المحتويات

المقدمة

مثال على سجل CLI للموجه

محتويات فلاش الموجه

إعادة تنسيق ذاكرة AP flash

الاتصال ب AP802

نسخ AP IOS إلى ذاكرة الفلاش الخاصة بالموجه

إستخراج AP IOS

تكوين نقطة الوصول لتمهيد صورة IOS الجديدة

تنظيف ذاكرة الفلاش الخاصة بالموجه وتكوينه للاستقلالية

كيفية التأكد من أن ISR يحتوي على AP801 أو AP802

المقدمة

يوضح هذا المستند كيفية إجراء إسترداد صورة نقطة الوصول على ISR (موجه الخدمات المدمجة) باستخدام نقطة وصول (AP802) مضمنة.  تعتمد الطريقة الموضحة هنا على حقيقة أن قسم الذاكرة المؤقتة ل AP802 يمكن الوصول إليه مباشرة من الموجه المضيف.  لا يمكن إستخدام هذا الأسلوب من موجه مع AP801 مضمن؛ على مثل هذه الأنظمة الأساسية، ستحتاج إلى إجراء إسترداد صورة AP (نقطة الوصول) من وحدة تحكم AP801 (bootloader.) (كيفية معرفة ما إذا كان لديك AP801 أو AP802).

مثال على سجل CLI للموجه

تم تنفيذ المثال الموضح أدناه على 819HWD الذي يشغل IOS (نظام التشغيل بين الشبكات) 15.2(4)M5.

محتويات فلاش الموجه

819HWD#dir all-filesystems

[ ... ]

Directory of flash:1:/

2 -rw- 100041 Aug 1 2014 19:37:46 +00:00 event.log

25 -rw- 215 Sep 15 2014 17:17:38 +00:00 env_vars

4 -rw- 125729 Aug 1 2014 12:29:16 +00:00 event.capwap

5 -rw- 281 Jun 9 2014 23:28:12 +00:00 info

6 -rw- 8216 Sep 15 2014 17:17:50 +00:00 private-multiple-fs

7 drw- 0 Dec 26 2013 19:52:46 +00:00 ap802-rcvk9w8-mx

17 -rw- 3072 Dec 26 2013 20:02:30 +00:00 cpconfig-ap802.cfg

3 -rw- 0 Sep 15 2014 17:18:02 +00:00 config.txt

18 -rw- 5 Jun 25 2014 21:06:00 +00:00 private-config

19 -rw- 64 Jun 24 2014 23:12:10 +00:00 sensord_CSPRNG1

20 -rw- 64 Jun 24 2014 23:21:44 +00:00 sensord_CSPRNG0

21 drw- 0 Jul 31 2014 18:29:32 +00:00 configs

إعادة تنسيق ذاكرة AP flash

ال flash:1: filesystem هو القسم المستخدم من قبل ال AP802.  في الاختبار الذي قمنا به، سنقوم بتنسيق نظام الملفات هذا لمسحه تنظيفا، ثم إعادة تمهيد AP802 لدفعه إلى التمهيد في جهاز تحميل التمهيد ل AP. (ملاحظة: لا تقم بإعادة تنسيق ذاكرة AP المؤقتة إلا إذا كان ذلك ضروريا - ويتم ذلك هنا لأغراض توضيحية.)

819HWD#format flash:1:/

Format operation may take a while. Continue? [confirm]y

Format operation will destroy all data in "flash:1:". Continue? [confirm]y

Format: All system sectors written. OK...

Format: Total sectors in formatted partition: 80801

Format: Total bytes in formatted partition: 41370112

Format: Operation completed successfully.

Format of flash:1: complete

819HWD#service-module wlan-ap 0 reset

Use reset only to recover from shutdown or failed state

AP config will not be saved

Do you want to reset?[confirm]y

Trying to reload Service Module wlan-ap0.

Pause - wait for open files to finish...

819HWD#

*Sep 15 17:28:30.232: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:28:30.248: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UP

الاتصال ب AP802

اتصل بوحدة تحكم AP802 للتحقق من أن ذاكرة Flash (الذاكرة المؤقتة) الخاصة بها فارغة الآن.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

Connecting to AP console, enter Ctrl-^ followed by x,

then "disconnect" to return to router prompt

ap: dir flash:

Directory of flash:/

41168896 bytes available (139264 bytes used)

ap:

Ctrl-^x

819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

نسخ AP IOS إلى ذاكرة الفلاش الخاصة بالموجه

انسخ بطاقة AP IOS المطلوبة من خادم TFTP (بروتوكول نقل الملفات المبسط) على قسم الذاكرة المؤقتة الرئيسي للموجه.  في هذه الحالة، نستخدم AP802-k9w7-tar.152-4.JB5.tar الذي هو IOS 15.2(4)JB5 الذاتي.  (راجع المقالة التي تفهم صور IOS لنقطة الوصول.)

819HWD#copy tftp flash:

Address or name of remote host [192.168.148.1]?

Source filename [/192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar]? ap802-k9w7-tar.152-4.JB5.tar

Destination filename [ap802-k9w7-tar.152-4.JB5.tar]?

Accessing tftp://192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar...

Loading ap802-k9w7-tar.152-4.JB5.tar from 192.168.148.1 (via GigabitEthernet0): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 13834240 bytes]

13834240 bytes copied in 46.368 secs (298357 bytes/sec)

إستخراج AP IOS

قم بفك حزمة المسار على ذاكرة AP flash (flash:1:)، باستخدام الأمر archive tar /xtract.

819HWD#archive tar /xtract ap802-k9w7-tar.152-4.JB5.tar flash:1:

extracting info (282 bytes)

ap802-k9w7-mx.152-4.JB5/ (directory)

ap802-k9w7-mx.152-4.JB5/html/ (directory)

[ ... ]

extracting info.ver (282 bytes)

819HWD#dir flash:1:

Directory of flash:1:/

4 -rw- 282 Sep 15 2014 17:31:40 +00:00 info

5 drw- 0 Sep 15 2014 17:31:42 +00:00 ap802-k9w7-mx.152-4.JB5

199 -rw- 282 Sep 15 2014 17:33:38 +00:00 info.ver

41308160 bytes total (26963968 bytes free)

تكوين نقطة الوصول لتمهيد صورة IOS الجديدة

وحدة تحكم إلى أداة تحميل التمهيد ل AP802، وتكوينها لتمهيد صورة IOS.  لاحظ أن صورة نقطة الوصول IOS تسمى عادة flash:/platform-featureReset-mx.version/platform-featurereset-mx-version.  ثم قم بتمهيد AP IOS.

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

ap: dir flash:

Directory of flash:/

4 -rw- 282

info

5 drw- 0

ap802-k9w7-mx.152-4.JB5

199 -rw- 282

info.ver

26963968 bytes available (14344192 bytes used)

ap:

set BOOT flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5

ap: reset

Are you sure you want to reset the system (y/n)?y

System resetting...

*Sep 15 17:35:12.758: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core SAFE FOR RESET

IOS Bootloader - Starting system.

[ ... ]

*Sep 15 17:35:25.329: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:35:25.345: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UPLoading "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5"...###############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

File "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5" uncompressed and installed, entry point: 0x18003000

[ ... ]

Cisco IOS Software, AP802 Software (AP802-K9W7-M), Version 15.2(4)JB5, RELEASE SOFTWARE (fc1)

[ ... ]

*Sep 15 17:37:29.371: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core UP

*Sep 15 17:37:37.435: %WLAN_AP_SM-6-UNIFIED_IMAGE: Embedded AP will change boot image to mini-IOS also called LWAPP recovery

Please check router config to ensure connectivity between WLC and AP

Use service-module wlan-ap 0 reload to boot up mini-IOS image on AP

Save the autonomous configuration file with a file name other than

flash:[config.txt] as it will be erased upon AP reload

Press RETURN to get started!

ap>

Ctrl-^x 819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

819HWD#

تنظيف ذاكرة الفلاش الخاصة بالموجه وتكوينه للاستقلالية

احذف الآن TarballBall من وميض الموجه، حيث لم تعد هناك حاجة إليه.  أيضا عنوان الرسالة "WLAN_AP_SM-6-UNIFIED_IMAGE"، التي تشير إلى أن الموجه يعتقد أن نقطة الوصول يجب أن تقوم بتشغيل IOS خفيف وزن، لذلك نحن بحاجة إلى إستخدام الأمر service-module-wlan n bootimage لإعلام الموجه بأن نقطة الوصول تعمل بشكل مستقل (أو خفيف وزن).

819HWD#del flash:/ap802-k9w7-tar.152-4.JB5.tar

Delete filename [ap802-k9w7-tar.152-4.JB5.tar]?

Delete flash:/ap802-k9w7-tar.152-4.JB5.tar? [confirm]

819HWD#conf t

Enter configuration commands, one per line. End with CNTL/Z.

819HWD(config)#service-module wlan-ap 0 bootimage autonomous

819HWD(config)#end

819HWD#wri

Building configuration...[OK]

كيفية التأكد من أن ISR يحتوي على AP801 أو AP802

س: كيف يمكنك معرفة ما إذا كان ISR يحتوي على AP801 أو AP802؟

ألف 1. قم بإظهار الإصدار على نقطة الوصول.

A2. http://www.cisco.com/c/en/us/products/routers/800-series-routers/brochure-listing.html>جدول مقارنة ISR من السلسلة Cisco 800 Series