68225

2nd iteration-

[local]PGW# show session disconnect-reasons verbose | grep -i ims-authorization-failed

Thursday June 13 16:10:59 NZST 2019

..

Disconnect Reason                                        Num Disc  Percentage

-----------------------------------------------------  ----------  ----------

ims-authorization-failed                                    59202     1.68181         >>168 counter increased in just 20 sec of span

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات لاستكشاف أخطاء معدل نجاح KPI ل Gx وإصلاحها بسبب زيادة سبب قطع الاتصال 'ims-authorization-failed'.

تم تجميع تتبع مشترك جهاز العرض لسيناريو الفشل.

وتبين من التحليل أنه لوحظ وجود 'ims-authorization-failed' لمثيلات جلسة العمل هذه المقترنة بالبطاقة 7. وبشكل عام، تم إستلام السبب IMS-Authorization-failed لسبب قطع الاتصال.

ارجع إلى تسلسل تتبع المشترك للفشل:

تم إرسال رسالة CREATE_SESSION_REQUEST من SGW إلى PGW.

INBOUND>>>>>  From sessmgr:102 sessmgr_pgw.c:31631 (Callid 1e283e66) 16:55:07:562 Eventid:141004(3)

[PGW-S5/S2a/S2b]GTPv2C Rx PDU, from 202.73.X.Y:31552 to 202.73.A.B:2123 (262)

TEID: 0x00000000, Message type: EGTP_CREATE_SESSION_REQUEST (0x20)

Sequence Number: 0x18A861 (1615969)

GTP HEADER

Version number: 2

TEID flag: Present

Piggybacking flag: Not present

Message Length: 0x0102 (258)

INFORMATION ELEMENTS

IMSI:

Type: 1  Length: 8  Inst: 0

Value: ABXY01106562064

USER LOCATION INFO:

Type: 86  Length: 13  Inst: 0

Value:

Location type: TAI

MCC: 530

MNC: 01

TAC: 0xA101

Location type: ECGI

MCC: AB0

MNC: XY

ECI: 0x006F902

SERVING NETWORK:

Type: 83  Length: 3  Inst: 0

Value:

MCC: AB0

MNC: XY

RADIO ACCESS TECH:

Type: 82  Length: 1  Inst: 0

Value: EUTRAN (6)

SGW-CONTROL FTEID:

Type: 87  Length: 9  Inst: 0

Value:

Interface: SGW S5/S8-C

IPv4 Flag: 1

IPv6 Flag: 0

Teid: 0x84B8A061

IPV4 Addr: 202.73.X.Y

ACCESS POINT NAME:

Type: 71  Length: 28  Inst: 0

Value: internet.mnc0XY.mcc0AB.gprs

SELECTION MODE:

Type: 128  Length: 1  Inst: 0

Value: MS or network provided APN,subscr verified (0x00)

PDN TYPE:

Type: 99  Length: 1  Inst: 0

Value: IPV4

PDN ADDRESS ALLOC:

Type: 79  Length: 5  Inst: 0

Value:

PDN Type: IPV4

IPV4 Addr: 0.0.0.0

INDICATION:

Type: 77  Length: 6  Inst: 0

Value:

DAF  : 0

DTF  : 0(Direct tunnel disabled)

HI   : 0

DFI  : 0

OI   : 0

ISRSI: 0(ISR not supported)

ISRAI: 0(ISR not Activated)

SGWCI: 0

SQCI : 0

UIMSI: 0(Authenticated IMSI)

CFSI : 0(F-TEID Change Indication not supported)

CRSI : 0(Location Change Reporting not supported)

PS   : 1(Piggybacking feature supported)

PT   : 0(GTPv2)

SI   : 0

MSV  : 0

RetLoc: 0

PBIC: 0

SRNI: 0

S6AF: 0

S4AF: 0

MBMDT: 0

ISRAU: 0

CCRSI: 0(CSG Information Change Reporting mechanism not supported )

CPRAI: 0

ARRL: 0

PPOF: 0

PPON / PPEI: 0

PPSI: 0

CSFBI: 0

CLII: 0

CPSR: 0

UASI: 0

DTCI: 0

BDWI: 0

PCRI: 0

AOSI: 0

AOPI: 0

EPCOSI: 0

CPOPCI: 0

S11TF: 0

PNSI: 0

WPMSI: 0

APN RESTRICTION:

Type: 127  Length: 1  Inst: 0

Value: 0

AGGREGATE MAX BIT RATE:

Type: 72  Length: 8  Inst: 0

Value:

Uplk AMBR: 64000 kbps

Dnlk AMBR: 256000 kbps

PCO:

Type: 78  Length: 32  Inst: 0

Container id: 0x8021 (IPCP)

Container length: 0x10 (16)

Container content:

Conf-Req(0), Pri-DNS=0.0.0.0, Sec-DNS=0.0.0.0

Container id: 0x000D (IPv4-DNS-Server)

Container length: 0x00 (0)

Container content:

DNS Address: Request for IPv4 DNS Address allocation

Container id: 0x000A (IP address allocation via NAS signalling)

Container length: 0x00 (0)

Container content:

IP Address allocation via NAS signalling

Container id: 0x0005 (Bearer Control Mode)

Container length: 0x00 (0)

Container content:

NCQOS BCM Indicator:

Container id: 0x0010 (Link MTU)

Container length: 0x00 (0)

Container content:

BEARER CONTEXT TO BE CREATED:

Type: 93  Length: 44  Inst: 0

Value:

EPS BEARER ID:

Type: 73  Length: 1  Inst: 0

Value: 5

SGW-DATA FTEID:

Type: 87  Length: 9  Inst: 2

Value:

Interface: SGW S5/S8-U

IPv4 Flag: 1

IPv6 Flag: 0

Teid: 0x8A948061

IPV4 Addr: 202.73.X.Y

BEARER QOS:

Type: 80  Length: 22  Inst: 0

Value:

ARP: PCI = 1 (Disabled), PL = 9, PVI = 0 (Enabled)

QCI: 6

Uplnk MBR: 0 kbps

Dnlnk MBR: 0 kbps

Uplnk GBR: 0 kbps

Dnlnk GBR: 0 kbps

UE TIME ZONE:

Type: 114  Length: 2  Inst: 0

Value:

TZ: +12:00

DST: +0 hour

CHARGING CHAR:

Type: 95  Length: 2  Inst: 0

Value: 0x0800

<additional output suprresed>

قام PGW بإرسال 'لا يوجد مورد متوفر' إلى SGW في رسالة EGTP_CREATE_SESSION_RESPONSE.

<<<<OUTBOUND  From sessmgr:102 sessmgr_egtp.c:2906 (Callid 1e283e66) 16:55:15:492 Eventid:141005(3)

[PGW-S5/S2a/S2b]GTPv2C Tx PDU, from 202.73.195.91:2123 to 202.73.195.89:31552 (33)

TEID: 0x84B8A061, Message type: EGTP_CREATE_SESSION_RESPONSE (0x21)

Sequence Number: 0x18A861 (1615969)

GTP HEADER

Version number: 2

TEID flag: Present

Piggybacking flag: Not present

Message Length: 0x001D (29)

INFORMATION ELEMENTS

CAUSE:

Type: 2  Length: 2  Inst: 0

Value:

Cause: EGTP_CAUSE_NO_RESOURCES_AVAILABLE (0x49)

PCE: 0

BCE: 0

CS: 0

BEARER CONTEXT CREATED:

Type: 93  Length: 11  Inst: 0

Value:

EPS BEARER ID:

Type: 73  Length: 1  Inst: 0

Value: 5

CAUSE:

Type: 2  Length: 2  Inst: 0

Value:

Cause: EGTP_CAUSE_NO_RESOURCES_AVAILABLE (0x49)

PCE: 0

BCE: 0

CS: 0

بشكل عام، تم إستلام سبب فشل IMS-Authorization في سبب قطع الاتصال.

***CONTROL*** From sessmgr:102 sessmgr_func.c:5311 (Callid 1e283e66) 16:55:15:493 Eventid:10285   >>disconnect received for sessmr 102

CALL STATS: <xyz12591615@internet>, msid <ABXY01106562064>, Call-Duration(sec): 0

input pkts: 0                          output pkts: 0

input bytes: 0                         output bytes: 0

input bytes dropped: 0                 output bytes dropped: 0

input pkts dropped: 0                  output pkts dropped: 0

pk rate from user(bps): 0              pk rate to user(bps): 0

ave rate from user(bps): 0             ave rate to user(bps): 0

sust rate from user(bps): 0            sust rate to user(bps): 0

pk rate from user(pps): 0              pk rate to user(pps): 0

ave rate from user(pps): 0             ave rate to user(pps): 0

sust rate from user(pps): 0            sust rate to user(pps): 0

link online/active percent: 0

ipv4 bad hdr: 0                        ipv4 ttl exceeded: 0

ipv4 fragments sent: 0                 ipv4 could not fragment: 0

ipv4 input acl drop: 0                 ipv4 output acl drop: 0

ipv4 bad length trim: 0

ipv4 input non-mip drop: 0             ipv4 output non-mip drop: 0

ipv4 input css drop: 0                 ipv4 output css drop: 0

output gre xoff pkts drop: 0           output gre xoff bytes drop: 0

ipv4 output no-flow drop: 0

ipv4 source violations: 0              ipv4 early pdu drop: 0

ipv4 proxy-dns redirect: 0             ipv4 proxy-dns pass-thru: 0

ipv4 proxy-dns drop: 0                 ipv4 proxy-dns redirect tcp connection: 0

ipv6 bad hdr: 0                        ipv6 bad length trim: 0

ip source violation no acct: 0          ip source violation ignored: 0

dlnk pkts exceeded bw: 0               dlnk pkts violated bw: 0

uplnk pkts exceeded bw: 0              uplnk pkts violated bw: 0

dormancy total: 0                      handoff total: 0

Disconnect Reason: ims-authorization-failed

Last Progress State: IMS Authorizing

علاوة على ذلك، يكون رقم مثيل SESMGR هو 102 مقترنا بالبطاقة 7 التي يتم تلقي عداد IMS-Authorization-Failed لها.

[local]PGW# show task resources facility sessmgr instance 102

Thursday June 13 16:56:14 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

7/0 sessmgr        102 8.80%  100% 792.2M  2.34G   45  500  3097 32504 I   good

Total                 1  8.80%     792.2M            45         3097

عندما تم التحقق من التكوين، تم ملاحظة أن تكوينات Diamproxy المتعددة كانت جيدة.

[local]PGW# show config | grep multiple

Thursday June 13 15:15:11 NZST 2019

require diameter-proxy multiple

ثم تبين أن 'IMS-authorization-failed' قد لوحظ للبطاقة التي لم تتولد فيها منشأة الوكيل.

في هذه الحالة، لم يتم توليد مرفق Diamproxy بالبطاقة 7.

[local]PGW# show card table

Thursday June 13 14:53:53 NZST 2019

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Standby        -

2: CFC      Control Function Virtual Card           Active         No

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Active         No

6: FC       2-Port Service Function Virtual Card    Active         No

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

9: FC       2-Port Service Function Virtual Card    Active         No

10: FC       2-Port Service Function Virtual Card    Active         No

11: FC       2-Port Service Function Virtual Card    Active         No

12: FC       2-Port Service Function Virtual Card    Active         No

13: FC       2-Port Service Function Virtual Card    Active         No

14: FC       2-Port Service Function Virtual Card    Active         No

15: FC       2-Port Service Function Virtual Card    Standby        -

16: FC       2-Port Service Function Virtual Card    Active         No

------- -

[local]PGW# show task resources facility diamproxy all

Thursday June 13 14:55:31 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

3/0 diamproxy        8 1.10%   90% 43.75M 250.0M  271 2500    --    -- -   good

4/0 diamproxy        9 1.09%   90% 43.89M 250.0M  266 2500    --    -- -   good

5/0 diamproxy       10 1.09%   90% 43.93M 250.0M  237 2500    --    -- -   good

9/0 diamproxy        1 1.08%   90% 43.63M 250.0M  212 2500    --    -- -   good

10/0 diamproxy        4 1.08%   90% 43.88M 250.0M  258 2500    --    -- -   good

12/0 diamproxy       11 1.11%   90% 43.93M 250.0M  229 2500    --    -- -   good

13/0 diamproxy        2 1.09%   90% 43.75M 250.0M  258 2500    --    -- -   good

14/0 diamproxy        7 1.06%   90% 43.88M 250.0M  256 2500    --    -- -   good

16/0 diamproxy       13 1.04%   90% 43.89M 250.0M  199 2500    --    -- -   good

الحل

وقد وجد أن تجهيزات Diamproxy لم تنتج للبطاقة 7 رغم أن البطاقة 7 كانت نشطة. لتوفير مرفق Diamproxy، يلزم إعادة تشغيل مرفق Diamctrl أو يلزم إجراء تبديل بطاقة CF.

وقد نفذت خطة العمل هذه على النحو المقترح.

تحويل بطاقة CFC نشطة باستخدام بطاقة CFC إحتياطية.

بعد تبديل البطاقة، تم إنشاء Diamproxy الخاص بشكل صحيح و Gx KPI عاد إلى الوضع الطبيعي حسب القيم المتوقعة.

******** show card table all *******

Thursday June 13 22:17:54 NZST 2019<tel:2019>

Slot         Card Type                               Oper State     SPOF  Attach

-----------  --------------------------------------  -------------  ----  ------

1: CFC      Control Function Virtual Card           Active         No                >>CFC card 1 active post switchover

2: CFC      Control Function Virtual Card           Standby        -

3: FC       2-Port Service Function Virtual Card    Active         No

4: FC       2-Port Service Function Virtual Card    Active         No

5: FC       2-Port Service Function Virtual Card    Active         No

6: FC       2-Port Service Function Virtual Card    Active         No

7: FC       2-Port Service Function Virtual Card    Active         No

8: FC       2-Port Service Function Virtual Card    Active         No

9: FC       2-Port Service Function Virtual Card    Active         No

10: FC       2-Port Service Function Virtual Card    Active         No

11: FC       2-Port Service Function Virtual Card    Active         No

12: FC       2-Port Service Function Virtual Card    Active         No

13: FC       2-Port Service Function Virtual Card    Active         No

14: FC       2-Port Service Function Virtual Card    Active         No

15: FC       2-Port Service Function Virtual Card    Standby        -

16: FC       2-Port Service Function Virtual Card    Active         No

--------- -

[local]PGW# show task resources facility diamproxy all

Thursday June 13 14:55:31 NZST 2019

task   cputime        memory     files      sessions

cpu facility      inst  used  allc   used  alloc used allc  used  allc S status

----------------------- ----------- ------------- --------- ------------- ------

3/0 diamproxy        8 0.95%   90% 43.86M 250.0M  130 2500    --    -- -   good

4/0 diamproxy        9 0.98%   90% 44.00M 250.0M  130 2500    --    -- -   good

5/0 diamproxy       10 1.00%   90% 44.00M 250.0M  135 2500    --    -- -   good

7/0 diamproxy        3 0.26%   90% 43.73M 250.0M  278 2500    --    -- -   good      >>diamproxy instance 3 spawn with card 7

8/0 diamproxy        5 0.31%   90% 43.73M 250.0M  277 2500    --    -- -   good

9/0 diamproxy        1 1.00%   90% 43.86M 250.0M  130 2500    --    -- -   good

10/0 diamproxy        4 0.98%   90% 43.96M 250.0M  133 2500    --    -- -   good

11/0 diamproxy        6 0.24%   90% 43.74M 250.0M  277 2500    --    -- -   good

12/0 diamproxy       11 1.04%   90% 44.01M 250.0M  144 2500    --    -- -   good

13/0 diamproxy        2 0.97%   90% 43.84M 250.0M  134 2500    --    -- -   good

14/0 diamproxy        7 1.04%   90% 43.99M 250.0M  138 2500    --    -- -   good

16/0 diamproxy       13 0.96%   90% 43.74M 250.0M  261 2500    --    -- -   good

وتم إنشاء مرفق ثنائي الوكيل ذي الصلة بعد تبادل رسائل النشاط والقطر بشكل صحيح بين PGW و PCRF.