المحتويات

سؤال

إجابة

مناقشات مجتمع دعم Cisco ذات الصلة

سؤال

كيفية تحديد معدل الفشل الحالي لجهاز الإنذار في أي وقت بعد المشغل الأولي. وقد يكون معدل الفشل الأولي أكثر وضوحا، ولكن هل نستطيع أن نجد معدل الفشل الحالي ربما بعد ساعات؟

إجابة

بينما تقوم ملائمة SNMP الأولية والتسجيل والتنبيه بتتبع معدل الفشل الأولي للحد المراقب، فقد لا يكون واضحا كيفية الحصول على معدل الفشل الحالي. في أسفل "show threshold"، يقوم الأمر بالإعلام عن حالة جميع الإنذارات فيما يتعلق بمعدل الفشل الحالي في آخر فترة تدقيق.

[local]PDSN> show threshold

Friday June 12 04:39:32 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source:      System

Last Measured: 77% Raise Time: 2015-Jun-11+22:15:05

[local]PDSN> show thresh

Friday June 12 05:34:04 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source: System Last Measured: 65%

Raise Time:        2015-Jun-11+22:15:05

[local]PDSN> show thresh

Friday June 12 06:06:07 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source:      System

Last Measured: 61%

Raise Time:        2015-Jun-11+22:15:05

[local]PDSN> show alarm outstanding verbose

Friday June 12 04:41:28 UTC 2015

Severity Object          Timestamp                          Alarm ID

-------- ----------      ---------------------------------- ---------------------

Alarm Details

--------------------------------------------------------------------------------

Minor    Chassis         Thursday June 11 22:15:05 U        5770524519230406656

<28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

2015-Jun-11+22:15:05.418 [alarmctrl 65201 info] [8/0/5185 <evlogd:0> alarmctrl.c:192] [software internal system critical-info syslog] Alarm condition: id 5015057a08690000 (Minor): <28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

Thu Jun 11 22:15:05 2015 Internal trap notification 222 (ThreshAAAAcctFailRate) threshold 25% measured value 32%

إصدار مسح:

2015-Jun-12+07:15:05.210 [alarmctrl 65200 info] [8/0/5185 <evlogd:0> alarmctrl.c:285] [software internal system critical-info syslog] Alarm cleared: id 5015057a08690000: <28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

Fri Jun 12 07:15:05 2015 Internal trap notification 223 (ThreshClearAAAAcctFailRate) threshold 20% measured value 0%

[local]PDSN> show threshold Friday June 12 13:45:26 UTC 2015

...

No outstanding alarm