المحتويات

المقدمة

المتطلبات

إستخدام TCPDUMP لالتقاط الصور

إستخدام الواجهة الصحيحة

التقاط الحزم

لكتابة المخرجات على ملف

لالتقاط عدد معين من الحزم

خيارات التصفية الأخرى

المقدمة

يوضح هذا المستند كيفية تجميع التقاط الحزم من واجهة سطر الأوامر (CLI) لخادم تجربة التنقل المتصل (CMX) 10.x. يمكن أن تساعد عمليات التقاط الحزم هذه في أستكشاف أخطاء العديد من السيناريوهات وإصلاحها (على سبيل المثال: اتصال NMSP بين وحدة التحكم في الشبكة المحلية اللاسلكية (WLC) وخادم CMX) للتحقق من تدفق الاتصال.

المتطلبات

- وصول واجهة سطر الأوامر (CLI) إلى خادم CMX.

- كمبيوتر مثبت عليه Wireshark لقراءة عمليات الالتقاط بالتفصيل.

إستخدام TCPDUMP لالتقاط الصور

TCPDUMP هو محلل حزم يعرض الحزم المرسلة والمستلمة على خادم CMX. تعمل هذه الأداة كأداة للتحليل واستكشاف الأخطاء وإصلاحها لمسؤولي الشبكة/النظام. الحزمة مضمنة إلى خادم CMX حيث يمكن النظر إلى البيانات الخام من الحزم.

قد يفشل تشغيل Tcpdump كمستخدم 'cmxadmin' مع حدوث الخطأ التالي: ( يلزم الوصول 'root')

In this example, tcpdump is attempted to be run as a 'cmxadmin' user.

[cmxadmin@laughter ~]$ tcpdump -i eth0 port 16113

tcpdump: eth0: You don't have permission to capture on that device

(socket: Operation not permitted)

قم بالتبديل إلى المستخدم 'root' بعد تسجيل الدخول كمستخدم 'cmxadmin' إلى واجهة سطر الأوامر عبر SSH أو وحدة التحكم.

[cmxadmin@laughter ~]$ su - root

Password:

[root@laughter ~]#

إستخدام الواجهة الصحيحة

دون الواجهة التي سيتم التقاط الحزم فيها. ويمكن الحصول عليها باستخدام 'ifconfig -a'

In this example, 10.10.10.25 is the IP address of CMX server and 'eth0' is the interface it's tied to on the server.

[cmxadmin@laughter ~]$ ifconfig -a

eth0      Link encap:Ethernet  HWaddr 00:50:56:A1:38:BB

inet addr:10.10.10.25  Bcast:10.10.10.255  Mask:255.255.255.0

inet6 addr: 2003:a04::250:56ff:fea1:38bb/64 Scope:Global

inet6 addr: fe80::250:56ff:fea1:38bb/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:32593118 errors:0 dropped:0 overruns:0 frame:0

TX packets:3907086 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:3423603633 (3.1 GiB)  TX bytes:603320575 (575.3 MiB)

lo        Link encap:Local Loopback

inet addr:127.0.0.1  Mask:255.0.0.0

inet6 addr: ::1/128 Scope:Host

UP LOOPBACK RUNNING  MTU:65536  Metric:1

RX packets:1136948442 errors:0 dropped:0 overruns:0 frame:0

TX packets:1136948442 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:246702302162 (229.7 GiB)  TX bytes:246702302162 (229.7 GiB)

[cmxadmin@laughter ~]$

التقاط الحزم

This example captures and displays all packets that are sourced from port - 16113 and enter the CMX server on the eth0 interface.

[root@laughter ~]# tcpdump -i eth0 src port 16113

tcpdump: verbose output suppressed, use -v or -vv for full protocol decode

listening on eth0, link-type EN10MB (Ethernet), capture size 65535 bytes

09:50:29.530824 IP 172.18.254.249.16113 > laughter.cisco.com.40020: Flags [P.], seq 983381312:983382645, ack 2483597279, win 191, options [nop,nop,TS val 1792647414 ecr 1148435777], length 1333

09:50:31.507118 IP 172.18.254.249.16113 > laughter.cisco.com.40020: Flags [.], seq 1333:2715, ack 1, win 191, options [nop,nop,TS val 1792647908 ecr 1148437650], length 1382

09:50:31.507186 IP 172.18.254.249.16113 > laughter.cisco.com.40020: Flags [P.], seq 2715:2890, ack 1, win 191, options [nop,nop,TS val 1792647908 ecr 1148437650], length 175

09:50:33.483166 IP 172.18.254.249.16113 > laughter.cisco.com.40020: Flags [P.], seq 2890:4239, ack 1, win 191, options [nop,nop,TS val 1792648402 ecr 1148439626], length 1349

09:50:35.459584 IP 172.18.254.249.16113 > laughter.cisco.com.40020: Flags [P.], seq 4239:5396, ack 1, win 191, options [nop,nop,TS val 1792648896 ecr 1148441603], length 1157

^C

5 packets captured

5 packets received by filter

0 packets dropped by kernel

[root@laughter ~]#

لكتابة المخرجات على ملف

In this example, tcpdump would capture packets that are from 10.10.20.5 received on it's eth0 interface and write it to a file named TEST_NMSP_WLC.pcap.

[root@laughter cmxadmin]# tcpdump -i eth0 src 10.10.20.5 -w TEST_NMSP_WLC.pcap

tcpdump: listening on eth0, link-type EN10MB (Ethernet), capture size 65535 bytes

^C7 packets captured

7 packets received by filter

0 packets dropped by kernel

[root@laughter cmxadmin]#

بمجرد أن يكون الملف جاهزا، ستحتاج إلى إستخلاص ملف .pcap من CMX إلى حاسبك لتحليله في أداة أكثر راحة مثل wireshark. يمكنك إستخدام أي تطبيق SCP للقيام بذلك. على سبيل المثال، في Windows، سيسمح لك تطبيق WinSCP بالاتصال ب CMX باستخدام بيانات اعتماد SSH ويمكنك بعد ذلك إستعراض نظام الملفات والعثور على ملف .pcap الذي أنشأته للتو. للعثور على المسار الحالي، اكتب "pwd" بعد تشغيل tcpdump لمعرفة مكان حفظ الملف.

لالتقاط عدد معين من الحزم

إذا كان عدد محدد من الحزم مرغوب، باستخدام عوامل تصفية الخيار -c تماما لذلك العدد.

[root@laughter ~]# tcpdump -Z root -i eth0 -c 5 src 10.10.20.5 -w CMX_WLC_Capture.pcap

tcpdump: listening on eth0, link-type EN10MB (Ethernet), capture size 65535 bytes

5 packets captured

6 packets received by filter

0 packets dropped by kernel

[root@laughter ~]#

خيارات التصفية الأخرى

[root@laughter cmxadmin]# tcpdump -i eth0 dst 10.10.20.5 (filtered based on destination IP address)

[root@laughter cmxadmin]# tcpdump -i eth0 src 10.10.20.4 (filtered based on Source IP address)

[root@laughter cmxadmin]# tcpdump -i eth0 port 80  (filtered for packets on port 80 in both directions)

[root@laughter cmxadmin]# tcpdump -i eth0 port 443  (filtered for packets on port 443 in both directions)

سيتم حفظ الصور المكتوبة إلى الملفات في الدليل الحالي على الخادم ويمكن نسخها للمراجعة التفصيلية باستخدام Wireshark.